\begin{table}%t1
	\caption {\label{tab:sim}Input parameters for the simulated solar-type pulsator. 
	}
	%\centerline
 {\begin{tabular}{l c c}
	\hline\hline
& $f_1$ & $f_2$ \\
	\hline
frequency & 132.3 & 136.6\\
rms amplitude & 1 & 1 \\
estimated mode height & 0.033 & 0.033 \\
mode lifetime & 0.5 d & 0.5 d \\
	\hline
	\end{tabular}}
\par
	\smallskip
	White noise model with SNR of 0.1 in the time domain.
\end{table}