\begin{table}%t3
\caption{\label{tab:excess_flux}Excess emission fluxes for YSOs in \fig\ref{fig:SED-sample}.}
%\centering
\small
\begin{tabular}{ccccccc}
\hline\hline
sub-  & ID&  [3.6]  & [4.5] & [5.8] &[8.0] &[24]\\
panel & (L1641) & (mag)   & (mag) & (mag) & (mag) & (mag)\\
 \hline
(a) &     166 &      1.39  &     2.07  &     2.46 &     3.34  &     6.45\\
(b) &     239 &      1.49  &     1.89  &     2.15 &     2.81  &     5.71\\
(c) &     177 &      0.84  &     1.24  &     1.57 &     2.12  &     4.12\\
(d) &     205 &      0.56  &     0.82  &     1.13 &     1.83  &     4.38\\
(e) &      64 &    \nodata &     0.05  &     0.34 &     1.22  &     4.20\\
(f) &     204 &      0.06  &     0.23  &     0.29 &     0.72  &     5.17\\
(g) &      44 &     \nodata&    \nodata&   \nodata&    \nodata&    \nodata\\
(h) &     192 &     \nodata&    \nodata&   \nodata&    \nodata&     0.75\\
 \hline
\end{tabular}
\end{table}