\begin{table}%t7-part1%\centering
\par
\caption{Results of the IR/HI correlations in the atomic phase for all sky regions.
Cols.~1--2: central position of each studied regions in degree. Column~3: number of pixels used for the correlations in each studied regions. Columns~4--11:
results of the correlations in $\rm {MJy/sr}$ for $\rm 10^{21}H/cm^{2}$. Columns~12--13: emissivity
spectral indices in the range 100--240~$\rm \mic$ ($\rm \beta^{FIR}$)
and in the range 550--2100~$\rm \mic$ ($\rm \beta^{submm}$). Column~14: derived dust temperature in Kelvin. Errors bars represent the 1-$\rm \sigma$ uncertainty estimates.
}
\begin{tabular}{cccccccccccccc}
  \hline \hline 
  \noalign{\smallskip}
  \multicolumn{1}{l}{\small Long.} &
\multicolumn{1}{l}{Lat.} &  pix. &\multicolumn{1}{l}{$a_{100}$} & \multicolumn{1}{l}{$a_{140}$} & \multicolumn{1}{l}{$a_{240}$} & \multicolumn{1}{l}{$a_{550}$} & \multicolumn{1}{l}{$a_{850}$} & \multicolumn{1}{l}{$a_{1382}$} & \multicolumn{1}{l}{$a_{2098}$} & \multicolumn{1}{l}{$a_{3191}$} & \multicolumn{1}{l}{$\rm \beta_{HI}^{FIR}$} & \multicolumn{1}{l}{$\rm \beta_{HI}^{submm}$} & \multicolumn{1}{l}{$T\rm _d^{HI}$} \\ 
 && &\multicolumn{1}{l}{$\pm\Delta a_{100}$}&\multicolumn{1}{l}{$\pm\Delta a_{140}$}&\multicolumn{1}{l}{$\pm \Delta a_{240}$}&\multicolumn{1}{l}{$\pm \Delta a_{550}$}&\multicolumn{1}{l}{$ \pm \Delta a_{850}$} &\multicolumn{1}{l}{$\pm \Delta a_{1382}$} & \multicolumn{1}{l}{$\pm \Delta a_{2098}$} & \multicolumn{1}{l}{$ \pm \Delta a_{3191}$} & \multicolumn{1}{l}{$\rm \pm \Delta \beta_{HI}^{FIR}$} &\multicolumn{1}{l}{$\rm \pm \Delta \beta_{HI}^{submm}$} & \multicolumn{1}{l} {$\pm$$ \Delta T\rm _d^{HI}$} \\
& & && & & & ($\times 10^{-1}$) &  ($\times 10^{-2}$) &  ($\times 10^{-2}$) &  ($\times 10^{-3}$) & & & \\
\hline 
 Case 1  &&&&&&&&&&&&\\
 \hline
108.34 &   8.28 &    71 &   12.0 $\pm$   1.3 &   26.4 $\pm$   2.3 &   18.9 $\pm$   1.4 &    3.2 $\pm$   0.2 &    9.6 $\pm$   0.4 &   20.3 $\pm$   0.8 &    6.1 $\pm$   0.4 &  13.5 $\pm$   1.9 &    2.3 $\pm$    0.5 &    1.6 $\pm$   0.1 &   17.2 $\pm$   0.7 \\
117.55 &  --2.16 &   111 &    9.4 $\pm$   0.8 &   20.0 $\pm$   1.6 &   15.6 $\pm$   1.1 &    2.1 $\pm$   0.2 &    8.1 $\pm$   0.4 &   14.3 $\pm$   0.7 &    4.3 $\pm$   0.3 &  10.1 $\pm$   1.1 &    2.3 $\pm$    0.5 &    1.6 $\pm$   0.1 &   16.6 $\pm$   0.6 \\
120.61 &  --6.34 &    40 &    7.1 $\pm$   6.5 &   16.0 $\pm$   8.3 &   13.9 $\pm$   4.3 &    2.3 $\pm$   0.4 &    7.5 $\pm$   1.0 &   17.6 $\pm$   2.8 &    4.3 $\pm$   1.3 &  22.7 $\pm$   6.2 &    2.2 $\pm$   1.9 &    1.6 $\pm$   0.3 &   17.0 $\pm$   0.6 \\
139.02 &  12.46 &    17 &    2.1 $\pm$   1.6 &    6.6 $\pm$   4.1 &    7.1 $\pm$   4.7 &    1.9 $\pm$   0.5 &    2.4 $\pm$   3.1 &    8.6 $\pm$   3.9 &    1.0 $\pm$   2.0 &  11.1 $\pm$  12.5 &    2.0 $\pm$   3.1 &    2.1 $\pm$   0.7 &   15.7 $\pm$   0.6 \\
142.09 &   2.01 &   111 &    5.3 $\pm$   1.1 &   13.7 $\pm$   1.8 &   12.1 $\pm$   1.0 &    1.7 $\pm$   0.1 &    7.9 $\pm$   0.4 &   12.4 $\pm$   0.6 &    3.6 $\pm$   0.3 &  10.7 $\pm$   1.0 &    2.4 $\pm$   0.6 &    1.7 $\pm$   0.1 &   15.3 $\pm$    0.5 \\
145.16 &  --4.25 &    91 &    4.1 $\pm$   0.2 &   10.9 $\pm$   0.5 &    9.2 $\pm$   0.4 &    1.5  $\pm$  0.1 &    6.0 $\pm$   0.3 &    9.9 $\pm$   0.5 &    3.5 $\pm$   0.3 &  $6.6$ $\pm$    1.1 &    2.3 $\pm$    0.4 &    1.6 $\pm$   0.1 &   15.5 $\pm$    0.5 \\
148.23 &  --6.34 &    38 &    4.1 $\pm$   0.3 &   10.2 $\pm$   1.0 &    8.4 $\pm$   0.7 &    0.2 $\pm$   0.1 &    4.8 $\pm$   0.6 &   11.9 $\pm$   1.0 &    4.8 $\pm$   0.5 &  $6.2$ $\pm$   1.7 &    5.2 $\pm$   0.4 &    1.0 $\pm$   0.2 &   10.6 $\pm$   0.2 \\
148.23 &   2.01 &   111 &    3.9 $\pm$   0.3 &   10.6 $\pm$   0.6 &   10.1 $\pm$   0.5 &    1.4 $\pm$   0.1 &    7.8 $\pm$   0.3 &   11.8 $\pm$   0.5 &    3.7 $\pm$   0.2 &  10.2 $\pm$   0.7 &    2.4 $\pm$   0.4 &    1.6 $\pm$   0.1 &   14.7 $\pm$   0.5 \\
151.29 &  --0.07 &   110 &    9.9 $\pm$   2.1 &   17.0 $\pm$   3.3 &   12.8 $\pm$   2.2 &    1.4 $\pm$   0.4 &    6.8 $\pm$   1.1 &   22.7 $\pm$   2.0 &    9.5 $\pm$   1.0 &  28.0 $\pm$    3.2 &    2.3 $\pm$   0.6 &    0.6 $\pm$   0.2 &   17.7 $\pm$   0.6 \\
151.29 &   6.19 &   100 &    2.7 $\pm$   0.3 &    6.3 $\pm$   0.8 &    5.6 $\pm$   0.7 &    0.9 $\pm$   0.2 &    5.2 $\pm$   0.5 &    7.8 $\pm$   0.7 &    2.4 $\pm$   0.4 &  $9.6$ $\pm$    2.4 &    2.1 $\pm$   0.5 &    1.7 $\pm$   0.2 &   16.5 $\pm$   0.6 \\
154.36 & --10.52 &    51 &    1.8 $\pm$   0.4 &    6.2 $\pm$   1.4 &    6.1 $\pm$   1.4 &    1.1 $\pm$   0.2 &    2.6 $\pm$   0.8 &   -- &   -- & $<$1.72 &    2.4 $\pm$   0.8 &    2.5 $\pm$   1.1 &   13.9 $\pm$   0.5 \\
157.43 &  12.46 &    33 &    4.1 $\pm$   0.8 &   12.5 $\pm$   3.0 &    7.9 $\pm$   2.5 &    3.2 $\pm$   0.7 &    5.4 $\pm$   1.5 &    7.9 $\pm$   2.9 &  $<$5.2 & 17.0 $\pm$   9.1 &    3.1 $\pm$   1.1 &    2.9 $\pm$   0.6 &   13.9 $\pm$   0.7 \\
160.50 &  --8.43 &   112 &    6.8 $\pm$   1.6 &   19.5 $\pm$   4.7 &   20.8 $\pm$   4.4 &    1.8 $\pm$   0.6 &    5.3 $\pm$   2.3 &   16.6 $\pm$   4.9 &    5.2 $\pm$   2.4 &  23.3 $\pm$   10.5 &    2.9 $\pm$    0.7 &    1.4 $\pm$   0.4 &   13.0 $\pm$   0.3 \\
160.50 &   2.01 &   117 &    2.9 $\pm$   0.2 &    9.6 $\pm$   0.6 &    9.9 $\pm$   0.5 &    2.4 $\pm$   0.1 &    5.0 $\pm$   0.5 &   12.8 $\pm$   0.9 &    5.2 $\pm$   0.4 &  $6.1$ $\pm$    1.8 &    2.0 $\pm$    0.5 &    1.5 $\pm$   0.1 &   15.0 $\pm$   0.5 \\
163.57 &   8.28 &    42 &    6.8 $\pm$   0.8 &   15.8 $\pm$   2.6 &   15.0 $\pm$   2.2 &    0.9 $\pm$   0.3 &    6.4 $\pm$   1.2 &    8.8 $\pm$   3.9 &    3.4 $\pm$   2.5 &  $9.6$ $\pm$  11.2 &    3.2 $\pm$    0.5 &    1.3 $\pm$   0.6 &   13.2 $\pm$   0.3 \\
163.57 &  10.37 &    59 &    5.4 $\pm$   0.5 &   14.8 $\pm$   1.6 &   13.5 $\pm$   1.2 &    0.6 $\pm$   0.2 &    4.2 $\pm$   0.9 &    2.2 $\pm$   2.5 &   $<$2.7 &  $3.6$ $\pm$   7.3 &    4.0 $\pm$   0.5 &    0.2 $\pm$   1.2 &   11.8 $\pm$    0.3 \\
166.63 &   8.28 &    34 &    6.8 $\pm$   0.9 &   16.6 $\pm$   3.0 &   16.0 $\pm$   2.6 &    1.3 $\pm$   0.3 &    6.7 $\pm$   1.4 &    9.1 $\pm$   3.7 &    2.7 $\pm$ 1.9&   $<$30.4 &    2.8 $\pm$   0.6 &    1.6 $\pm$   0.5 &   13.9 $\pm$   0.4 \\
172.77 & --10.52 &   110 &    3.2 $\pm$   0.4 &   10.3 $\pm$   1.4 &    8.2 $\pm$   1.3 &    0.8 $\pm$   0.3 &   $<$1.9 &   10.3 $\pm$   1.2 &    0.9 $\pm$   0.8 &-- &    3.3 $\pm$   0.6 &    1.2 $\pm$   0.6 &   12.9 $\pm$   0.4 \\
\hline
Median & values &&&&&&&&&&&&\\
 -- & -- & -- &    5.3 $\pm$   0.8 &   13.7 $\pm$   1.8 &   12.1 $\pm$  1.4 &    1.5 $\pm$   0.2 &    6.0 $\pm$   0.9 &   11.8 $\pm$   1.5 &    3.6 $\pm$   0.8 &  $9.6$ $\pm$   3.2 &    2.4 $\pm$   0.6 &    1.6 $\pm$   0.3 &   15.0 $\pm$   0.5 \\
\par
\hline
 Case 2  &&&&&&&&&&&&\\
 \hline
 71.53 &   4.10 &    64 &    4.5 $\pm$    0.9 &    8.5 $\pm$    1.8 &    7.3 $\pm$    1.3 &    1.7 $\pm$    0.1 &    7.8 $\pm$   0.6 &   10.6  $\pm$  0.6 &    3.3 $\pm$   0.3 &  $7.9$  $\pm$  1.2 &    1.7  $\pm$  0.7 &    1.7 $\pm$   0.1 &   20.7 $\pm$   0.9 \\
 74.59 &   2.01 &    86 &   10.4 $\pm$    3.7 &   20.0 $\pm$    4.5 &   14.4 $\pm$    2.0 &    2.5 $\pm$    0.2 &    7.6 $\pm$   0.9 &   14.8 $\pm$   1.1 &    4.6 $\pm$   0.5 &  $9.6$ $\pm$   1.3 &    2.2 $\pm$  0.8 &    1.6  $\pm$  0.2 &   18.8 $\pm$   0.8 \\
 77.66 &   4.10 &   104 &   10.4 $\pm$    3.0 &   17.5 $\pm$    3.7 &   12.0 $\pm$    1.5 &    2.1 $\pm$    0.2 &    6.3 $\pm$   0.4 &   13.3 $\pm$   0.8 &    3.5 $\pm$   0.3 &  $6.8$ $\pm$   1.3 &    2.1  $\pm$  0.7 &    1.7 $\pm$   0.1 &   20.7 $\pm$   0.9 \\
 80.73 &   8.28 &    56 &   17.2 $\pm$    1.2 &   30.2 $\pm$    1.7 &   18.6 $\pm$    0.9 &    2.9 $\pm$    0.1 &    8.0  $\pm$  0.3 &   16.7  $\pm$  0.5 &    6.0 $\pm$   0.4 &  $8.9$  $\pm$  1.8 &    2.3 $\pm$   0.4 &    1.6 $\pm$   0.1 &   19.5  $\pm$  0.8 \\
 83.80 &  --4.25 &    59 &   10.4 $\pm$    2.5 &   21.3 $\pm$    4.5 &   14.5 $\pm$    3.0 &    3.2 $\pm$    0.4 &   10.7 $\pm$   1.6 &   12.2 $\pm$   2.7 &    6.0 $\pm$   1.1 &  19.6  $\pm$  4.1 &    2.1  $\pm$  0.8 &    1.7  $\pm$  0.2 &   19.2  $\pm$  0.9 \\
 89.93 &   2.01 &   111 &   16.3 $\pm$    1.4 &   28.9 $\pm$   2.1 &   19.0 $\pm$   1.3 &    2.7 $\pm$    0.2 &   10.1 $\pm$    0.4 &   22.0  $\pm$  0.9 &    6.8  $\pm$  0.3 &  16.9 $\pm$   1.5 &    2.3   $\pm$ 0.5 &    1.4  $\pm$  0.1 &   18.9 $\pm$   0.8 \\
 93.00 &  --0.07 &   111 &    5.7 $\pm$    0.6 &   12.3 $\pm$    1.1 &    9.8 $\pm$    0.8 &    2.0 $\pm$    0.1 &    6.9 $\pm$   0.3 &   14.1 $\pm$   0.6 &    3.9 $\pm$   0.3 &  10.1 $\pm$   0.9 &    2.0 $\pm$   0.5 &    1.6  $\pm$  0.1 &   18.3  $\pm$  0.7 \\
 99.14 &  --4.25 &    91 &    6.4 $\pm$    0.3 &   15.1 $\pm$   0.6 &   12.6 $\pm$    0.5 &    1.8 $\pm$    0.2 &    8.0  $\pm$  0.5 &   17.4  $\pm$  0.6 &    5.8  $\pm$  0.4 &  $4.5$ $\pm$   1.7 &    2.3 $\pm$   0.4 &    1.3 $\pm$   0.1 &   15.9 $\pm$   0.5 \\
 99.14 &  --0.07 &   110 &    5.8 $\pm$    0.7 &   15.0 $\pm$   1.0 &   13.5 $\pm$   0.7 &    3.0 $\pm$    0.1 &    9.1 $\pm$   0.3 &   18.2 $\pm$   0.6 &    4.3 $\pm$   0.3 &  $7.0$ $\pm$   1.4 &    2.0 $\pm$   0.5 &    1.8 $\pm$   0.1 &   16.8  $\pm$  0.6 \\
 99.14 &  12.46 &    79 &   11.1 $\pm$    0.4 &   25.0 $\pm$    1.0 &   19.4 $\pm$    0.8 &    2.8 $\pm$    0.1 &   10.5 $\pm$   0.4 &   20.7 $\pm$   1.0 &    6.6 $\pm$   0.6 &  $6.7$ $\pm$   4.2 &    2.3 $\pm$   0.4 &    1.5  $\pm$  0.1 &   16.4  $\pm$  0.6 \\
102.21 &  10.37 &    99 &    9.7 $\pm$    1.7 &   21.1 $\pm$    4.0 &   14.7$\pm$    3.2 &    2.0 $\pm$    0.4 &    9.8 $\pm$   1.3 &   11.8  $\pm$  2.4 &    4.1 $\pm$   1.2 & $<$8.7 &    2.5  $\pm$  0.7 &    1.7 $\pm$   0.3 &   16.5 $\pm$   0.6 \\
102.21 &  12.46 &    68 &   12.3 $\pm$    0.5 &   26.8 $\pm$    1.1 &   21.3 $\pm$   0.8 &    2.8 $\pm$    0.1 &   11.9 $\pm$   0.4 &   19.9 $\pm$   0.7 &    6.8 $\pm$   0.6 &  $7.2$ $\pm$   2.5 &    2.3  $\pm$  0.4 &    1.6 $\pm$   0.1 &   16.4  $\pm$   0.6 \\
108.34 &  --4.25 &    90 &   12.0 $\pm$    0.6 &   25.1 $\pm$    1.2 &   18.1 $\pm$    0.8 &    2.7 $\pm$    0.3 &    9.0  $\pm$  0.4 &   17.6 $\pm$   0.5 &    5.7 $\pm$   0.2 &  $9.4$ $\pm$   1.4 &    2.3 $\pm$   0.4 &    1.5 $\pm$   0.1 &   17.2  $\pm$   0.6 \\
108.34 &   2.01 &   111 &   21.8 $\pm$    5.1 &   26.0 $\pm$    6.5 &   13.9 $\pm$    3.6 &    1.1 $\pm$    0.5 &    5.8 $\pm$   1.0 &    9.5 $\pm$   2.2 &    2.8 $\pm$   0.7 & $<$3.7 &    2.7 $\pm$   0.8 &    1.6 $\pm$   0.4 &   20.8  $\pm$   0.8 \\
111.41 &   6.19 &    83 &    2.0 $\pm$    1.4 &    5.3 $\pm$    2.4 &    6.1 $\pm$    1.4 &    1.7 $\pm$    0.2 &    3.4 $\pm$   0.4 &    8.4 $\pm$   0.6 &    2.2 $\pm$   0.2 &  $5.5$ $\pm$   0.8 &    1.6 $\pm$   1.7 &    1.8 $\pm$   0.2 &   17.4 $\pm$    0.6 \\
114.48 &  --0.07 &   110 &    6.1 $\pm$    4.1 &   14.3 $\pm$    6.1 &   11.4 $\pm$    3.5 &    2.2 $\pm$    0.4 &    8.6 $\pm$   1.0 &   18.1 $\pm$   1.7 &    4.1 $\pm$   0.4 & $<$6.8 &    2.2 $\pm$   1.5 &    1.7 $\pm$   0.2 &   17.3  $\pm$   0.7 \\
117.55 &  --0.07 &   110 &    4.4 $\pm$    2.1 &    9.6 $\pm$    4.1 &    8.9 $\pm$    2.7 &    1.0 $\pm$   0.4 &    6.3 $\pm$   1.0 &   13.6 $\pm$   1.5 &    2.8 $\pm$   0.4 &  $9.3$  $\pm$  2.1 &    2.3 $\pm$   1.1 &    1.7 $\pm$   0.3 &   15.6  $\pm$   0.5 \\
123.68 &   2.01 &   111 &    5.2 $\pm$    0.4 &   11.8 $\pm$    0.8 &   10.6 $\pm$    0.7 &    1.5 $\pm$    0.1 &    6.6 $\pm$   0.3 &   13.5 $\pm$   0.6 &    3.8 $\pm$   0.3 &  12.6   $\pm$   1.2 &    2.2 $\pm$   0.4 &    1.5 $\pm$   0.1 &   16.4 $\pm$    0.5 \\
129.82 &   2.01 &   110 &    4.9 $\pm$    0.3 &   11.7 $\pm$    0.7 &   10.3 $\pm$    0.4 &    1.9 $\pm$    0.1 &    5.3 $\pm$   0.2 &   13.7  $\pm$  0.4 &    3.3 $\pm$   0.2 &  $6.6$ $\pm$   1.1 &    2.0 $\pm$   0.4 &    1.6 $\pm$   0.1 &   16.9  $\pm$   0.6 \\
135.95 &  --4.25 &    49 &    6.4 $\pm$    0.4 &   14.1 $\pm$    0.9 &   12.4 $\pm$    0.8 &    1.6 $\pm$    0.1 &    8.1 $\pm$   0.4 &   12.0 $\pm$   0.9 &    4.4 $\pm$   0.6 &  $3.2$ $\pm$   3.3 &    2.2  $\pm$  0.4 &    1.5  $\pm$  0.2 &   16.3  $\pm$   0.5 \\
135.95 &  --2.16 &   106 &    4.6 $\pm$   0.5 &   10.9 $\pm$    1.0 &    9.7 $\pm$    0.7 &    2.1 $\pm$   0.1 &    5.0  $\pm$  0.4 &   12.8  $\pm$  0.7 &    2.7  $\pm$  0.3 &  10.5   $\pm$   1.1 &    1.9  $\pm$  0.5 &    1.8  $\pm$  0.1 &   17.5 $\pm$    0.7 \\
139.02 &  --4.25 &    62 &    6.1 $\pm$    0.4 &   13.7 $\pm$    1.0 &   11.4 $\pm$    0.9 &    2.1 $\pm$    0.2 &    7.9 $\pm$   0.5 &   12.6 $\pm$   0.9 &    4.0 $\pm$   0.4 &  $4.3$ $\pm$   1.8 &    2.0  $\pm$  0.5 &    1.7 $\pm$   0.2 &   17.4 $\pm$    0.7 \\
139.02 &  --0.07 &   111 &   23.1 $\pm$    4.1 &   39.4 $\pm$    5.7 &   25.4 $\pm$    3.0 &    3.1 $\pm$    0.4 &   14.4 $\pm$   1.1 &   21.8 $\pm$    1.6 &    4.9 $\pm$   0.6 &  $9.1$ $\pm$    1.7 &    2.4 $\pm$   0.6 &    1.9 $\pm$   0.2 &   18.6  $\pm$   0.7 \\
139.02 &   2.01 &   110 &   18.5 $\pm$    2.6 &   29.7$\pm$    3.6 &   18.8 $\pm$    1.9 &    2.4 $\pm$    0.2 &    8.5  $\pm$  0.6 &   14.5 $\pm$   0.8 &    4.6 $\pm$   0.3 & 13.1  $\pm$     1.2 &    2.4 $\pm$   0.5 &    1.6 $\pm$   0.1 &   19.6  $\pm$   0.8 \\
145.16 &   4.10 &   111 &    6.7 $\pm$    0.5 &   14.6 $\pm$    0.9 &   11.7 $\pm$    0.6 &    2.8 $\pm$    0.2 &    9.4 $\pm$   0.3 &   16.4 $\pm$   1.1 &    4.5 $\pm$   0.4 &  $5.4$ $\pm$   2.7 &    1.9 $\pm$   0.5 &    1.7 $\pm$   0.1 &   18.8  $\pm$   0.8 \\
145.16 &  10.37 &   116 &    4.8 $\pm$    0.2 &   11.6 $\pm$    0.8 &   11.1 $\pm$    0.7 &    1.9 $\pm$    0.2 &    6.3 $\pm$   0.4 &   16.1 $\pm$   1.1 &    4.8 $\pm$   0.6 &  11.4  $\pm$  2.5 &    2.0  $\pm$  0.4 &    1.3 $\pm$   0.2 &   16.3 $\pm$    0.6 \\
151.29 &   4.10 &   110 &    4.3 $\pm$    0.3 &   10.0 $\pm$    0.7 &    9.6 $\pm$    0.6 &    1.9 $\pm$    0.1 &    7.8 $\pm$   0.3 &   10.8 $\pm$   0.7 &    3.7  $\pm$  0.3 &  $8.2$  $\pm$  1.5 &    1.9  $\pm$  0.4 &    1.7  $\pm$  0.1 &   17.1 $\pm$    0.6 \\
154.36 &   4.10 &   111 &    3.6 $\pm$    0.4 &    7.6 $\pm$    0.8 &    7.0 $\pm$    0.6 &    1.3 $\pm$    0.1 &    7.0 $\pm$   0.2 &    7.9 $\pm$   0.6 &    1.6 $\pm$   0.3 &  $2.1$ $\pm$    0.8 &    1.9 $\pm$   0.5 &    2.1  $\pm$  0.2 &   18.0  $\pm$   0.7 \\
157.43 &  --0.07 &   110 &    5.1 $\pm$    0.3 &   12.6 $\pm$    0.9 &   11.4 $\pm$    0.9 &    2.5 $\pm$    0.2 &    5.6   $\pm$ 0.9 &   13.6 $\pm$    1.7 &    2.1 $\pm$   0.7 &  $2.2$ $\pm$   2.4 &    1.9 $\pm$   0.5 &    2.0 $\pm$   0.2 &   17.2   $\pm$  0.6 \\
160.50 & --20.96 &    72 &    6.6 $\pm$    6.4 &   14.6 $\pm$   13.6 &    8.7 $\pm$   8.9 &    3.8 $\pm$    1.3 &    9.5 $\pm$    5.4 &   20.2 $\pm$   8.8 &    6.4  $\pm$  4.0 & $<$15.6 & -- &    1.8 $\pm$   0.6 &   16.8  $\pm$   1.1 \\
160.50 & --18.87 &    91 &   24.7 $\pm$    8.6 &   50.5 $\pm$   15.6 &   31.8 $\pm$    9.7 &    3.5 $\pm$    0.9 &   10.4 $\pm$    4.1 &   35.9 $\pm$   7.4 &   17.1 $\pm$   1.9 &  65.1 $\pm$  5.9 &    2.7 $\pm$   1.0 &    0.8  $\pm$  0.3 &   16.3 $\pm$    0.6 \\
160.50 &  --0.07 &   117 &    4.1 $\pm$    0.5 &   10.4 $\pm$    1.4 &   10.0 $\pm$    1.3 &    3.0 $\pm$   0.2 &   11.3 $\pm$   1.0 &   18.4 $\pm$   2.1 &    4.8 $\pm$   0.8 &  15.0 $\pm$   2.6 &    1.6 $\pm$   0.6 &    1.7  $\pm$  0.2 &   18.2 $\pm$    0.8 \\
169.70 &  --6.34 &   110 &    3.1 $\pm$    0.4 &    8.1 $\pm$    1.3 &    6.8 $\pm$    1.2 &    0.2 $\pm$    0.2 &    3.1 $\pm$   0.7 &   $<$2.3 &  $<$1.5 & $<$7.3  &    4.4 $\pm$   0.6 & -- &   11.5 $\pm$    0.3 \\
172.77 & --18.87 &   111 &    6.5 $\pm$    0.3 &   14.8 $\pm$    1.1 &   11.9 $\pm$    1.0 &    2.4 $\pm$    0.2 &    4.4  $\pm$  0.6 &   11.4 $\pm$    0.8 &    3.4 $\pm$   0.4 &  $4.7$ $\pm$   2.0 &    2.0 $\pm$   0.5 &    1.8 $\pm$    0.2 &   17.7 $\pm$    0.7 \\
172.77 & --14.69 &   110 &    9.5 $\pm$    0.7 &   28.5 $\pm$    2.4 &   29.5 $\pm$    3.1 &    6.1 $\pm$    0.5 &   18.8  $\pm$  1.7 &   28.7 $\pm$   2.5 &    7.6 $\pm$   0.9 &  $8.5$ $\pm$   3.2 &    2.0  $\pm$  0.5 &    2.0  $\pm$  0.2 &   15.3  $\pm$   0.5 \\
172.77 &  --8.43 &    91 &    6.5 $\pm$    0.5 &   18.2 $\pm$    1.7 &   15.9 $\pm$    1.5 &    3.2 $\pm$    0.4 &    6.9 $\pm$   1.5 &   16.9 $\pm$   1.8 &   10.3 $\pm$   1.3 &  29.0 $\pm$   6.7 &    2.2  $\pm$  0.5 &    1.3  $\pm$  0.2 &   15.8  $\pm$   0.6 \\
172.77 &  --6.34 &    81 &    2.2 $\pm$    0.4 &    5.3 $\pm$    1.4 &    4.7 $\pm$    1.2 &    0.7 $\pm$   0.2 &    0.8 $\pm$   0.7 &   $<$2.2 &   $<$1.7 & $<$2.2 &    2.2  $\pm$  0.7 &    3.9 $\pm$   3.7 &   15.8  $\pm$   0.5 \\
175.84 &   4.10 &   109 &    5.7 $\pm$    1.6 &   13.4 $\pm$    2.6 &   11.8 $\pm$    1.6 &    1.4 $\pm$   0.2 &    9.1 $\pm$   0.6 &   15.0 $\pm$   1.2 &    2.3 $\pm$   0.7 &  0.2 $\pm$   3.0 &    2.4  $\pm$  0.7 &    1.6  $\pm$  0.2 &   15.4 $\pm$    0.5 \\
178.91 & --23.05 &    51 &    8.6 $\pm$    2.0 &   18.8 $\pm$    7.2 &   23.3 $\pm$    5.8 &    4.4 $\pm$    1.4 &   18.7 $\pm$   2.1 &   17.2 $\pm$   5.0 &    1.7 $\pm$   3.8 &  $9.8$ $\pm$  20.1 &    1.5 $\pm$   0.8 &    2.4 $\pm$   0.6 &   17.5  $\pm$   0.6 \\
178.91 &   2.01 &   110 &    6.3 $\pm$    0.5 &   18.4 $\pm$    1.4 &   19.0 $\pm$    1.2 &    5.4 $\pm$   0.5 &   11.3 $\pm$   0.9 &   25.3 $\pm$   1.7 &    8.6 $\pm$   0.5 & 10.6 $\pm$    1.5 &    1.7  $\pm$  0.5 &    1.6  $\pm$  0.1 &   16.5 $\pm$     0.6 \\
\hline
181.97 & --12.61 &    66 &    3.7 $\pm$    1.0 &   10.9 $\pm$    3.3 &    8.7 $\pm$    2.1 &    2.3   $\pm$ 0.4 &    8.6 $\pm$   0.6 &    7.3  $\pm$  2.2 &   $<$3.9 & $<$3.2 &    2.2  $\pm$  0.9 &    2.2 $\pm$   0.5 &   15.9  $\pm$   0.7 \\
181.97 &  --8.43 &    48 &    2.2 $\pm$    1.2 &   11.0 $\pm$    3.3 &   14.7 $\pm$    2.8 &    1.2 $\pm$   0.5 &    8.5 $\pm$   0.9 &   19.8 $\pm$   2.8 &    4.1 $\pm$   1.2 &  $3.2$ $\pm$   5.5 &    4.3 $\pm$   1.0 &    1.7 $\pm$   0.3 &   10.4 $\pm$    0.2 \\
181.97 &  --2.16 &   111 &    5.1 $\pm$    0.6 &   14.8 $\pm$    1.8 &   16.4 $\pm$    1.6 &    3.2 $\pm$   0.5 &   11.3  $\pm$  0.8 &   24.8 $\pm$   1.4 &    7.8  $\pm$  0.6 &  27.2 $\pm$    2.9 &    1.9 $\pm$   0.5 &    1.4 $\pm$   0.2 &   15.3  $\pm$   0.5 \\
181.97 &   2.01 &   111 &    7.9 $\pm$    0.5 &   20.6 $\pm$    1.1 &   19.0 $\pm$    0.9 &    4.1 $\pm$   0.3 &   12.6 $\pm$   0.4 &   26.4 $\pm$   0.9 &    7.8 $\pm$   0.5 &  $7.5$ $\pm$    2.1 &    2.0 $\pm$   0.4 &    1.6 $\pm$   0.1 &   16.6 $\pm$    0.6 \\
185.04 & --10.52 &    48 &    5.0 $\pm$    0.6 &   13.2 $\pm$    2.6 &   12.4 $\pm$    1.9 &    0.8 $\pm$   0.2 &   10.4  $\pm$  0.8 &   13.2  $\pm$  1.9 &    1.4  $\pm$  0.9 & -- &    3.3  $\pm$  0.6 &    1.9 $\pm$   0.3 &   12.9  $\pm$   0.3 \\
\hline
Median & values  &&&&&&&&&&&&\\
 -- &   -- &    -- &    6.3 $\pm$    0.6 &   14.6 $\pm$   1.7 &   12.4 $\pm$    1.3 &    2.3 $\pm$   0.2 &    8.5 $\pm$  0.6 &   14.8 $\pm$    1.1 &    4.1 $\pm$   0.5 &  $7.2$ $\pm$    2.1 &    2.2 $\pm$  0.5 &    1.7 $\pm$    0.2 &   16.9 $\pm$   0.6 \\
\hline
 Case 3  &&&&&&&&&&&&\\
\hline
 68.46 &   4.10 &    34 &    3.7 $\pm$   1.5 &   13.1 $\pm$    3.1 &   11.7 $\pm$    2.0 &    2.5  $\pm$   0.2 &    4.1 $\pm$    1.9 &    9.4  $\pm$   1.3 &    3.4  $\pm$   0.8 &  $5.2$  $\pm$   2.9 &    2.6  $\pm$   0.9 &    2.1 $\pm$    0.2 &   14.0  $\pm$   0.5 \\
 77.66 &  --0.07 &    61 &   38.6 $\pm$  10.7 &   50.4 $\pm$   12.0 &   23.8 $\pm$    5.0 &    1.1 $\pm$    0.4 &   19.3  $\pm$   2.5 &   16.5  $\pm$   2.9 &    7.3 $\pm$    1.4 &  $8.8$  $\pm$   2.0 &    3.3 $\pm$    0.7 &    1.7 $\pm$    0.3 &   17.0 $\pm$    0.6 \\
 77.66 &   2.01 &   107 &   10.3 $\pm$   7.2 &   25.4 $\pm$    8.2 &   19.0  $\pm$   3.3 &    2.8 $\pm$    0.3 &    9.6  $\pm$   1.4 &   17.9  $\pm$   1.8 &    5.8 $\pm$    0.9 &  $8.6$  $\pm$   1.5 &    2.6  $\pm$   1.3 &    1.6 $\pm$    0.2 &   15.8  $\pm$   0.6 \\
 83.80 &  --0.07 &   105 &    8.9  $\pm$  7.3 &   26.7 $\pm$  10.1 &   21.2   $\pm$  4.8 &    2.9 $\pm$   0.3 &   11.6  $\pm$   1.3 &   20.1 $\pm$    2.3 &    5.4 $\pm$    0.9 &  16.7  $\pm$   2.0 &    3.0  $\pm$   1.5 &    1.7   $\pm$  0.2 &   14.0  $\pm$  0.5 \\
 93.00 & --12.61 &    17 &    7.3  $\pm$  1.8 &   16.5 $\pm$    5.1 &   15.4 $\pm$    2.9 &    2.9 $\pm$    0.3 &    3.8  $\pm$   1.6 &   17.1 $\pm$    2.3 &    6.7  $\pm$   1.7 &  30.6 $\pm$    8.1 &    1.9 $\pm$    0.7 &    1.6 $\pm$    0.2 &   17.4  $\pm$   0.6 \\
 96.07 &  --6.34 &    43 &    2.9  $\pm$   8.1 &   10.1 $\pm$   10.5 &   11.3 $\pm$    4.8 &    2.7 $\pm$    0.4 &    7.6 $\pm$    0.8 &    9.9 $\pm$    1.8 &    1.1 $\pm$    1.3 &  $3.1$ $\pm$    5.8 & -- &    2.4 $\pm$    0.4  &  14.4 $\pm$   0.5 \\
 96.07 &  --4.25 &   100 &    3.6  $\pm$   1.6 &   12.1 $\pm$    2.2 &   12.0 $\pm$    1.2 &    1.6  $\pm$   0.2 &    7.0  $\pm$   0.5 &   19.1 $\pm$    1.1 &    5.4 $\pm$    0.5 &  $8.5$ $\pm$    1.7 &    2.8  $\pm$   0.8 &    1.2 $\pm$   0.1 &   13.2 $\pm$    0.4 \\
102.21 &  --0.07 &   111 &    3.8  $\pm$   1.8 &   12.6 $\pm$    2.6 &   12.4  $\pm$   1.5 &    2.4 $\pm$    0.1 &    8.2  $\pm$   0.5 &   15.8 $\pm$    1.0 &    4.4 $\pm$    0.4 &  $9.0$  $\pm$   1.8 &    2.4  $\pm$   0.8 &    1.7   $\pm$  0.1 &   14.3 $\pm$    0.5 \\
105.27 &  --0.07 &   111 &    3.6 $\pm$    1.9 &   12.0 $\pm$    2.7 &   11.9 $\pm$    1.5 &    2.0 $\pm$    0.2 &    7.7  $\pm$   0.4 &   15.6 $\pm$    0.9 &    4.7 $\pm$    0.3 &  $9.1$ $\pm$    1.2 &    2.5  $\pm$   0.9 &    1.5  $\pm$   0.1 &   14.0  $\pm$   0.4 \\
126.75 &  --2.16 &   108 &    2.1 $\pm$    1.0 &    7.5 $\pm$    1.4 &    7.6 $\pm$    0.9 &    1.0 $\pm$    0.2 &    5.6  $\pm$   0.4 &   10.7  $\pm$   0.6 &    4.2  $\pm$   0.3 &  $7.6$  $\pm$   1.2 &    3.0  $\pm$   0.8 &    1.2 $\pm$   0.1 &   12.8 $\pm$    0.4 \\
142.09 &  --2.16 &   111 &    6.1  $\pm$   0.8 &   16.1 $\pm$    1.4 &   13.8 $\pm$    0.9 &    3.1 $\pm$    0.1 &    8.2 $\pm$    0.4 &   18.2 $\pm$    0.7 &    3.2  $\pm$   0.3 &  $7.1$  $\pm$   1.2 &    2.1  $\pm$   0.5 &   1.9 $\pm$    0.1 &   16.6  $\pm$   0.6 \\
142.09 &  12.46 &    55 &    2.4  $\pm$   0.7 &    7.7 $\pm$    2.0 &    9.9 $\pm$    1.8 &    3.1 $\pm$    0.4 &    7.8 $\pm$    2.2 &   24.0  $\pm$   3.4 &    6.2 $\pm$    1.2 &  17.7  $\pm$   5.5 & -- &    2.0 $\pm$   0.7 &     8.2 $\pm$    1.4 \\
145.16 &  --2.16 &   110 &    4.1 $\pm$    0.4 &   13.3  $\pm$   0.8 &   12.4 $\pm$    0.7 &    2.9  $\pm$   0.1 &    7.4 $\pm$    0.4 &   17.2  $\pm$   0.8 &    3.7 $\pm$    0.3 &  13.6  $\pm$  0.9 &    2.2  $\pm$   0.5 &    1.9 $\pm$    0.1 &   15.0  $\pm$   0.6 \\
148.23 &  --2.16 &   111 &    4.0 $\pm$    0.7 &   12.8 $\pm$   1.2 &   11.7 $\pm$    1.0 &    3.4 $\pm$    0.2 &    6.8 $\pm$    0.6 &   16.4  $\pm$   1.1 &    3.8 $\pm$    0.4 &  16.2  $\pm$   1.6 &    2.1  $\pm$   0.6 &    1.9 $\pm$    0.1 &   15.7   $\pm$ 0.6 \\
154.36 &  --8.43 &    53 &    2.4  $\pm$   0.8 &    8.2 $\pm$    2.0 &    4.8  $\pm$   2.3 &    1.7 $\pm$    0.3 &    5.1  $\pm$   1.3 &   $<$4.8 &   $<$3.7 & $<$16.1   &  6.5 $\pm$   1.8  &   2.4 $\pm$    1.1  &   9.6 $\pm$    0.4 \\
154.36 &  --4.25 &    98 &    3.5 $\pm$    0.2 &    9.1  $\pm$   0.5 &    8.2  $\pm$   0.4 &    0.3 $\pm$    0.1 &    3.8 $\pm$    0.3 &   11.1  $\pm$   0.5 &    3.9 $\pm$    0.3 &  $9.7$  $\pm$   1.3 &    4.3  $\pm$  0.4 &    1.0 $\pm$    0.2 &   11.5  $\pm$   0.3 \\
154.36 &  14.54 &    20 &    8.8 $\pm$   3.2 &   34.4 $\pm$   14.9 &   17.2  $\pm$  11.4 &    0.9 $\pm$    2.8 &    1.6 $\pm$    7.5 &    7.2  $\pm$  13.5 &   28.7 $\pm$   12.8 &  25.5 $\pm$   44.8 &    6.1  $\pm$   2.1 & -- &    9.9  $\pm$   0.3 \\
157.43 &   2.01 &   111 &    3.7  $\pm$   0.3 &   11.2 $\pm$    0.5 &   11.2 $\pm$    0.5 &    2.1 $\pm$    0.1 &    7.6 $\pm$    0.4 &   15.7 $\pm$    0.7 &    4.1 $\pm$    0.4 &  $1.6$  $\pm$   0.9 &    2.2 $\pm$   0.4 &    1.6 $\pm$   0.1 &   14.8  $\pm$   0.5 \\
157.43 &   6.19 &    73 &    1.3  $\pm$   0.3 &    4.6  $\pm$   1.0 &    5.3 $\pm$    0.9 &    0.4 $\pm$    0.1 &    2.7 $\pm$    0.5 &    3.1  $\pm$   1.0 &    0.7 $\pm$    0.4 & $<$4.8 &    3.5 $\pm$   0.7 &    2.0  $\pm$   0.5 &   11.7 $\pm$    0.3 \\
166.63 &  --2.16 &   111 &    3.9 $\pm$    0.2 &    9.5 $\pm$    0.7 &    9.1 $\pm$    0.5 &    0.8 $\pm$   0.2 &    4.2  $\pm$   0.4 &   11.1  $\pm$   0.5 &    2.2  $\pm$   0.3 &  $3.6$  $\pm$  1.3 &    2.7 $\pm$    0.4 &    1.5 $\pm$    0.2 &   14.1 $\pm$    0.4 \\
166.63 &   2.01 &   111 &    6.3 $\pm$    0.5 &   15.3 $\pm$    1.3 &   13.5 $\pm$    1.0 &    2.3 $\pm$    0.2 &    6.5  $\pm$   0.6 &   19.4  $\pm$   1.2 &    6.7 $\pm$    0.5 &  22.6   $\pm$  2.1 &    2.1 $\pm$   0.5 &    1.2   $\pm$  0.1 &   16.2   $\pm$  0.6 \\
166.63 &   4.10 &    90 &    4.0 $\pm$    0.4 &    9.4 $\pm$    1.0 &    7.6  $\pm$   0.7 &    2.5 $\pm$    0.2 &    3.2  $\pm$   0.5 &   11.3 $\pm$    0.9 &    6.6 $\pm$    0.6 & 12.3 $\pm$    2.1 &    1.8  $\pm$   0.6 &    1.3  $\pm$  0.2 &   19.2 $\pm$   0.9 \\
169.70 & --12.61 &   110 &    2.0  $\pm$   0.6 &    6.6 $\pm$    2.3 &    7.0  $\pm$   2.4 &    0.5 $\pm$    0.3 &    6.5 $\pm$    1.3 &   14.7  $\pm$   1.9 &    5.4 $\pm$    1.1 &  $8.9$  $\pm$   4.4 &    3.7 $\pm$    0.9 &    1.1  $\pm$   0.4 &   11.8 $\pm$    0.3 \\
178.91 &  --6.34 &    93 &    4.0 $\pm$    0.8 &    6.3 $\pm$    2.3 &    1.1 $\pm$    2.0 &    1.5  $\pm$   0.3 &    2.6 $\pm$    1.5 &   $<$4.8 &  $<$1.2 & --&    8.5 $\pm$     4.5&    3.8 $\pm$     2.0 &    9.3 $\pm$    0.4 \\
178.91 &   6.19 &    88 &    2.7  $\pm$   0.7 &    9.8  $\pm$   1.6 &    9.6 $\pm$    1.1 &    1.3  $\pm$   0.2 &    6.0 $\pm$    0.5 &   19.1  $\pm$   1.3 &    5.7 $\pm$    0.7 & $<$4.9 &    3.0  $\pm$   0.7 &    1.0 $\pm$    0.2 &   12.8 $\pm$    0.4 \\
\par
\hline
Median & values  &&&&&&&&&&&&\\
  -- &   -- &    -- &    3.8 $\pm$    0.8 &   12.0 $\pm$    2.0 &   11.7 $\pm$    1.5 &    2.1 $\pm$    0.2 &    6.5 $\pm$    0.6 &   15.7 $\pm$    1.2 &    4.4 $\pm$    0.6 &  $8.8$ $\pm$    2.0 &    2.7 $\pm$   0.7 &    1.7 $\pm$    0.2 &   14.0 $\pm$    0.5 \\
\hline
\end{tabular}
\end{table}