\begin{table}%t7
\caption{The basic parameters of the mass decomposition -- the
  pseudo-isothermal halo model.}
\label{Massmodelsiso}
%\centerline
{
\begin{tabular}{lcccccccccc}
  \hline
  \hline
  \noalign{\smallskip}
& \multicolumn{5}{c}{ISO full} & \multicolumn{5}{c}{ISO small}\\
Parameter & $\rho_0$ & $\Delta \rho_0$ & $r_{\rm c}$ & $\Delta r_{\rm c}$ & $\chi^2_{\rm red}$ & $\rho_0$ & $\Delta \rho_0$ & $r_{\rm c}$ & $\Delta r_{\rm c}$ & $\chi^2_{\rm red}$\\
${\rm [Unit]}$ & $[10^{-3} M_\odot~{\rm pc}^{-3}]$ & $[10^{-3}
M_\odot~{\rm pc}^{-3}]$ & [kpc] & [kpc] & & $[10^{-3}
  M_\odot~{\rm pc}^{-3}]$ & $[10^{-3} M_\odot~{\rm pc}^{-3}]$ & [kpc] & [kpc]\\
  & (1) & (2) & (3) & (4) & (5) & (6) & (7) & (8) & (9) & (10)\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{NGC~2366}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 56.66 & 10.42 & 0.94 & 0.11 & 27.82 & 32.95 & 1.33 & 1.58 &
  0.05 & 1.79\\
  Min.-disc~+~gas & 53.12 & 14.46 & 0.77 & 0.13 & 30.27 & 27.54 & 1.02 &
  1.44 & 0.04 & 0.88\\
  Max.-disc & 25.28 & 9.82 & 0.92 & 0.22 & 24.99 & 11.27 & 0.72 & 2.23 & 0.14 & 1.24\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{ESO~059-G001}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 67.08 & 3.18 & 1.48 & 0.06 & 0.84 & \dots & \dots & \dots & \dots & \dots\\
  Min.-disc~+~gas & 62.98 & 3.58 & 1.49 & 0.07 & 1.10 & \dots & \dots & \dots & \dots & \dots\\
  Max.-disc & 25.70 & 5.37 & 3.03 & 0.76 & 12.52 & \dots & \dots & \dots & \dots & \dots\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{ESO~215-G?009}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 77.74 & 10.73 & 1.27 & 0.11 & 18.42 & 71.67 & 9.27 & 1.35 & 0.12
  & 15.67\\
  Min.-disc~+~gas & 98.86 & 15.22 & 1.01 & 0.10 & 16.47 & 89.34 & 11.62 &
  1.10 & 0.09 & 11.77\\
  Max.-disc & 34.27 & 8.49 & 1.47 & 0.24 & 19.18 & 28.47 & 6.10 & 1.71 & 0.26 & 14.44\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{NGC~4861}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 13.98 & 1.58 & 2.22 & 0.18 & 4.29 & 11.06 & 0.70 & 3.04 & 0.22 & 1.00\\
  Min.-disc~+~gas & 9.67 & 1.29 & 2.45 & 0.24 & 3.91 & 8.75 & 0.98 & 2.90 & 0.35 & 1.72\\
  Max.-disc & 4.85 & 1.13 & 3.93 & 0.81 & 10.40 & 3.95 & 1.48 & 7.10 & 7.19 & 14.21\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{NGC~5408}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 9.22 & 2.11 & 3.36 & 0.68 & 20.68 & 6.69 & 0.87 & 6.37 & 1.66 &
  6.85\\
  Min.-disc~+~gas & 6.98 & 1.76 & 3.70 & 0.87 & 18.13 & 4.94 & 0.78 & 8.64 &
  4.05 & 7.24\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{IC~5152}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 378.79 & 40.76 & 0.37 & 0.02 & 1.94 & 389.45 & 40.23 & 0.36 &
  0.02 & 1.24\\
  Min.-disc~+~gas & 369.69 & 48.16 & 0.34 & 0.03 & 2.23 & 398.06 & 49.18 &
  0.33 & 0.03 & 1.36\\
  Max.-disc & 42.11 & 6.70 & 1.18 & 0.14 & 2.87 & 47.24 & 15.81 & 1.08 & 0.36 & 4.44\\
  \hline
  \noalign{\smallskip}
\end{tabular}}
\par
Notes: (1) and (6): Fitted core density $\rho_0$ of the
  pseudo-isothermal halo model; (2) and (7): uncertainties of $\rho_0$; (3)
  and (8): fitted core $r_{\rm c}$ radius of the pseudo-isothermal halo model;
  (4) and (9): uncertainties of $r_{\rm c}$; (5) and (10): reduced $\chi^2$
  values.
 % \vspace*{3mm}
\end{table}