\begin{table}%t5
\par
\caption{\label{EqW}Comparison between the line abundances obtained for a set of \ion{Fe}{i} lines
calculated from equivalent widths measured with direct integration and a Gaussian approximation.}
\small\begin{tabular}{lcccc}
\hline \hline
 & \multicolumn{2}{c}{Direct integration} & \multicolumn{2}{c}{Gaussian measurements} \\
Wavelength & EqW  & Abundance & EqW  & Abundance \\
 \AA	   & m\AA &           & m\AA &           \\
\hline
5123.7200 &  60.30 & $-$5.05 &  61.31 & $-$5.02 \\
5127.3593 &  52.50 & $-$5.05 &  53.41 & $-$5.03 \\
5133.6885 &  87.60 & $-$5.06 &  87.23 & $-$5.06 \\
5139.4628 & 105.10 & $-$5.05 & 104.48 & $-$5.06 \\
5141.7393 &  53.20 & $-$5.05 &  54.11 & $-$5.03 \\
5142.9285 &  62.00 & $-$5.05 &  63.03 & $-$5.02 \\
5162.2729 &  85.60 & $-$5.05 &  84.42 & $-$5.07 \\
5165.4100 &  73.90 & $-$5.05 &  74.55 & $-$5.04 \\
5171.5964 &  98.20 & $-$5.05 &  99.20 & $-$5.03 \\
5184.2661 &  22.80 & $-$5.05 &  23.24 & $-$5.04 \\
5191.4550 &  98.80 & $-$5.05 &  98.57 & $-$5.05 \\
5192.3442 & 107.70 & $-$5.05 & 106.98 & $-$5.06 \\
5194.9418 &  82.90 & $-$5.05 &  84.00 & $-$5.02 \\
5602.9451 &  67.20 & $-$5.05 &  68.04 & $-$5.03 \\
5615.2966 &  24.00 & $-$5.05 &  24.30 & $-$5.04 \\
5615.6439 & 122.60 & $-$5.06 & 120.95 & $-$5.08 \\
5618.6327 &  15.70 & $-$5.05 &  16.10 & $-$5.03 \\
5620.4924 &   6.10 & $-$5.05 &   6.24 & $-$5.04 \\
5624.0220 &   7.80 & $-$5.04 &   7.74 & $-$5.05 \\
5624.5422 &  72.50 & $-$5.05 &  73.44 & $-$5.03 \\
5631.7310 &   6.30 & $-$5.04 &   6.39 & $-$5.04 \\
5633.9465 &  28.50 & $-$5.05 &  29.03 & $-$5.03 \\
5638.2621 &  31.00 & $-$5.05 &  31.58 & $-$5.03 \\
5640.3070 &   6.20 & $-$5.05 &   6.33 & $-$5.04 \\
5641.4340 &  17.50 & $-$5.05 &  17.88 & $-$5.03 \\
5655.4930 &  32.60 & $-$5.05 &  33.20 & $-$5.03 \\
\hline		        	       
Mean $\pm$ rms & & --$5.050 \pm 0.004$ & & --$5.040 \pm 0.016$\\							
\hline		        	       
\end{tabular} 
\end{table}