\begin{table}%t2
\caption {\label{tab:0165contam}Potential false alarm sources around the E2\_0165 target star.}
%\centerline
 { {
\begin{tabular}{lccccccc}
\noalign{\smallskip}
\hline\hline
Name & $\Delta$ RA & $\Delta$ Dec. & $m_{\rm R}$  & $k$&relat. contrib. & Observed&Alarm  \\
 	& arcsec 		&	arcsec	&			&	&to target flux & $\Delta m_{\rm c}$& $\Delta m_{\rm c}$ \\
\hline
E2\_0165&0	  &0		&11.26	&1.00	&0.997&	0.021 $\pm$ 0.004&0.00038\\
     c1&	8.3	&15.3	&15.33	  &0.10	        &0.0024& 0.023 $\pm$ 0.033&0.17\\
     c2 &	16.3&--26.3	&13.50	&0.005	      &0.00069&0.011 $\pm$ 0.018&0.76\\
c3	&2.4	&10.5	&20$^1$	&0.87	&0.00048	&$<$0.5$^2$&1.0\\
\hline
\end{tabular}
} }
\par
\smallskip
\par
 {$^1$ g-band magnitude. $^2$ Estimated  from movie made from CFHT time-series images.}\\
\end{table}