\begin{table}%t5
\par
\caption {\label{t5}Sensitivity of derived UVES abundances to the atmospheric parameters
  and EWs. We reported the error $\sigma_{\rm atm}$ caused by the
  uncertainties in the atmospheric parameters
  (${\Delta T_{\rm eff}}$, $\Delta$log~($g$), $\Delta {v_{\rm t}}$,
  and $\Delta$([A/H])), related to the error in EW measurements
  ($\sigma_{\rm EW}$), the squared sum of the two ($\sigma_{\rm tot}$), and the
  observed dispersion ($\sigma_{\rm obs}$) for each element.}
%\centering
\par
\begin{tabular}{ l r r r c c c c c c}
\hline\hline
\ & $\rm {\Delta T_{\rm eff}}$ [K] & $\Delta$log~($g$) & $\Delta \rm {v_{t}}$ [km $\rm {s^{-1}}$] & \
$\Delta$([A/H]) [dex]&$\sigma_{\rm {atm}}$ & $\sigma_{\rm {EW}}$ & $\sigma_{\rm {tot}}$ & $\sigma_{\rm {obs}}$\\
\hline
                      &$+50$        &$+0.14$ &$+0.13$  &$+0.10$  &      &       &      &     \\\hline
 ${\rm [O/Fe]}$       &--           &--      &--       &--       & --   & --    & 0.04 & 0.20   \\
 ${\rm [Na/Fe]}$      & $-$0.02     &$-$0.01 &$+$0.01  &$-$0.01  & 0.03 & 0.01  & 0.03 & 0.30   \\
 ${\rm [Mg/Fe]}$      & $-$0.03     &$+$0.00 &$+$0.01  &$-$0.01  & 0.03 & 0.02  & 0.04 & 0.11   \\
 ${\rm [Al/Fe]}$      & $-$0.03     &$-$0.01 &$+$0.02  &$-$0.01  & 0.04 & 0.06  & 0.07 & 0.31   \\
 ${\rm [Si/Fe]}$      & $-$0.05     &$+$0.01 &$+$0.01  &$+$0.01  & 0.05 & 0.01  & 0.05 & 0.03   \\
 ${\rm [Ca/Fe]}$      & $-$0.01     &$-$0.01 &$-$0.01  &$-$0.01  & 0.02 & 0.01  & 0.02 & 0.07   \\
 ${\rm [Sc/Fe]}$      & $+$0.03     &$+$0.00 &$+$0.00  &$+$0.00  & 0.03 & 0.03  & 0.04 & 0.04   \\
 ${\rm [Ti/Fe]_{TiI}}$ & $+$0.04    &$-$0.01 &$+$0.00  &$-$0.02  & 0.05 & 0.01  & 0.05 & 0.06   \\
 ${\rm [Ti/Fe]_{TiII}}$& $+$0.02    &$-$0.01 &$-$0.02  &$-$0.01  & 0.03 & 0.02  & 0.04 & 0.06   \\
 ${\rm [V/Fe]}$       & $+$0.03     &$+$0.00 &$+$0.03  &$-$0.01  & 0.04 & 0.01  & 0.04 & 0.10  \\
 ${\rm [Cr/Fe]}$      & $+$0.02     &$-$0.03 &$-$0.01  &$-$0.02  & 0.04 & 0.01  & 0.04 & 0.08   \\
 ${\rm [Fe/H]_{FeI}}$  & $+$0.07     &$+$0.00 &$-$0.02  &$-$0.01  & 0.07 & 0.06  & 0.09 & 0.10   \\
 ${\rm [Fe/H]_{FeII}}$ & $-$0.02     &$+$0.05 &$-$0.02  &$+$0.02  & 0.06 & 0.06  & 0.08 & 0.10  \\
 ${\rm [Ni/Fe]}$      & $-$0.01     &$+$0.00 &$+$0.01  &$+$0.00  & 0.01 & 0.01  & 0.01 & 0.04   \\
 ${\rm [Y/Fe]}$       & $+$0.03     &$-$0.01 &$-$0.02  &$+$0.00  & 0.04 & 0.01  & 0.04 & 0.27    \\
 ${\rm [Zr/Fe]}$      & $+$0.03     &$+$0.00 &$+$0.02  &$+$0.00  & 0.04 & 0.01  & 0.04 & 0.23   \\
 ${\rm [Ba/Fe]}$      & $+$0.05     &$-$0.01 &$-$0.09  &$+$0.00  & 0.10 & 0.03  & 0.10 & 0.23    \\
\hline
\end{tabular}
\end{table}