\begin{table}%t3
\caption {\label{table:omc}Stellar parameters ($i$, \top, \gop, \vsinio), corrected for the veiling and the effects of the fast rotation, the derived equatorial radius, and rotational velocity of
HD~175869 for different values of~\omc, where~$\Omega$ and~$\Omega_{\rm c}$
are the angular velocity
and its critical value, respectively.  
}
%\centerline
 {
\begin{tabular}{ccccccc}
\hline
\hline
\omc &$i$ & \top & \gop & \vsinio & $R_{{\rm eq}}$ & $f_{{\rm rot}}$ \\
     & ($\deg$) & (K) & (cgs) & (\kps) & $\rsol$& \cd\\
\hline \noalign{\smallskip}
0.80 &  58 & 12~500  & 3.52     & 168 &   6.8 & 0.58  \\
0.90 &  47 & 12~000  & 3.47     & 171 &   7.3 &  0.64 \\
0.95 &  44 & 12~000  & 3.40     & 180 &   8.6 &  0.60 \\
0.99 &  43 & 12~000  & 3.39     & 196 &   9.2 &   0.68\\
\hline
\end{tabular}}
\smallskip
The estimated errors in \top, \gop, \vsinio, equatorial radius, and rotational frequency are 10~$\deg$, 600~K, 
0.12~dex, 10~\kps, 2.4~$\rsol$, and 0.1~\cd, respectively.
\end{table}