\begin{table}%t2 
\caption {\label{table:7636wm_12_respol2_shift:period04:other}Detected frequencies (in \cd\ and $\mu$Hz), amplitude, and phases found in the residuals after prewhitening ${F}_{1}$ and its harmonics. }
%\centerline
 {
\begin{tabular}{ccccccccc}
\hline
\hline
\#       &Freq.  & Freq.& Ampl  & ${E}_{{\rm Ampl}}$ & Phase & ${E}_{{\rm Phase}}$ & SNR & Comments\\
 &\cd & $\mu$Hz & $\mu$mag &$\mu$mag & rad/2$\pi$ & & &$\leq$$1/T$\\
\hline
${F}_{2}$ &     		1.306 &    15.114 &       22.2 &    0.4 &    0.959 &    0.003 &    15.1 & $2 {F}_{1}$ \\
$ {F}_{{L}1}$ &    0.141 &    1.634 &       19.8 &    0.4 &    0.196 &    0.003 &    13.5 & \\
${F}_{ {L}2}$ &    0.170 &    1.971 &       19.8 &    0.4 &    0.076 &    0.003 &    13.5 &\\
${F}_{3}$ &     		2.000 &    23.152 &        12.5 &   0.4 &    0.786 &    0.005 &    8.5 & \\
${F}_{{L}3}$ &     0.085 &    0.989 &       15.0 &    0.4 &    0.920 &    0.004 &    10.2 &\\
${F}_{4}$ &    		 0.684 &    7.912 &       21.73 &    0.6 &    0.596 &    0.005 &    14.3 & ${F}_{3}-{F}_{2}$\\
${F}_{5}$ &     		2.475 &    28.644 &       10.68 &    0.4 &    0.817 &    0.006 &    7.3 &\\
${F}_{6}$ &     		0.601 &    6.959 &       9.79 &    0.4 &    0.349 &    0.006 &    6.7&${F}_{2}-{F}_{4}$\\
${F}_{7}$ &     		1.945 &    22.51 &       10.05 &    0.4 &    0.258 &    0.006 &    6.8 &$3{F}_{1}$\\
${F}_{8}$ &    		1.256 &    14.541 &        10.46 &    0.4 &    0.314 &    0.006 &    7.1 &$2{F}_{1}$\\
${F}_{9}$ &    		1.451 &    16.788 &       9.59 &    0.4 &    0.974 &    0.006 &    6.5 &\\
${F}_{10}$ &    		0.345 &    3.989 &       9.21 &    0.4 &    0.481 &    0.007 &    6.3 & $1/2{F}_{1}$\\
${F}_{11}$ &    		0.699 &    8.085 &       16.67 &    0.6 &    0.757 &    0.006 &    10.9 &${F}_{4}$\\
${F}_{12}$ &    		1.799 &    20.819 &        7.53 &    0.4 &    0.181 &    0.008 &    5.1 &${F}_{5}-{F}_{4}$\\
${F}_{13}$ &    		0.305 &    3.527 &       6.80 &    0.4 &    0.776 &    0.009 &    4.6 & $1/2{F}_{1}$\\
${F}_{14}$ &    		1.383 &    16.001 &       7.48 &    0.4 &    0.248 &    0.008 &    5.1 & $2{F}_{4}$\\
${F}_{15}$ &    		0.507 &    5.868 &       6.65 &    0.4 &    0.174 &    0.009 &    4.5 & ${F}_{5}-{F}_{4}-{F}_{1}$\\
${F}_{16}$ &    		0.769 &    8.898 &       7.20 &    0.4 &    0.683 &    0.009 &    4.9 & ${F}_{9}-{F}_{4}$\\
${F}_{17}$ &    		1.048 &    12.126 &       6.29 &    0.4 &    0.0269 &    0.01 &    4.3 & ${F}_{10}+{F}_{11}$\\
${F}_{18}$ &    		2.590 &    29.978 &       5.89 &    0.4 &    0.758 &    0.01 &    4.0 &$4{F}_{1}$\\
${F}_{19}$ &    		3.863 &    44.714 & 	    5.77 &    0.4 &    0.430 &    0.01 &    3.9 & $6{F}_{1}$\\
\hline
\end{tabular}}
\smallskip
The phase was calculated using the time reference HJD~=~245~4200.0. Idem as Table~\ref{table:7636wm_12_respol2_shift:period04:harmonic} for the errors. The signal-to-noise ratio obtained with the program \textit{pasper} is given in Col.~8. The last column indicates the interpretation for each frequency as independent, harmonic, or combination, following the present frequency resolution, which is $1/T=0.037$~\cd. Long-term frequencies are marked with ${F}_{{\rm L}}$. For details, see text.
\end{table}