\begin{table}
\caption{NIR photometry of SN~2003hv.} \label{tab:VLTnirPhot}
\par
%\centerline
{\begin{tabular}{ccclcccc}
\hline\hline
Date & MJD$^a$ &Phase & Telescope & $Y$ & $J$$^b$ & $H$ & $K_{s}$ \\
(UT)  &  (days) & (days)    &                      &(mag)   &(mag)  &  (mag)   &  (mag)      \\
\hline
2003 09 10  &   52892.37  &  1.2   &  CTIO 1.3~m  &  13.252(0.015)   &  13.081(0.015)   &  13.286(0.015)  & 13.100(0.018)   \\
2003 09 14  &   52896.28  &  5.1   &  CTIO 1.3~m   &  13.591(0.015)   &  13.792(0.015)   &  13.423(0.015)  & 13.378(0.021)   \\
2003 09 17  &   52899.28  &  8.1   &  CTIO 1.3~m   &  13.716(0.015)   &  14.435(0.015)   &  13.502(0.015)  & 13.529(0.026)   \\
2003 09 24  &   52906.31  & 15.1   &  CTIO 1.3~m   &  13.403(0.015)   &  14.491(0.015)   &  13.202(0.015)  & 13.211(0.018)   \\
2003 09 28  &   52910.26  & 19.1   &  CTIO 1.3~m   &  13.031(0.015)   &  14.179(0.015)   &  13.112(0.015)  & 13.189(0.022)   \\
2003 10 02  &   52914.20  & 23.0   &  CTIO 1.3~m   &  12.845(0.016)   &  14.000(0.018)   &  13.283(0.020)  & 13.216(0.073)   \\
2003 10 05  &   52917.25  & 26.1   &  CTIO 1.3~m   &  13.025(0.015)   &  14.306(0.015)   &  13.546(0.015)  & 13.524(0.020)   \\
2003 10 08  &   52920.24  & 29.0   &  CTIO 1.3~m   &  13.255(0.015)   &  14.657(0.015)   &  13.799(0.015)  & 13.796(0.026)   \\
2003 10 11  &   52923.22  & 32.0   &  CTIO 1.3~m   &  13.439(0.015)   &  14.980(0.015)   &  13.958(0.015)  & 13.936(0.022)   \\
2003 10 14  &   52926.25  & 35.1   &  CTIO 1.3~m   &  13.650(0.015)   &  15.236(0.016)   &  14.145(0.016)  & $\ldots$ \\
2003 10 17  &   52929.22  & 38.0   &  CTIO 1.3~m   &  13.844(0.015)   &  15.519(0.015)   &  14.273(0.015)  & 14.116(0.026)   \\
2003 10 20  &   52932.17  & 41.0   &  CTIO 1.3~m   &  14.037(0.015)   &  15.725(0.017)   &  14.431(0.016)  & 14.306(0.024)   \\
2003 10 24  &   52936.21  & 45.0   &  CTIO 1.3~m   &  14.468(0.015)   &  16.310(0.023)   &  14.770(0.018)  & $\ldots$ \\
2003 11 03  &   52946.21  & 55.0   &  CTIO 1.3~m   &  14.912(0.015)   &  16.790(0.036)   &  15.041(0.020)  & 15.060(0.048)   \\
2003 11 10  &   52953.22  & 62.0   &  CTIO 1.3~m   &  15.207(0.017)   &  17.088(0.065)   &  15.420(0.037)  & $\ldots$ \\
2004 08 18        & 53235.37 &  344.2 & VLT Antu  & $\ldots$   &  20.394(0.140)  & $\ldots$ &  $\ldots$    \\
2004 08 29        & 53246.31 &  355.1 & VLT Antu  & $\ldots$   &  $\ldots$  & 19.977(0.106)  &   20.221(0.216)      \\
2004 08 30        & 53247.28 &  356.1 & VLT Antu  & $\ldots$   & 20.078(0.122)   & $\ldots$ & 20.303(0.224)   \\
2005 01 24        & 53394.06 &  502.9 & VLT Antu  & $\ldots$   &  $\ldots$  & 20.163(0.138) &  $>$20.700   \\
2005 02 24        & 53425.99 &  534.8 & VLT Antu  & $\ldots$   &  $\ldots$  & $\ldots$ &    $>$20.700  \\
2005 02 27        & 53428.99 &  537.8 & VLT Antu  & $\ldots$   &  $\ldots$  & 20.495(0.146) &  $\ldots$    \\
2005 02 28        & 53429.99 &  538.8 & VLT Antu  & $\ldots$   &  21.087(0.144)  & $\ldots$ &  $\ldots$    \\
2005 10 14$^c$    & 53657.07 &  765.9 & VLT Antu  & $\ldots$   &  $>$22.310  & $>$22.000 &  $\ldots$    \\
2005 11 03        & 53677.31 &  786.1 & {\it HST} NICMOS$^d$ & $\ldots$   &  $\ldots$  & 22.691(0.051) &   $\ldots$ \\
\hline 
\end{tabular}}
$^a~$All images obtained the same night are referred to a mean MJD. \\
$^b~$A $J$ filter was used at the CTIO 1.3~m telescope, while $J_s$
was used at the VLT.\\
$^c~$All images obtained on October 13--15  are averaged here. \\
$^d~$Vega magnitudes in the {\it HST} filter system ($F160W$).
\end{table}