\begin{table}%t1
\par
\caption{\label{model_param_table}Parameters adopted for the spot modelling of CoRoT-4a.}
%\centerline
{
\small\begin{tabular}{lrr}
\hline\hline
Parameter &  & Ref.$^{a}$\\
\hline
Star Mass ($M_{\odot}$) & 1.16 & A08  \\
Star Radius ($R_{\odot}$) & 1.17 & A08  \\
$T_{\rm eff}$ (K) & 6190 &  M08 \\ 
$a_{\rm p}$ & 0.334 & L09 \\
$b_{\rm p}$ & 1.032 & L09 \\
$c_{\rm p}$ & --0.381 & L09 \\ 
$P_{\rm rot}$ (d) & 9.20205 & A08 \\
$\epsilon$ & $1.10 \times 10^{-4}$ & L09 \\ 
Inclination (deg) & 90.0 & A08  \\
$c_{\rm s}$  & 0.681 & L09 \\
$c_{\rm f}$  & 0.115 & L04 \\ 
$Q$ & 4.5  & L08 \\ 
$\Delta t_{\rm f}$ (d) & 8.24037 & L09 \\ 
\hline
\end{tabular}}
~\\
$^{a}$ References: A08: Aigrain et~al. (2008); M08: Moutou et~al. (2008); L04: Lanza et~al. (2004); L09: present study.
\end{table}