\begin{table}%t1
\caption{\label{tab:obs}Details of the GMRT observations.}
%\centerline
{\small
\begin{tabular}{cccccccc}
\hline\hline
Source name & Pointing RA and Dec & $d$ & $\nu$ &  $\Delta \nu$ & Obs. time  & HPBW, PA  &   rms      \\ [1mm]
 (GMRT -)   &  (h, m, s ~~and~~  $^{\circ}$, $^{\prime}$, $^{\prime \prime}$)  &  ($^{\prime}$) &  (MHz) & (MHz) & (min)  &  ($^{\prime \prime} \times^{\prime \prime}$, $^{\circ}$) & (mJy b$^{-1}$) \\
\hline
J0902+2044, J0902+2045 & 09 00 45.9 \hspace{0.35cm} +20 55 13 & 27 &  610 &  32 &   80 & $6.5\times 4.5$, 80 & 60 \\
J1455+2209 & 14 57 15.2 \hspace{0.35cm} +22 20 30 & 22 &   610 & 32 & 100 & $6.1\times 4.1$, 39 & 60  \\
J0154+3627 & 01 52 50.0 \hspace{0.35cm} +36 09 00 & 32 & 327 & 16$^*$ & 270 & $12.2\times 8.7$, 87 & 440 \\
\hline
\end{tabular}}
\par
\medskip
$*$ The observations were carried out using a total bandwidth of 32~MHz (USB+LSB), but only the USB dataset was used for the analysis.
\end{table}