\begin{table}%t1
\caption{\label{statstab}Statistics of convective collapse events (see Sect.~\ref{sec:results}).}
%\centering
\small
\begin{tabular}{l c c c c c c }
\hline\hline
&&&&&& \\[-8pt]
 Type of event & max $v$ down [km~s$^{-1}$] & start B [G]& peak B [G]& $r$ 1 [arcsec]& $r$ 2 [arcsec]&duration [min]\\
  \hline
 11 without Mg downflow&3.80&819&1093&0.48&0.41&10.36\\
 28 with Mg downflow&3.92&886&1356&0.48&0.34&10.37\\
 10 Mg out of FOV&3.33&900&1262&0.34&0.31&9.09\\ 
 \hline	
\end{tabular}
\end{table}