\begin{table}%t2
%\centering
\par
\caption{\label{tab:model}The parameters used in the model. 
Numbers in parentheses refer to powers of ten. $N_{\rm H}$ is the total column density of protons ($N$(H) + 2 $N$(H$_2$)) and $A_{\rm v}$ is the visual extinction.}
\small \begin{tabular}{lclc}
\hline\hline
Gas parameter   &   & Dust  parameter &    \\
\hline
$n_{\rm H}$ (cm$^{-3}$) &  100 & $a_{\min}$ (cm)    & 3(--7)   \\
$T_{\rm gas}$  &  70 & $a_{\max}$ (cm) & 3(--5)  \\
$\zeta$ (s$^{-1}$) & 5(--17) & 
$q$  & 3.5   \\
$\chi$ (Draine unit) & 1 & 
material   & amorphous carbon   \\
D/H  & 1.5(--5) & $\gamma$  & 1  \\
C/H  & 1.34(--4) &  $G$ & 0.01   \\
O/H  & 3.19(--4) & total visual magnitude      & 1\\
N/H  & 7.5(--5) & $N_{\rm H}$ / $A_{\rm v}$ & 1.871(21) \scm /magnitude \\
S/H  & 1.86(--5)   &   $T_{\rm dust}$  &   fixed [8--20~K] \\
Fe/H & 1.5(--8) &    &   \\
\hline
\end{tabular}
\end{table}