\begin{table}%t7
\caption{\label{spectralfits}Results from spectral fitting of the stacked IBIS/ISGRI
 spectra of INTEGRAL AGN}
\par
%\centering
\small
\begin{tabular}{lcccc}
\hline\hline
%&&&& \\[-8pt]
Sample    & $\Gamma$ & $E_{\rm C} ~ [\rm keV]$ & $R$ & $\chi^2_\nu$\\
\hline
%&&&& \\[-8pt]
Sey~1 (${\ge}5\sigma$) & $1.96 {+0.03 \atop -0.02}$ & -- & -- & 5.66\\
                   & $1.44 \pm 0.10$ & $86 {+21 \atop -14}$ & -- &
                   1.10\\
~ ~ ~ ~$(i = 30^\circ)$   & $1.96 \pm 0.02$ & -- & $1.2 {+0.6 \atop -0.3}$ &
1.15\\[2pt]
\hline
Sey~1.5 (${\ge}5\sigma$) & $2.02 \pm 0.04$ & -- & -- & 3.54\\
                   & $1.36 \pm 0.15$ & $63 {+20  \atop -12}$ & -- &
                   0.57\\
~~ ~ ~  $(i = 45^\circ)$   & $2.04 \pm 0.04$ & -- & $3.1 {+4.7 \atop -1.3}$
                   & 0.29\\[2pt]
\hline
%&&&& \\[-8pt]
Sey~2 (${\ge}5\sigma$) & $1.89 {+0.04 \atop -0.02}$ & -- & -- & 3.13\\
                   & $1.65 \pm 0.05$ & $184 {+16 \atop -52}$ & -- &
                   2.58\\
~~  ~ ~ $(i = 60^\circ)$   & $1.91 {+0.02 \atop -0.03}$ & -- & $1.1  {+0.7 
                   \atop -0.4}$ & 1.67\\[2pt]
\hline
%&&&& \\[-8pt]
all Sey (${\ge}5\sigma$) & $1.97 \pm 0.02$ & -- & -- & 6.18\\
                   & $1.44 {+0.08 \atop -0.13}$ & $86 {+16 \atop
                     -17}$ & -- & 1.96\\
~~ ~ ~  $(i = 45^\circ)$   & $1.95 \pm 0.02$ & -- & $1.3 {+0.7 \atop
                     -0.4}$ & 1.53\\[2pt]
\hline
all Sey (${\ge}10\sigma$) & $1.98  \pm 0.02$ & -- & -- &
6.04\\
                   & $1.41 {+0.10 \atop -0.11}$ & $80 {+17 \atop
                     -13}$ & -- & 1.23\\
~~ ~ ~  $(i = 45^\circ)$   & $1.95 \pm 0.02$ & -- & $1.3 {+0.7 \atop
                     -0.4}$ & 1.23\\[2pt]
\hline
%&&&& \\[-8pt]
Unabs. (${\ge}5\sigma$) & $1.97 {+0.03 \atop -0.01}$ & -- & -- & 5.64\\
                   & $1.53 {+0.09 \atop -0.08}$ & $100 {+25 \atop -15}$ & -- &                    1.82\\
~~  ~ ~  $(i = 45^\circ)$    & $1.98 \pm 0.02$ & -- & $1.3 {+0.6 \atop -0.4}$ & 0.95\\[2pt] 
\hline
%&&&& \\[-8pt]
Abs. (${\ge}5\sigma$) & $1.91 {+0.04 \atop -0.03}$ & -- & -- & 1.2\\
                   & $1.43 {+0.13 \atop -0.08}$ & $ 94 {+32 \atop -13}$ & -- &                    1.59\\
~~  ~ ~ $(i = 45^\circ)$    &  $1.91 {+0.02 \atop -0.03}$ & -- & $1.5 {+1.5 \atop -1.4}$ & 1.03\\[2pt]
\hline
\end{tabular}
\end{table}