\begin{table}%t1 
\par
\caption{\label{tab1}IBIS/ISGRI observations log of IGR~J19405-3016. }
\small
%\centerline
 {\begin{tabular}{ccccccc}
\hline \hline
Revs. &  Date  &  Expo.& SCW&Flux  &Sig.\\
 &  MJD  &  ks & &mCrab &$\sigma$ \\
\hline
0056-0244 & 52729-53291 & 262 & 146  &1.5~$\pm$~0.3 &4.9\\
0258-0371 & 53332-53672 & 218  & 129  &1.4~$\pm$~0.4&3.5\\
0416-0498 &53805-54050 & 879 & 275 &1.5~$\pm$~0.2&7.8\\
0543-0664 & 54184-54547 & 17& 16 &$<$3.3&0.0\\
0056-0664 & 52729-54547 & 1376& 566 &1.40~$\pm$~0.15&9.4\\
\hline
\end{tabular}}
\par
\smallskip
Note: {the flux and the significance are presented in the energy band \mbox{20--60}~keV for the data  in which  the source was within an offset angle of  10~degrees.  The error bars are 1$\sigma$ and the upper limit is 2$\sigma$.}
\par
\end{table}