\begin{table}%t2
%\centering
\par
\caption{\label{BIGtable}Photometric data of the dwarf and subgiant stars of the
globular cluster NGC~6397. We also provide the signal-to-noise of the
spectra, the 3D and 1D H$\alpha$-based effective temperatures, 3D Li
abundances, and the equivalent widths and errors.
}
\begin{tabular}{lrrrrrrrrr}   
\hline
\hline 
Star Name & $V$ & $B-V$ & SNR & $T_{\rm eff,3D}$ & $T_{\rm eff,1D}$ & {\it EW} & $\delta {\it EW}^{a}$ & $\delta EW^{b}$ & $A$(Li)$_{\rm NLTE,3D}$ \\
          &     &       &     &   (K)	   &   (K)	    & (m\AA) & (m\AA) & (m\AA) & (dex) \\
\hline
MSS001253 & 17.48 & 0.612 &  84 & 6279 & 6032 & 32.89 & 2.06 & 3.15 & 2.34  \\
MSS001851 & 17.38 & 0.588 &  86 & 6278 & 6033 & 24.15 & 1.97 & 3.10 & 2.19  \\
MSS002016 & 17.37 & 0.576 & 107 & 6241 & 5971 & 22.32 & 1.79 & 2.48 & 2.13  \\
MSS002882 & 17.40 & 0.598 &  83 & 6299 & 6059 & 22.12 & 2.03 & 3.18 & 2.17  \\
MSS002984 & 17.40 & 0.627 &  84 & 6365 & 6118 & 24.06 & 2.05 & 3.14 & 2.25  \\
MSS003361 & 17.32 & 0.600 &  85 & 6482 & 6296 & 34.06 & 1.78 & 3.10 & 2.51  \\
MSS004052 & 17.36 & 0.586 & 115 & 6352 & 6099 & 30.99 & 1.69 & 2.31 & 2.37  \\
MSS004099 & 17.38 & 0.597 &  82 & 6265 & 6017 & 33.21 & 1.92 & 3.22 & 2.34  \\
MSS004509 & 17.50 & 0.597 &  84 & 6318 & 6081 & 31.94 & 2.17 & 3.17 & 2.36  \\
MSS004829 & 17.44 & 0.608 &  80 & 6268 & 6019 & 27.61 & 2.31 & 3.32 & 2.25  \\
MSS005245 & 17.30 & 0.596 & 115 & 6370 & 6127 & 28.38 & 1.78 & 2.31 & 2.34  \\
MSS005478 & 17.39 & 0.587 &  89 & 6229 & 5959 & 41.40 & 1.79 & 2.97 & 2.42  \\
MSS005528 & 17.34 & 0.588 &  90 & 6375 & 6137 & 25.08 & 1.94 & 2.96 & 2.28  \\
MSS005634 & 17.41 & 0.580 & 102 & 6327 & 6093 & 32.21 & 1.90 & 2.60 & 2.37  \\
MSS005657 & 17.31 & 0.584 &  92 & 6420 & 6218 & 38.46 & 2.23 & 2.87 & 2.52  \\
MSS005755 & 17.45 & 0.600 &  97 & 6170 & 5890 & 33.90 & 2.07 & 2.72 & 2.28  \\
MSS006049 & 17.43 & 0.581 &  83 & 6289 & 6046 & 21.07 & 0.60 & 3.19 & 2.14  \\
MSS006056 & 17.37 & 0.572 &  95 & 6406 & 6167 & 27.51 & 1.41 & 2.79 & 2.35  \\
MSS006236 & 17.49 & 0.590 &  90 & 6311 & 6069 & 24.79 & 2.49 & 2.96 & 2.23  \\
MSS006292 & 17.39 & 0.578 &  85 & 6354 & 6111 & 24.11 & 2.47 & 3.11 & 2.25  \\
MSS006442 & 17.46 & 0.592 &  85 & 6378 & 6133 & 27.19 & 2.16 & 3.10 & 2.32  \\
MSS006561 & 17.37 & 0.583 &  71 & 6259 & 6012 & 27.97 & 2.25 & 3.71 & 2.25  \\
MSS006632 & 17.40 & 0.606 &  78 & 6284 & 6039 & 43.34 & 2.24 & 3.41 & 2.49  \\
MSS006666 & 17.30 & 0.598 &  82 & 6258 & 6011 & 25.77 & 2.20 & 3.22 & 2.21  \\
MSS006761 & 17.48 & 0.594 & 100 & 6293 & 6050 & 36.64 & 2.01 & 2.65 & 2.41  \\
MSS006851 & 17.32 & 0.601 &  92 & 6144 & 5853 & 34.65 & 1.99 & 2.89 & 2.27  \\
MSS006924 & 17.35 & 0.578 &  86 & 6424 & 6219 & 24.63 & 2.03 & 3.09 & 2.31  \\
MSS007267 & 17.38 & 0.605 &  82 & 6386 & 6142 & 26.77 & 0.29 & 3.24 & 2.32  \\
MSS007413 & 17.37 & 0.573 &  95 & 6205 & 5932 & 29.16 & 1.89 & 2.80 & 2.23  \\
MSS007626 & 17.42 & 0.582 &  89 & 6314 & 6073 & 32.63 & 2.07 & 2.97 & 2.37  \\
MSS007823 & 17.39 & 0.597 &  96 & 6365 & 6112 & 25.90 & 0.75 & 2.76 & 2.29  \\
MSS007830 & 17.34 & 0.587 &  98 & 6390 & 6153 & 21.61 & 0.21 & 2.71 & 2.22  \\
MSS007874 & 17.41 & 0.591 &  70 & 6310 & 6072 & 32.99 & 2.52 & 3.79 & 2.37  \\
MSS008138 & 17.44 & 0.590 & 106 & 6314 & 6076 & 24.81 & 1.69 & 2.50 & 2.23  \\
MSS008427 & 17.41 & 0.582 &  80 & 6305 & 6063 & 33.80 & 1.96 & 3.31 & 2.38  \\
MSS013089 & 17.42 & 0.597 &  84 & 6281 & 6034 & 20.88 & 2.17 & 3.16 & 2.13  \\
MSS013492 & 17.48 & 0.618 &  95 & 6231 & 5961 & 29.25 & 1.97 & 2.78 & 2.25  \\
MSS013620 & 17.31 & 0.601 &  97 & 6215 & 5938 & 31.20 & 1.77 & 2.73 & 2.27  \\
MSS013907 & 17.44 & 0.600 &  90 & 6231 & 5962 & 30.52 & 1.22 & 2.93 & 2.27  \\
MSS014243 & 17.38 & 0.606 &  86 & 6295 & 6052 & 32.17 & 2.40 & 3.07 & 2.34  \\
MSS015161 & 17.50 & 0.609 &  79 & 6181 & 5901 & 31.05 & 2.43 & 3.37 & 2.24  \\
MSS015364 & 17.36 & 0.609 &  80 & 6444 & 6251 & 18.24 & 0.05 & 3.32 & 2.18  \\
MSS016174 & 17.36 & 0.589 &  80 & 6423 & 6218 & 31.74 & 2.09 & 3.32 & 2.43  \\
MSS016301 & 17.32 & 0.621 &  94 & 6259 & 6009 & 30.20 & 1.96 & 2.81 & 2.29  \\
MSS016358 & 17.47 & 0.602 &  76 & 6407 & 6170 & 30.22 & 2.33 & 3.47 & 2.39  \\
MSS016481 & 17.40 & 0.594 &  48 & 6078 & 5770 & 37.25 & 3.35 & 5.44 & 2.26  \\
MSS016718 & 17.41 & 0.584 &  86 & 6258 & 6010 & 21.23 & 2.23 & 3.09 & 2.12  \\
MSS016850 & 17.44 & 0.588 &  84 & 6372 & 6118 & 34.32 & 1.65 & 3.16 & 2.43  \\
MSS017006 & 17.40 & 0.590 &  70 & 6305 & 6066 & 29.76 & 2.47 & 3.76 & 2.31  \\
MSS017148 & 17.37 & 0.599 & 102 & 6323 & 6088 & 30.38 & 2.10 & 2.61 & 2.34  \\
MSS017355 & 17.33 & 0.588 & 125 & 6281 & 6036 & 33.90 & 1.67 & 2.12 & 2.36  \\
MSS018410 & 17.32 & 0.591 &  99 & 6320 & 6083 & 33.49 & 2.34 & 2.68 & 2.38  \\
MSS019380 & 17.42 & 0.587 &  77 & 6253 & 5989 & 33.22 & 2.03 & 3.45 & 2.33  \\
MSS019711 & 17.40 & 0.588 &  82 & 6255 & 5996 & 30.00 & 2.14 & 3.22 & 2.28  \\
MSS019748 & 17.50 & 0.598 &  89 & 6386 & 6142 & 35.23 & 2.32 & 2.98 & 2.46  \\
MSS019966 & 17.48 & 0.592 &  77 & 6360 & 6114 & 28.85 & 2.10 & 3.44 & 2.34  \\
\hline
MSS020053 & 17.48 & 0.617 &  63 & 6377 & 6129 & 27.29 & 2.43 & 4.21 & 2.32  \\
MSS020239 & 17.44 & 0.590 &  62 & 6115 & 5824 & 32.65 & 2.96 & 4.25 & 2.22  \\
MSS020289 & 17.45 & 0.603 & 100 & 6349 & 6109 & 35.75 & 2.32 & 2.66 & 2.44  \\
MSS020400 & 17.42 & 0.604 & 116 & 6372 & 6126 & 26.84 & 1.98 & 2.29 & 2.31  \\
MSS020449 & 17.42 & 0.590 &  69 & 6248 & 5982 & 28.55 & 2.15 & 3.84 & 2.25  \\
MSS020824 & 17.32 & 0.574 &  89 & 6381 & 6141 & 26.87 & 1.87 & 2.98 & 2.32  \\
MSS020882 & 17.48 & 0.582 &  65 & 6233 & 5971 & 26.68 & 2.35 & 4.08 & 2.21  \\
MSS024313 & 17.38 & 0.597 &  78 & 6389 & 6145 & 35.88 & 2.10 & 3.39 & 2.47  \\
MSS024953 & 17.46 & 0.603 &  93 & 6027 & 5704 & 24.28 & 2.28 & 2.86 & 2.01  \\
MSS025117 & 17.31 & 0.591 &  91 & 6260 & 6013 & 23.43 & 1.90 & 2.90 & 2.17  \\
MSS025164 & 17.43 & 0.596 &  86 & 6251 & 5986 & 22.38 & 1.04 & 3.10 & 2.14  \\
MSS025647 & 17.31 & 0.597 & 121 & 6400 & 6160 & 34.88 & 1.68 & 2.20 & 2.46  \\
MSS026667 & 17.45 & 0.577 &  90 & 6283 & 6036 & 38.17 & 2.31 & 2.94 & 2.42  \\
MSS029201 & 17.41 & 0.627 &  80 & 6083 & 5776 & 22.67 & 1.90 & 3.30 & 2.02  \\
MSS029608 & 17.48 & 0.585 &  80 & 6192 & 5910 & 32.80 & 2.68 & 3.31 & 2.28  \\
MSS036470 & 17.50 & 0.610 &  77 & 6319 & 6083 & 34.19 & 2.20 & 3.44 & 2.39  \\
MSS036731 & 17.35 & 0.595 & 101 & 6414 & 6183 & 24.50 & 1.91 & 2.63 & 2.30  \\
MSS037695 & 17.40 & 0.571 &  66 & 6260 & 6010 & 25.19 & 2.19 & 4.01 & 2.20  \\
MSS037993 & 17.45 & 0.601 &  95 & 6290 & 6050 & 39.23 & 1.84 & 2.79 & 2.44  \\
MSS038318 & 17.36 & 0.584 & 100 & 6237 & 5975 & 29.88 & 1.88 & 2.64 & 2.27  \\
MSS044623 & 17.40 & 0.587 &  89 & 6283 & 6039 & 23.78 & 1.88 & 2.97 & 2.19  \\
MSS047718 & 17.48 & 0.592 &  69 & 6235 & 5967 & 34.07 & 2.90 & 3.83 & 2.33  \\
MSS049487 & 17.43 & 0.598 &  71 & 6222 & 5948 & 28.61 & 2.11 & 3.73 & 2.23  \\
SGB001167 & 15.94 & 0.587 & 108 & 6339 & 6213 & 25.91 & 1.73 & 2.46 & 2.29  \\
SGB001953 & 15.96 & 0.604 &  86 & 6361 & 6220 & 30.33 & 2.06 & 3.09 & 2.39  \\
SGB002243 & 15.94 & 0.602 &  91 & 6286 & 6162 & 37.28 & 0.19 & 2.90 & 2.43  \\
SGB002302 & 15.89 & 0.614 & 120 & 6236 & 6112 & 41.04 & 0.08 & 2.22 & 2.44  \\
SGB002675 & 15.88 & 0.603 & 109 & 6232 & 6109 & 36.24 & 1.53 & 2.44 & 2.38  \\
SGB002902 & 15.95 & 0.578 & 102 & 6205 & 6078 & 29.19 & 1.79 & 2.61 & 2.25  \\
SGB002930 & 15.95 & 0.584 & 111 & 6126 & 5994 & 36.83 & 1.64 & 2.39 & 2.31  \\
SGB003140 & 15.95 & 0.580 &  77 & 6100 & 5963 & 31.59 & 2.73 & 3.42 & 2.21  \\
SGB003332 & 15.88 & 0.608 &  69 & 6161 & 6038 & 43.92 & 2.64 & 3.82 & 2.42  \\
SGB003371 & 15.96 & 0.579 &  94 & 6380 & 6236 & 36.79 & 1.91 & 2.82 & 2.50  \\
SGB003553 & 15.86 & 0.621 &  82 & 6059 & 5916 & 48.03 & 2.25 & 3.22 & 2.39  \\
SGB003556 & 15.90 & 0.615 &  68 & 6161 & 6036 & 39.42 & 2.25 & 3.88 & 2.37  \\
SGB003678 & 15.91 & 0.589 & 117 & 6164 & 6038 & 35.58 & 1.71 & 2.27 & 2.32  \\
SGB003852 & 15.95 & 0.585 &  47 & 6018 & 5870 & 34.99 & 4.16 & 5.61 & 2.20  \\
SGB003854 & 15.89 & 0.603 & 104 & 6362 & 6223 & 34.34 & 1.62 & 2.54 & 2.45  \\
SGB003930 & 15.95 & 0.582 & 106 & 6267 & 6126 & 30.19 & 1.88 & 2.51 & 2.31  \\
SGB004063 & 15.84 & 0.629 &  68 & 6114 & 5986 & 50.36 & 2.35 & 3.90 & 2.46  \\
SGB004228 & 15.87 & 0.613 &  98 & 6111 & 5980 & 45.68 & 1.82 & 2.72 & 2.41  \\
SGB004239 & 15.84 & 0.596 & 118 & 6041 & 5897 & 35.74 & 1.84 & 2.24 & 2.23  \\
SGB004288 & 15.93 & 0.584 &  65 & 6435 & 6297 & 34.79 & 2.55 & 4.05 & 2.51  \\
SGB004474 & 15.86 & 0.603 & 110 & 6134 & 6009 & 38.83 & 1.85 & 2.40 & 2.34  \\
SGB004549 & 15.94 & 0.588 &  90 & 6255 & 6129 & 26.77 & 1.97 & 2.96 & 2.25  \\
SGB004699 & 15.83 & 0.613 &  95 & 6245 & 6119 & 36.03 & 2.03 & 2.80 & 2.39  \\
SGB004904 & 15.84 & 0.598 &  68 & 6254 & 6131 & 48.52 & 3.19 & 3.86 & 2.55  \\
SGB005126 & 15.88 & 0.602 &  85 & 6151 & 6026 & 49.90 & 0.35 & 3.12 & 2.48  \\
SGB005198 & 15.89 & 0.596 &  75 & 6097 & 5960 & 44.66 & 2.40 & 3.52 & 2.38  \\
SGB005333 & 15.88 & 0.608 & 106 & 6163 & 6036 & 34.28 & 1.58 & 2.50 & 2.30  \\
SGB005417 & 15.94 & 0.572 &  90 & 6259 & 6134 & 32.01 & 1.78 & 2.96 & 2.34  \\
SGB005556 & 15.82 & 0.620 & 110 & 6114 & 5987 & 56.41 & 1.61 & 2.41 & 2.52  \\
\hline
SGB005765 & 15.84 & 0.600 &  99 & 6199 & 6073 & 21.75 & 1.65 & 2.66 & 2.11  \\
SGB005947 & 15.92 & 0.588 &  95 & 6217 & 6092 & 36.11 & 1.86 & 2.78 & 2.37  \\
SGB006102 & 15.86 & 0.582 &  70 & 6363 & 6222 & 26.95 & 3.05 & 3.78 & 2.33  \\
SGB006281 & 15.89 & 0.619 & 122 & 6161 & 6037 & 25.36 & 1.77 & 2.17 & 2.15  \\
SGB006305 & 15.86 & 0.600 &  96 & 6232 & 6110 & 39.47 & 2.03 & 2.78 & 2.42  \\
SGB006463 & 15.93 & 0.594 & 141 & 6284 & 6159 & 40.38 & 1.55 & 1.88 & 2.47  \\
SGB006585 & 15.97 & 0.577 & 109 & 6382 & 6237 & 28.64 & 1.65 & 2.44 & 2.37  \\
SGB006625 & 15.84 & 0.603 &  88 & 6135 & 6012 & 49.56 & 2.04 & 3.02 & 2.47  \\
SGB006673 & 15.96 & 0.586 &  98 & 6167 & 6038 & 31.72 & 1.81 & 2.72 & 2.26  \\
SGB007322 & 15.95 & 0.579 & 108 & 6221 & 6089 & 34.99 & 1.91 & 2.45 & 2.35  \\
SGB007495 & 15.84 & 0.591 &  88 & 6059 & 5923 & 43.71 & 1.96 & 3.01 & 2.34  \\
SGB007501 & 15.86 & 0.579 &  86 & 6135 & 6008 & 33.25 & 2.17 & 3.10 & 2.26  \\
SGB007624 & 15.80 & 0.627 &  64 & 5932 & 5761 & 55.59 & 2.40 & 4.13 & 2.37  \\
SGB007674 & 15.89 & 0.594 &  75 & 6115 & 5985 & 43.60 & 2.50 & 3.54 & 2.38  \\
SGB008019 & 15.87 & 0.575 & 113 & 6206 & 6081 & 41.02 & 1.54 & 2.34 & 2.42  \\
SGB008043 & 15.92 & 0.599 & 117 & 6276 & 6148 & 34.27 & 1.81 & 2.26 & 2.38  \\
SGB008308 & 15.97 & 0.597 & 101 & 6333 & 6186 & 35.85 & 1.94 & 2.62 & 2.45  \\
SGB008491 & 15.90 & 0.577 &  92 & 6320 & 6175 & 36.52 & 1.88 & 2.87 & 2.45  \\
SGB008808 & 15.91 & 0.572 & 100 & 6217 & 6094 & 34.55 & 1.61 & 2.65 & 2.34  \\
SGB013359 & 15.78 & 0.629 & 129 & 6077 & 5943 & 49.96 & 1.63 & 2.06 & 2.43  \\
SGB014992 & 15.95 & 0.571 & 100 & 6064 & 5925 & 35.61 & 1.66 & 2.65 & 2.24  \\
SGB015032 & 15.93 & 0.585 &  66 & 6061 & 5921 & 35.64 & 2.56 & 3.99 & 2.24  \\
SGB015177 & 15.93 & 0.579 & 102 & 6380 & 6252 & 30.54 & 1.56 & 2.60 & 2.40  \\
SGB015392 & 15.96 & 0.586 &  85 & 6354 & 6211 & 37.14 & 1.95 & 3.13 & 2.48  \\
SGB015418 & 15.82 & 0.614 &  98 & 5951 & 5780 & 34.30 & 1.68 & 2.70 & 2.14  \\
SGB015847 & 15.81 & 0.610 & 131 & 6101 & 5966 & 39.99 & 1.80 & 2.03 & 2.33  \\
SGB016013 & 15.82 & 0.590 &  75 & 6080 & 5945 & 44.61 & 2.31 & 3.55 & 2.37  \\
SGB016363 & 15.95 & 0.577 &  71 & 6092 & 5955 & 32.63 & 2.35 & 3.74 & 2.22  \\
SGB016701 & 15.83 & 0.615 & 109 & 6141 & 6019 & 47.29 & 1.45 & 2.44 & 2.45  \\
SGB016858 & 15.98 & 0.572 &  82 & 6387 & 6244 & 28.49 & 1.94 & 3.22 & 2.37  \\
SGB016871 & 15.73 & 0.628 & 139 & 6010 & 5869 & 60.50 & 1.54 & 1.91 & 2.48  \\
SGB016936 & 15.91 & 0.602 & 117 & 6172 & 6045 & 37.78 & 1.69 & 2.26 & 2.35  \\
SGB017040 & 15.74 & 0.628 & 114 & 6002 & 5859 & 48.31 & 1.58 & 2.33 & 2.35  \\
SGB017100 & 15.83 & 0.612 &  51 & 5703 & 5506 & 43.71 & 3.35 & 5.16 & 2.06  \\
SGB017116 & 15.96 & 0.589 &  82 & 6124 & 5988 & 35.34 & 1.84 & 3.24 & 2.29  \\
SGB018051 & 15.93 & 0.575 &  88 & 6264 & 6137 & 35.09 & 1.96 & 3.02 & 2.39  \\
SGB018096 & 15.92 & 0.585 &  96 & 6214 & 6089 & 37.00 & 2.04 & 2.75 & 2.38  \\
SGB018128 & 15.84 & 0.621 &  90 & 6153 & 6031 & 46.31 & 1.76 & 2.95 & 2.45  \\
SGB018930 & 15.88 & 0.606 &  92 & 6179 & 6057 & 36.31 & 1.86 & 2.87 & 2.34  \\
SGB019686 & 15.89 & 0.591 & 131 & 6365 & 6225 & 34.16 & 1.54 & 2.03 & 2.45  \\
SGB019890 & 15.95 & 0.607 & 106 & 6146 & 6018 & 44.88 & 1.78 & 2.49 & 2.42  \\
SGB020001 & 15.76 & 0.613 & 124 & 5976 & 5831 & 57.08 & 1.46 & 2.15 & 2.42  \\
SGB020304 & 15.84 & 0.580 & 100 & 6248 & 6124 & 39.57 & 1.75 & 2.66 & 2.44  \\
SGB024422 & 15.81 & 0.608 & 101 & 6075 & 5939 & 48.97 & 1.63 & 2.62 & 2.41  \\
SGB024914 & 15.95 & 0.602 &  72 & 6235 & 6109 & 27.78 & 2.35 & 3.68 & 2.25  \\
SGB025290 & 15.92 & 0.582 & 103 & 6272 & 6146 & 38.43 & 1.81 & 2.57 & 2.44  \\
SGB025764 & 15.96 & 0.584 &  89 & 6245 & 6116 & 28.50 & 1.60 & 2.99 & 2.27  \\
SGB026642 & 15.81 & 0.606 &  62 & 6160 & 6035 & 39.36 & 2.67 & 4.24 & 2.37  \\
SGB029317 & 15.79 & 0.603 &  96 & 6001 & 5855 & 50.76 & 1.93 & 2.76 & 2.38  \\
SGB029417 & 15.77 & 0.619 &  82 & 6034 & 5893 & 38.45 & 1.87 & 3.23 & 2.26  \\
SGB030350 & 15.76 & 0.619 &  62 & 6178 & 6056 & 54.06 & 2.62 & 4.29 & 2.55  \\
SGB030403 & 15.91 & 0.613 & 100 & 6389 & 6246 & 36.51 & 1.91 & 2.64 & 2.50  \\
SGB031394 & 15.96 & 0.572 &  92 & 6362 & 6222 & 32.30 & 1.81 & 2.88 & 2.42  \\
SGB032079 & 15.78 & 0.625 &  89 & 6163 & 6041 & 43.98 & 1.88 & 2.97 & 2.43  \\
SGB036901 & 15.95 & 0.606 &  82 & 6208 & 6084 & 46.15 & 1.91 & 3.21 & 2.48  \\
\hline
\end{tabular}
\par
\smallskip
$^{a}$ Error of the equivalent width measurements estimated 
from a fitting routine that uses as free parameters 
the velocity shift, the continuum location, and the equivalent width
of the Li line.
$^{b}$ Error of the equivalent width associated to the
signal-to-noise ratio and the wavelength dispersion of the spectra,
derived using Cayrel's formula \citep{cayrel88}.
\end{table}