\begin{table}
%%\begin{center}
\par
%\begin{tabular}{|r|r|}
%\hline
%PSR & upper limit ($h^{u.l.}$)\\
%\hline \hline
% 0024-7204J & $3.44 \cdot 10^{-23}$\\
% 0218+4232 & $3.19 \cdot 10^{-23}$\\
% 1939+2134 & $3.26 \cdot 10^{-23}$\\
%\hline
%\end{tabular}
%\caption{Measured upper limits for the 3 targeted MSPs. Here the
%goal coverage is set to $C = 0.9$.} \label{up_results}
%%\end{center}
\par
%\end{table}