\begin{table}%t2 
\par
\caption {\label{4parts}The most important frequencies found by T{\sc i}SAFT for the four parts of
the light curve. }
%\centerline
 {
\begin{tabular}{lllllllllllll}
\hline
\hline
&\multicolumn{3}{c}{Relative quiescence} & \multicolumn{3}{c}{Precursor} & \multicolumn{3}{c}{Outburst}  & \multicolumn{3}{c}{Relaxation}  \\
&Freq.        & Amp. & Phase              & Freq.       & Amp. & Phase      & Freq.       & Amp. & Phase      & Freq.       & Amp.  & Phase      \\
&(c.d$^{-1}$) & mmag & [0, 2$\pi$]         &(c.d$^{-1}$) & mmag & [0, 2$\pi$] &(c.d$^{-1}$) & mmag & [0, 2$\pi$] &(c.d$^{-1}$) & mmag  & [0, 2$\pi$] \\
\hline 
F1  & 0.5273 	& 0.108 & 4.49 &	      &       &      & 0.5446	  & 0.555 & 0.83 &            &       &     \\
F2  & 0.8883 (*)& 0.546 & 2.81 & 0.8750       & 0.384 & 1.85 & 0.8709  (*)& 1.606 & 4.66 &            &       &     \\
F3  &	    	&       &      & 0.9139       & 0.214 & 2.87 &       	  &	  &	 & 0.9059     & 0.419 & 3.93\\
F4  &	    	&       &      &	      &	      &      & 0.9461	  & 1.123 & 0.45 &	      &       &     \\
F5  & 1.1244	& 0.382 & 5.68 &	      &	      &      &       	  &	  &	 &	      &       &     \\
F6  & 1.1780	& 0.227 & 1.46 &	      &	      &      & 1.1507	  & 0.796 & 5.28 &            &       &     \\
F7  &	    	&       &      &	      &	      &      & 1.2017	  & 0.666 & 3.90 & 1.2279 (*) & 1.455 & 0.35\\
F8  & 1.2806	& 0.358 & 1.49 & 1.2957 (*)   & 1.087 & 1.55 & 1.2914  (*)& 1.226 & 5.96 & 1.3171     & 0.709 & 5.38\\
F9  &	    	&       &      & 1.5058 (*)   & 1.289 & 0.67 & 1.4986 (*,S)& 1.148 & 3.66 & 1.4865    & 0.728 & 5.98\\
F10 &	    	&       &      & 1.5750       & 1.020 & 3.91 & 1.5739  (*)& 1.748 & 0.79 &            &       &     \\
F11 & 1.8640 (*)& 0.666 & 1.99 & 1.8498       & 0.508 & 5.20 & 1.8461	  & 0.877 & 2.52 & 1.8960     & 0.359 & 4.01\\
F12 & 2.0462	& 0.571 & 1.57 &	      &	      &      & 2.0390	  & 0.199 & 0.41 &            &       &     \\
F13 & 2.1043 (*)& 0.709 & 3.36 & 2.1056       & 0.579 & 0.72 & 2.1033	  & 0.042 & 0.11 &            &       &     \\
F14 &	    	&       &      & 2.2731       & 0.428 & 1.88 &       	  &	  &	 & 2.2803     & 0.438 & 4.72\\
F15 &	    	&       &      &	      &	      &      & 2.3138	  & 0.296 & 2.57 &            &       &     \\
F16 &	    	&       &      & 2.6703       & 0.731 & 5.41 & 2.6679	  & 0.690 & 4.80 &            &       &     \\
F17 & 2.7246 (*)& 0.331 & 1.81 & 2.734        & 0.760 & 3.67 & 2.7273	  & 0.742 & 2.61 &            &       &     \\
F18 & 2.8333 (*)& 1.278 & 2.64 &	      &	      &      &       	  &	  &	 &	      &       &     \\
F19 & 2.8682	& 0.439 & 0.85 & 2.8500       & 0.926 & 1.02 & 2.8788  (*)& 1.634 & 2.08 &            &       &     \\
F20 & 2.9489	& 0.621 & 5.77 & 2.9423 (*)   & 1.602 & 5.37 & 2.9599	  & 0.502 & 2.03 & 2.9570     & 1.123 & 5.70\\
F21 &	    	&       &      &	      &	      &      & 2.9181  (*)& 2.924 & 5.82 &            &       &     \\
F22 & 3.0711	& 0.213 & 2.52 &	      &	      &      &       	  &	  &	 & 3.0293     & 0.691 & 3.09\\
F23 &	    	&       &      & 3.2734       & 0.597 & 6.06 & 3.2728	  & 0.506 & 2.71 &            &       &     \\
F24 & 3.3088	& 0.237 & 1.73 &	      &	      &      &       	  &	  &	 & 3.3099     & 0.408 & 0.43\\
F25 & 3.6633 (*)& 1.662 & 4.60 & 3.6517 (*)   & 1.812 & 1.13 & 3.6686	  & 0.947 & 5.14 & 3.6607 (*) & 1.278 & 3.07\\
F26 &	    	&       &      &	      &	      &      & 4.3002	  & 0.300 & 1.89 &            &       &     \\
F27 & 4.6365	& 0.201 & 0.75 &	      &	      &      & 4.6381	  & 0.157 & 4.00 &            &       &     \\
F28 & 5.0259 (*)& 2.283 & 2.46 & 5.0287 (*)   & 1.951 & 2.30 & 5.0337	  & 0.904 & 5.93 & 5.0362 (*) & 1.771 & 2.87\\
F29 & 5.2759 (*)& 0.541 & 1.50 & 5.2575       & 0.343 & 0.60 & 5.2426	  & 0.163 & 4.19 &            &       &     \\
F30 &        (*)&       &      &	      &	      &      &       	  &	  &	 & 5.5434     & 0.161 & 0.34\\
F31 &	    	&       &      &	      &	      &       &      	  &	  &	 & 5.7751     & 0.359 & 1.83\\
F32 &	    	&       &      & 5.8243       & 0.388 & 5.02 & 5.8472	  & 0.275 & 3.20 &            &       &     \\
F33 &	    	&       &      & 5.9704       & 0.264 & 4.70 & 5.9629	  & 0.251 & 2.93 &            &       &     \\
F34 &	    	&       &      &	      &	      &      & 6.0293	  & 0.180 & 5.84 &            &       &     \\
F35 & 6.3502	& 0.190 & 5.70 & 6.3400       & 0.338 & 2.16 & 6.3214	  & 0.097 & 1.51 &            &       &     \\
F36 & 7.7763	& 0.218 & 5.25 & 7.7735       & 0.236 & 5.19 &       	  &	  &	 &	      &       &     \\
F37 &	    	&       &      &	      &	      &      & 7.8053	  & 0.211 & 1.72 &            &       &     \\
F38 &	    	&       &      & 8.8772       & 0.267 & 3.18 & 8.8711	  & 0.170 & 1.36 &            &       &     \\
F39 & 9.4524	& 0.378 & 3.32 & 9.4503       & 0.443 & 5.82 & 9.4543	  & 0.245 & 4.60 & 9.4597     & 0.371 & 1.05\\
F40 &        (*)&       &      & 9.7254       & 0.508 & 5.03 & 9.7276	  & 0.274 & 3.05 & 9.7485     & 0.454 & 4.65\\
F41 & 9.8131	& 0.397 & 0.71 & 9.8187       & 0.245 & 5.68 &       	  &	  &	 & 9.8237     & 0.193 & 5.41\\
F42 &10.2191	& 0.285 & 0.10 &10.1991       & 0.177 & 1.14 &10.2118	  & 0.186 & 1.83 &            &       &     \\
F43 &11.8583 (*)& 2.386 & 4.68 &11.8471 (*, S) & 1.146 & 3.46 &11.8468     & 0.615 & 1.27 &11.8704 (*) & 1.939& 4.02\\
F44 &	    	&       &      &11.8742       & 1.334 & 6.27 &11.8890 (S) & 0.189 & 0.02 &            &       &     \\
F45 &16.8948	& 0.357 & 0.96 &16.8838 (S)   & 0.208 & 1.63 &16.8865     & 0.234 & 1.15 &16.8919     & 0.422 & 0.98\\
\hline
Total&\multicolumn{3}{c}{T{\sc i}SAFT:135, P{\sc asper}: 15} & 
\multicolumn{3}{c}{T{\sc i}SAFT:103, P{\sc asper}: 9} & 
\multicolumn{3}{c}{T{\sc i}SAFT:76, P{\sc asper}: 8}  & 
\multicolumn{3}{c}{T{\sc i}SAFT:65, P{\sc asper}: 4}  \\
\hline
\end{tabular}}
\smallskip
(*) indicates that the frequency was also found by 
P{\sc asper}. (S)
means that the frequency was detected in the spectroscopy data by
Paper~II.
\end{table}