\begin{table} %t2
\caption{\label{tab:obslog} Observation log of the MOST 85~Peg runs in 2005 and 2007.} 
 {                   
\begin{tabular}{l c c}                
\hline\hline
Observation run					&	2005			&		2007 						\\ 
\hline
Start date (HJD-2~451~545)		&	2085.43			&		2830.81 					\\ 
End date (HJD-2~451~545)			&	2111.01			&		2842.50						\\ 
Total obs. time (d)				&	25.58			&		11.69						\\ 
Number of exposures				&	34~323			&		5738						\\ 
Duty cycle (\%)					&	85				&		14							\\ 
Exposure time (s)				&	50				&		13.25 [53]$^{i}$	\\
Sampling time (s)				&	55				&		25 [100]					\\
Point-to-point scatter (mmag)	&	0.48			&		0.83 [0.51]					\\		
\hline
\end{tabular} }
\medskip
\par
$^{i}$ Values in brackets 
for the 2007 run correspond to the light curve with 4 datapoint bins (to make 
the scatter comparable to the 2005 run). 
\end{table}