\begin{table}%t2
\par
\caption{\label{tab:phot2}Fundamental parameters found from photometric indices.}
\small
%\centering
\par
\begin{tabular}{r|c|ccc}
\hline\hline       
                        &  {$V-K$} & \multicolumn{3}{|c}{\str\ indices} \\  
 {HD} & \teff                      &      \teff & \logg & \feh \\
\hline 
49933 &  $6590\pm  60$ & $6630\pm90$ & $4.30\pm0.15$ & $-0.48\pm0.12$ \\
175726 &  $6030\pm  80$ & $5980\pm90$ & $4.68\pm0.15$ & $-0.21\pm0.10$ \\
181420 &  $6570\pm  60$ & $6660\pm90$ & $4.16\pm0.15$ & $-0.07\pm0.11$ \\
181906 &  $6360\pm 100$ & $6430\pm90$ & $4.31\pm0.15$ & $-0.20\pm0.11$ \\
 \hline                  
\end{tabular}
\end{table}