\begin{table}%t2
	%\centering
\par
	\caption {\label{tab:lim}Parameter limits for the analysis of the simulated solar-type pulsator. According to Eq.~(\ref{equ:hprior}), $h'_{\rm min}$ was set to $10^{-6}$.}
	\begin{tabular}{l c c}
	\hline\hline
	& Min & Max \\
	\hline
%\hline
	$\nu~ \rm [d^{-1}] $ & 130 & 140 \\
	$h$ &  $0$  & 0.15 \\
	$\tau~ \rm[d^{-1}]$ & 0.1 & 1.5 \\
	$b$ & 0.001 & 0.01 \\
	\hline
	\end{tabular}
	\end{table}