\begin{table}%t1
\caption{\label{tab:ChIl-RCC}Average magnitudes of stars on V405~And field.}
%\centerline
 {\small \begin{tabular}{lcccc}
\hline\hline
Star No.& $V$&	$B-V$&	$V-R_{\rm C}$& $V-I_{\rm C}$\\
\hline
1 (V405~And)&     11.25&	1.36&	  0.94&	    1.86\\ 
&    \textit{11.10}&     \textit{1.44}&     \textit{0.89} &     \textit{1.74} \\
2&     12.80&     0.43&     0.28&     0.55\\
&     \textit{12.80}&     \textit{0.43}&     \textit{0.28}&     \textit{0.55}
 \\
3&     13.60&     0.43&     0.28&     0.57\\
&     \textit{13.60}&     \textit{0.41}&     \textit{0.28}&     \textit{0.54}
 \\
4&     11.05&     0.44&     0.28&     0.54\\
&     \textit{11.05}&     \textit{0.43}&     \textit{0.28}&     \textit{0.54}
 \\
5&     12.99&     0.89\\
&     \textit{12.96}&     \textit{0.94}
\\
6&     11.67&     0.68&     0.45&     0.83\\
&     \textit{11.65}&     \textit{0.72}&     \textit{0.42}&     \textit{0.79}
 \\
7&     10.67&     0.76&     0.47&     0.87\\
\hline
\end{tabular}}
\medskip
Values in italics are from CI97, Star 7 is not in the field of view in CI97.
 \end{table}