\begin{table}%t2
\caption{\label{om-fluxes}Fluxes in the OM filters obtained using aperture photometry.}
%\centerline
{\small
 \begin{tabular}{lcc}
  \hline\hline
  Filter & Effective  wavelength  & Flux \\
         & (\AA)                  & ($10^{-14}$~\funitsa) \\
  \hline 		     	     
  $U$      & 3440                   & $1.05\pm0.01$ \\
  $UVW1$   & 2910                   & $1.24\pm0.01$$^{a}$ \\
  $UVM2$   & 2310                   & $1.24\pm0.02$$^{a}$ \\
  $UVW2$   & 2120                   & $1.58\pm0.05$$^{a}$ \\
  \hline  
\end{tabular}}\smallskip
\par
$^{a}$ Fluxes are the mean values of the two exposures on each filter.
\end{table}