\begin{table}%t2
\caption{\label{ResultsTable}The input values of the simulated CB planets (``Examiner'' rows) and their respective solution (``Solver'' rows).}
\begin{tabular}{p{1.0cm} l c p{1cm} p{1.8cm} p{1.6cm} p{1.4cm} p{0.8cm} p{4.3cm}}
\hline\hline
Test dataset &	Attribute 		&	Detection\footnote{The possible detection levels are: ``+++'' (Strong and secure), ``++'' (Probable. Noisy), ``+'' (Weak detection) and ``no planet''.}&	Period \ [d]& Baricenter crossing \ [CoRoT JD]	& Depth (\mbox{primary}\footnote{The depth of the secondary transit is omitted since it is simply $J$ times the primary transit.}) [mmag]	&	In-transit points &	$\alpha_{\rm single}$	& Comment\\
\hline
\raisebox{-1.7ex}{Test0}	&	Examiner	&				&	13.54			&  2594.54					&	4.683			&	&			&\\
									&	Solver	&	+++		&	13.545		&	2594.525					&  4.768 		&	148 &	44.0		& Not blind.\\
\hline
\raisebox{-1.7ex}{Test1}	&	Examiner	&				&	12.673		& 	2563.567					& 2.749 			&	&		& \\
									&	Solver	&	+++		&	12.667		&	2595.251		 			& 2.494 			&	145 & 22.8		& A bug (since then fixed) caused the detected reference time to be when the planet crossed the baricenter \textit{behind} the EB system, causing a half-integer difference (2.5 periods) from the correct one.\\
\hline
\raisebox{-1.7ex}{Test2}	&	Examiner	&				&	13.08 		& 	2594.54					& 1.853			&	&		& \\
									&	Solver	&	+++		&	13.091		&	2594.513 				& 1.560 			&	248 &	18.6		& \\
\hline
\raisebox{-1.7ex}{Test3}	&	Examiner	&				&	17.748		& 	2597.54 					& 1.901			&	&		& \\
									&	Solver	&	+++		&	17.738		&	2597.571					& 1.349  		&	132&	11.7		& \\
\hline
\raisebox{-1.7ex}{Test4}	&	Examiner	&				&	12.673		& 	2563.567					& 2.749			&	&		& \\
									&	Solver	&	+++		&	12.652		&	2595.295				& 2.579 				&	143 &	23.4		& See comment to Test1\\
\hline
\raisebox{-1.7ex}{Test5}	&	Examiner		&	no planet&		--				& 		--						&	--		&	&			&\\
									&	Solver	&	no planet&		--				&		--						&  --			&	0 & 0	& A very weak signal was initially suspected before using the single-depth analysis. That periodogram peak completely disappeared when this feature was added and used.\\
\hline
\end{tabular}
\end{table}