\begin{table} %t5
\caption{Calibrated NIR magnitudes for local comparison stars in
Fig.~\ref{locseq}.} \label{tab:NIRsequence} 
%\centerline
{\begin{tabular}{ccccc}
\hline\hline
Star & $Y$$^a$ & $J$ & $H$ & $K_s$  \\
\hline
2     & 16.103(0.017)  & 15.792(0.011) &  15.295(0.011) &   14.927(0.031) \\
3     & 12.842(0.013)  & 12.501(0.009)  & 11.868(0.013)  &  11.732(0.017) \\
\hline 
\end{tabular}} 
$^a~$There can be an associated systematic uncertainty of 0.03 mag in   the $Y$-band calibration \citep{2004AJ....127.1664K}. 
\end{table}