\begin{table}%[!]%t5
\caption{\label{399}Radial-velocity measurements of E1-0399. CO stands for CORALIE at
 the Euler 120cm Swiss telescope.}
\begin{tabular}{lllll}
\hline \hline
JD-2~400~000.& $\phi$& RV& $\sigma$& Instr.\\
&&[km~s$^{-1}$]&[km~s$^{-1}$]&\\
\hline
54~477.734 & 0.86 & 43.05 &   0.08& CO\\
54~495.566 & 0.39 & 15.43 &   0.11& CO\\
\hline
\end{tabular}%\vspace*{0.5cm}
\end{table}