\begin{table}%t3
\caption {\label{table:LC_ref}Frequencies and amplitudes of the \corot light curve when the \corotp  transit is removed.   }
%\centerline
 {\begin{tabular}{ccc}
\hline\hline
Frequency   &  Period & Amplitude \\
(c~d$^{-1}$)   &d     &       (mmag)  \\
\hline
0.0463&21.6&2.9\\
0.0367&27.2&2.3\\
0.0925&10.8&1.2\\
0.0830&12.0&1.4\\
0.0554&18.0&1.0\\
0.0711&14.1&0.9\\
0.1281&7.8&0.5\\
0.0986&10.1&0.6\\
0.1059&9.4&0.5\\
0.0768&13.0&0.5\\
\hline
\end{tabular}}
\par
\smallskip
Results listed in  this table are only in the period range  listed in  Fig.~\ref{fig:LC_harm} and for peaks with  amplitude larger than the correspond value for a false alarm probability (FAP) of $5\sigma$.
\end{table}