\begin{table}%t4
%\centering
\par
\caption{\label{SPcomp}Comparison of parameters of the \RZC\ system
from literature and obtained with \SI\ (see text for a detailed explanation).}
\par
\begin{tabular}{llllllllllllc}
\hline\hline Ref & $T_1 (K)$ & $T_2 (K)$ & $\log{g_1}$   &
$\log{g_2}$ & $R_1~(R_\odot)$ & $R_2~(R_\odot)$ & $M_1~(M_\odot)$
&
$M_2~(M_\odot)$ & $q$       & $a~(R_\odot)$ & $i~(^\circ)$ & $\beta_2$\\
\hline
$A)$  &8600(100)&4700(200)&4.34(2)&3.73(2)&1.67(3)&1.94(3)&2.21(8)&0.73(2) &0.331(8)&6.77(1)&83.01(1)& \\
$B)$  &[8720]   &4257(26) &4.33(2)&3.72(1)&1.69(6)&1.95(6)&2.2(3) &0.73(7) &[0.331] &6.8(3) &83.20(3)& [0.08]\\
$C)$  &8600     &4370(60) &4.33(3)&3.72(3)&1.67(2)&1.95(3)&2.18(7)&0.72(2) &[0.331] &6.76(9)&83.1(2) & [0.08] \\
$D)$  &[8600]   &4480(13) &4.38(2)&3.73(3)&1.62(2)&1.99(3)&2.28(9)&0.77(3) &0.338(2)&6.87(8)&81.98(5)& [0.08]\\
$E)$  &8907(15)  &4797(20) &[4.35] &[3.50] &1.61(1)&1.93   &2.01(2)&0.69(1) &0.342(2)&6.59(3)&82.0(3) & 0.08/0.50\\
\hline
\end{tabular} 
\end{table}