\begin{table}%t4
\caption{\label{hafittbl} Initial parameters for the intermediate and broad Gaussian fits to spectral lines in SN~2007rt. } 
%\centerline
{\tiny \begin{tabular}{llccc}
\hline \hline
Line &   Day   & $\lambda$    & {FWHM}     & Intensity\\
 &  \AA   &  \kms      & 10$^{-15}$~erg~s$^{-1}$~cm$^{2}$\\ 
\hline 
He {\sc i} 3926  & 102 & 3919.12 &  7340  &  13.43  \\  
broad                 & 106 & 3919.36 &  6482   &  16.95  \\ 
                            & 131 & 3924.15 &  6463   &  11.85  \\ 
                            & 160 & 3918.89 &  6004   &    8.63   \\
                            & 208  & 3925.70 & 4850  &    6.97   \\ 
                            & 240  & 3921.51 &  4948 &    7.76  \\ 
                            & 273  & 3930.00 &  4155 &    6.53  \\ 
%\hline
H$_{\gamma}$ 4340& 102  & 4318.15 &  5808   & 9.39  \\  
 Inter.                          & 106  & 4321.20  &  5114  & 6.31  \\ 
                                     & 131  & 4316.22 &  4851   & 6.99  \\ 
                                     & 160  & 4317.16  &  5683  & 7.37  \\
                                     & 208  & 4344.80  &  4649  & 6.74   \\ 
                                     & 240  & 4330.00  &  4743  &6.76   \\ 
%                                     & 273  & 4329.20 &  2318   & 3.68  \\ 
                                     & 497  & 4337.32 & 3992   & 1.16 \\
%\hline
H$_{\beta}$ 4861 & 102   & 4847.43 &  3850&  15.31  \\  
 Inter.                       & 106  & 4852.75  &  4151  &  16.80  \\ 
                                 & 131  & 4851.27 &  4046  &  19.64 \\ 
                                 & 160  & 484714  &  4099   &  24.52 \\
                                 & 208  & 4856.45 &  3638   &  20.63 \\ 
                                 & 240  & 4852.49  &  3258   &  24.78  \\ 
                                 & 273   & 4852.13  &  2678  & 16.04  \\ 
                                 & 497  & 4851.03& 1673  & 2.98\\
                                 & 507 & 4849.14 & 1614 & 2.35 \\
%\hline
He {\sc i} 5875  & 102   & 5860.11 & 10279  &  24.11 \\  
 broad                 & 106   & 5872.61 &  9640    &  20.77  \\ 
                            & 131   & 5870.01 &  9729   &  19.05 \\ 
                            & 160   & 5869.47 & 10146   &  17.89  \\
                            & 208   & 5872.93 &  9834    &  11.56  \\ 
		         & 240   & 5867.50 &  8080    &   11.07   \\ 
		         & 475 & 5837.26 & 4466 & 1.74 \\		         
		         & 497  & 5848.50 & 4538 & 1.77 \\
		         &507 & 5835.03 & 4057 & 1.58 \\
%\hline
He {\sc i} 5875  & 475   & 5872.62 & 1072  &  0.63\\  
Inter.*                 & 507  & 5872.61 &   1318   &  0.52 \\ 
%\hline
H$_{\alpha}$ 6563& 102   & 6543.71 & 10136   & 121.68  \\  
broad                        & 106  & 6546.19& 10113    & 145.75  \\ 
                                   & 131  & 6545.41&  8793     &  145.94 \\ 
                                   & 153  & 6543.88 &  8244     &    139.41 \\
                                   & 160  & 6550.00 &  8489     &   179.92 \\
                                   & 208 & 6553.00  &  7285    &    149.68  \\ 
                                   &240  & 6548.34   &  6835    &   171.70  \\ 
                                   & 273  & 6541.33  &  6047    &    129.30  \\ 
			       & 475 & 6529.07 & 3645 & 42.87 \\
                                   & 497  & 6530.32 &  3593    & 26.61  \\
                                   & 507 & 6530.72 & 3495 & 28.93 \\
%\hline
H$_{\alpha}$ 6563& 102   & 6548.29 &  2905   &  24.11 \\  
Inter.                          & 106  & 6552.01 &  2687   & 27.02 \\ 
                                   & 131 & 6555.53 &  2179    &  24.30 \\ 
                                   & 153 & 6555.35 &  2195    & 29.38 \\
                                   & 160  & 6554.89 &  2212   &  33. 85 \\
                                   & 208  & 6562.25  &  1734  &  33.40  \\ 
                                   & 240  & 6557.58 &  1824   &  53.87  \\ 
                                   & 273  & 6553.28&  1812    &  53.08 \\
                                   & 475 & 6549.65 & 1353 & 40.20 \\   
                                   & 497  & 6551.11 & 1357 & 26.40  \\ 
                                   & 507 &6550.96 & 1335 & 27.72 \\
%\hline
O {\sc i} 8446         & 273 & 8441.22 & 2980 & 12.59 \\
 inter.                       & 497 & 8433.39 & 1399 & 3.15 \\
                                 & 507&8434.35 & 1244 & 2.45\\
%\hline
Ca {\sc ii} & 102 & 8550.00 & 12982   & 118.48 \\  
 broad      & 106  & 8540.47& 11541  & 101.92 \\ 
                 & 131 & 8553.22 & 11651  & 72.96  \\ 
                 & 160  & 8552.43 & 12486  & 117.55  \\
&273  & 8544.40&  8750  &  44.89 \\
                 &475 & 8535.883 & 8570 & 7.32 \\
\hline
 \end{tabular}}
 \medskip
* An intermediate He {\sc i} 5875~\AA\ line was detected at 475 \& 507 days. Prior to that only weak narrow and broad components were present.
\end{table}