\begin{table}%t2
\caption{\label{table:candparam}Parameters for the fits of the planetary candidate
    LRc01\_E2\_1145 shown in Fig.~\ref{fig:LRc01_E2_1145} (see
    explanation of the parameters in Sect.~\ref{sec:modeling}).} 
\par
\small%\centering
\par
  \begin{tabular}{rl}
    \hline\hline
    parameter & E2\_1145 \\
    \hline
    Period (days; fixed) & $6.212~242\pm0.000~013$ \\
    $R_{\rm p}/R_{\rm s}$            & $0.081~6\pm0.003~2$     \\
    $a/R_{\rm s}$              & $14.3\pm1.4$              \\
    $i$ (deg)            & $87.1\pm0.6$              \\
    $e$ (fixed)          & $0$                       \\
    $u_1$ (fixed)        & $0.556$                   \\
    $u_2$ (fixed)        & $0.212$                   \\
    third light (fixed)  & $0.0$                     \\
    \hline
  \end{tabular}
\end{table}