\begin{table}%t4
	%\centering
\par
	\caption {\label{tab:corlim}Parameter limits for the analysis of HD~49933. The height prior parameter was set to $h'_{\rm min}=10^{-8}$.}
	\begin{tabular}{l c c}
	\hline\hline
& Min & 
Max \\
	\hline
$\nu~ \rm [\mu \rm  Hz] $ & 1219.9 & 2618.1 \\
$h~ \rm [ppm^{2}/\mu\rm  Hz]$ &  0  & 6 \\
$\tau~ \rm[d^{-1}]$ & 0 & 1.5 \\
$b~\rm [ppm^{2}/\mu\rm   Hz]$ & 0.001 & 0.5 \\
	\hline
	\end{tabular}
	\end{table}