\begin{table}%t6
\caption{The basic parameters of the mass decomposition -- the NFW
model.} \label{Massmodelsnfw}
%\centerline
{
\begin{tabular}{lcccccccccc}
  \hline
  \hline
  \noalign{\smallskip}
  & \multicolumn{5}{c}{NFW full} & \multicolumn{5}{c}{NFW small}\\
  Parameter & $v_{200}$ & $c$ & $r_{200}$ & $\Delta r_{200}$ & $\chi^2_{\rm red}$ & $v_{200}$ & c & $  r_{200}$ & $\Delta r_{200}$ & $\chi^2_{\rm red}$\\
  ${\rm [Unit]}$ & [\kms] & & [kpc] & [kpc] & & [\kms] & & [kpc] & [kpc] & \\
  & (1) & (2) & (3) & (4) & (5) & (6) & (7) & (8) & (9) & (10)\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{NGC~2366}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 50 & 9.4 & 117.54 & 7.26 & 47.47 & 50 & 9.4 & 92.81 & 4.52 & 19.88\\
  Min.-disc~+~gas & 50 & 9.4 & 206.12 & 16.44 & 51.76 & 50 & 9.4 & 136.75 &
  5.06 & 8.19\\
  Max.-disc & 50 & 9.4 & 386.29 & 37.63 & 36.27 & 50 & 9.4 & 229.04 & 11.39 & 7.81\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{ESO~059-G001}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 69 & 9.2 & 89.22 & 7.84 & 22.81 & \ldots & \ldots & \ldots & \ldots & \ldots\\
  Min.-disc~+~gas & 69 & 9.2 & 96.00 & 8.04 & 19.67 & \ldots & \ldots & \ldots & \ldots & \ldots\\
  Max.-disc & 69 & 9.2 & 124.40 & 21.27 & 63.70 & \ldots & \ldots & \ldots & \ldots & \ldots\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{ESO~215-G?009}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 77 & 9.0 & 134.57 & 5.13 & 19.07 & 77 & 9.0 & 128.08 & 3.63 & 9.14\\
  Min.-disc~+~gas & 77 & 9.0 & 157.35 & 7.85 & 30.18 & 77 & 9.0 & 145.41 &
  5.00 & 12.48\\
  Max.-disc & 77 & 9.0 & 309.86 & 17.19 & 19.95 & 77 & 9.0 & 283.81 & 11.67 & 9.13\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{NGC~4861}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 46 & 9.5 & 125.79 & 10.55 & 17.42 & 46 & 9.5 & 132.55 & 18.92 & 29.44\\
  Min.-disc~+~gas & 46 & 9.5 & 181.48 & 13.27 & 10.93 & 46 & 9.5 & 189.54 &
  24.43 & 16.57\\
  Max.-disc & 46 & 9.5 & 219.91 & 26.36 & 24.86 & 46 & 9.5 & 267.28 & 65.64 & 37.31\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{NGC~5408}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 53 & 9.7 & 182.70 & 24.22 & 47.97 & 53 & 9.7 & 187.81 & 34.65 & 63.22\\
  Min.-disc~+~gas & 53 & 9.7 & 233.18 & 30.95 & 38.76 & 53 & 9.7 & 239.76 &
  46.08 & 51.79\\
  \hline
  \noalign{\smallskip}
  \multicolumn{11}{c}{IC~5152}\\
  \hline
  \noalign{\smallskip}
  Min.-disc & 44 & 10.0 & 34.26 & 1.80 & 4.92 & 44 & 10.0 & 31.03 & 1.90 & 4.51\\
  Min.-disc~+~gas & 44 & 10.0 & 43.47 & 2.72 & 7.09 & 44 & 10.0 & 37.09 &
  2.52 & 5.12\\
  Max.-disc & 44 & 10.0 & 79.97 & 5.57 & 6.93 & 44 & 10.0 & 90.67 & 13.45 & 10.58\\
  \hline
  \end{tabular}}
Notes: (1) and (6): The rotation velocity at $r_{200}$, estimated
from the flat part of the rotation curve; (2) and (7):
  the concentration parameter derived following Eq.~(\ref{deBlok}); (3) and (8):
  the fitted virial radius; (4) and (9): uncertainties of $r_{200}$; (5) and
  (10): reduced $\chi^2$ values.
\end{table}