\begin{table}%t9
\caption{\label{tab:zeeman}Expected values of $\sigma_{\rm B}$ for all six \cch(1$-$0) 
transitions in L1498 at the offset $(60,-40)$ for an hour of integration and 
a spectral resolution equal to 40~kHz.}
%\centerline
 {\begin{tabular}{ccccc}
\hline\hline
Comp. & $Z$ & $T^{*}_{\rm A}$ & $\Delta\nu_{\it FWHM}$ & $\sigma_{\rm B}$\\
No. & [Hz $\mu$G$^{-1}$] & [K] & [kHz] & [$\mu$G]\\
\hline
1 & 2.6 & 0.9 & 80 & 740\\
2 & 0.7 & 1.4 & 100& 2210\\
3 & 2.3 & 1.0 & 90 & 860\\
4 & 0.93& 1.1 & 95 & 1990\\
5 & 2.8 & 1.1 & 85 & 590\\
6 & 0.93& 0.9 & 75 & 1860\\
\hline
\end{tabular}}
\smallskip
See Table~\ref{tab:c2h10p} for component labels. 
\end{table}