\begin{table}%t7
\caption{\label{tab7}Pearson correlation coefficients of the fractal dimensions $D_{\rm 2d}$ between the unpreprocessed and the preprocessed photospheric magnetograms in the distinct data subsets.}          %\centering
\par
\begin{tabular}{c c c c}       
\hline \hline               
    & Data  & Correlation   & Corresponding   \\    
    & Subset & Coefficient   & Probability   \\   
\hline                       
Fully Inverted IVM & Pearson & 0.770 & $99\%$ \\
HINODE & Pearson & 0.989 & $99\%$ \\
Quicklook IVM & Pearson & 0.688 & $95\%$ \\
\hline                                 
\end{tabular} 
\end{table}