\begin{table}%t2
  \caption{\label{tab2}Label, coordinates, and $B$-band magnitudes of the objects identified in the \forstwo\ image (Fig.~\ref{fig2}; middle).}
  %\centerline
{
\par
\begin{tabular}{llll} 
 \hline\hline\noalign{\smallskip}
ID & $\alpha_{\rm J2000} ^{\rm (hms)}$ &  $\delta_{\rm J2000}^{(\circ ~\prime~\prime\prime)}$ & $B$ 	\\  \hline 
 X &  04 20 01.94  & $-50$ 22 47.75 &  27.5 $\pm$ 0.3 \\
 A &  04 20 02.10 & $-50$ 22 42.60   &  24.35 $\pm$ 0.05\\ 
 D &  04 20 01.59 & $-50$ 22 43.17  &  24.95 $\pm$ 0.05\\
 E  &  04 20 01.57 & $-50$ 22 48.75 &  25.37 $\pm$ 0.07\\       
 H &  04 20 02.28 & $-50$ 22 46.30  &  26.49 $\pm$ 0.10 \\ \hline          
\end{tabular}}\medskip
\par
Coordinate uncertains are derived from our astrometric calibration (Sect. 2.3).  A photometry calibration error of 0.05 magnitudes is assumed (Sect. 2.2).
\end{table}