\begin{table}%t1
%\centering
\par
\caption{\label{cloudparam}$^{12}$CO $J=2$--1 molecular parameters of the strongest CO clump displayed in Fig.~\ref{clump} (right).}
\tiny \begin{tabular}{cccccc}
\hline\hline
$T_{\rm mb}$ & $V_{\rm c}$ & $\Delta v$  &   $I_{\rm CO}$  & $R$ & $L_{\rm CO}$ \\
\hline
$0.65 \pm 0.05$ & $244.40 \pm 0.40$ & $4.40 \pm 0.50$ & $4.00 \pm 0.20$ & 3 & 120 \\
\hline
\end{tabular}
\end{table}