\begin{table}
\caption{\label{tab:CS29491Linelist}Line list used for the abundance analysis of \object{CS~29491$-$069} and \object{HE~1219$-$0312}.}
%\centering
\begin{tabular}{r l c c r c r l l r l l}
\hline\hline
                                &               &                       &                                       &                       &                               & \multicolumn{3}{c}{\object{CS~29491$-$069}} & \multicolumn{3}{c}{\object{HE~1219$-$0312}}\\
                        $Z$       &       Atom    &       Ion     &       $\lambda$~[{\AA}]      &       $\log{g}f$     &       $\chi$~[eV]    &       $W_{\lambda}$~[m{\AA}] &       $\log\epsilon$  &       method    &       $W_{\lambda}$~[m{\AA}] &       $\log\epsilon$  &       method\\ [0.8mm]                                             
                        \hline
11 & Na  &  1 &   5889.951  & $0.117$  &   0.00 & --       & --       & --     & 105.3  &  3.057  & Gauss\\
11 & Na  &  1 &   5895.924  & $-0.184$ &   0.00 & --       & --       & --     &  81.2  &  2.923  & Gauss\\
12 & Mg  &  1 &   3336.674  & $-1.230$ &   2.72 & --       & --       & --     &  82.4  &  4.981  & Gauss\\
12 & Mg  &  1 &   3829.355  & $-0.231$ &   2.71 &  153.9   &   5.194  & Gauss  & --     & --      & --   \\
12 & Mg  &  1 &   3903.859  & $-0.511$ &   4.35 &   34.5   &   5.012  & Gauss  & --     & --      & --   \\
12 & Mg  &  1 &   4057.505  & $-1.201$ &   4.35 & --       & --       & --     &  18.6  & 5.253   & Gauss\\
12 & Mg  &  1 &   4167.271  & $-1.004$ &   4.35 &   41.0   &   5.620  & Gauss  &  19.8  & 5.083   & Gauss\\
12 & Mg  &  1 &   4571.096  & $-5.691$ &   0.00 &   30.7   &   5.496  & Gauss  & --     & --      & --   \\
12 & Mg  &  1 &   5172.684  & $-0.402$ &   2.71 & --       & --       & --     & 141.1  & 4.754   & Gauss\\
12 & Mg  &  1 &   5183.604  & $-0.180$ &   2.72 & --       & --       & --     & 160.7  & 4.780   & Gauss\\
12 & Mg  &  1 &   5528.405  & $-0.620$ &   4.35 & --       & --       & --     &  37.1  & 5.011   & Gauss\\[0.5ex]
\par
13 & Al  &  1 &   3944.006  & $-0.623$ &   0.00 &  132.1   &   3.872  & Gauss  & 103.5  & 3.161   & Gauss\\[0.5ex]
\par
14 & Si  &  1 &   3905.523  & $-1.090$ &   1.91 &     --   &   5.20   & synt   & --     & 4.84    & synt \\[0.5ex]
\par
20 & Ca  &  1 &   4226.728  & $ 0.265$ &   0.00 &  170.1   &   3.773  & Gauss  & 138.6  & 3.238   & Gauss\\
20 & Ca  &  1 &   4283.011  & $-0.292$ &   1.89 &   49.0   &   4.191  & Gauss  &  27.6  & 3.600   & Gauss\\
20 & Ca  &  1 &   4289.367  & $-0.388$ &   1.88 &   40.3   &   4.119  & Gauss  &  20.4  & 3.513   & Gauss\\
20 & Ca  &  1 &   4302.528  & $ 0.183$ &   1.90 &   74.0   &   4.201  & Gauss  & --     & --      & --   \\
20 & Ca  &  1 &   4318.652  & $-0.295$ &   1.90 &   42.3   &   4.082  & Gauss  &  27.0  & 3.601   & Gauss\\
20 & Ca  &  1 &   4425.437  & $-0.286$ &   1.88 &   35.0   &   3.906  & Gauss  &  19.3  & 3.370   & Gauss\\
20 & Ca  &  1 &   4434.957  & $ 0.066$ &   1.89 &   55.1   &   3.934  & Gauss  & --     & --      & --   \\
20 & Ca  &  1 &   4435.679  & $-0.412$ &   1.89 &   42.0   &   4.172  & Gauss  & --     & --      & --   \\
20 & Ca  &  1 &   4454.779  & $ 0.335$ &   1.90 &   67.2   &   3.904  & Gauss  &  50.9  & 3.426   & Gauss\\
20 & Ca  &  1 &   4455.887  & $-0.414$ &   1.90 &   28.5   &   3.919  & Gauss  & --     & --      & --   \\[0.5ex]
\par
21 & Sc  &  2 &   3535.714  & $-0.465$ &   0.31 &   56.0   &   0.765  & Gauss  & --     & --      & --   \\
21 & Sc  &  2 &   3567.696  & $-0.476$ &   0.00 &   74.3   &   0.870  & Gauss  & --     & --      & --   \\
21 & Sc  &  2 &   3576.340  & $ 0.007$ &   0.01 &   96.5   &   1.020  & Gauss  & --     & --      & --   \\
21 & Sc  &  2 &   4246.822  & $ 0.242$ &   0.31 &   94.2   &   0.731  & Gauss  &  85.5  & 0.146   & Gauss\\
21 & Sc  &  2 &   4314.083  & $-0.096$ &   0.62 &   69.2   &   0.783  & Gauss  &  54.7  & 0.139   & Gauss\\
21 & Sc  &  2 &   4400.389  & $-0.536$ &   0.61 &   41.1   &   0.650  & Gauss  &  26.5  & 0.011   & Gauss\\
21 & Sc  &  2 &   4415.557  & $-0.668$ &   0.60 &   35.7   &   0.667  & Gauss  &  24.2  & 0.077   & Gauss\\[0.5ex]
\par
22 & Ti  &  1 &   3635.462  & $ 0.047$ &   0.00 &   54.4   &   2.782  & Gauss  & --     & --      & --   \\
22 & Ti  &  1 &   3729.807  & $-0.351$ &   0.00 &   40.7   &   2.841  & Gauss  & --     & --      & --   \\
22 & Ti  &  1 &   3741.059  & $-0.213$ &   0.02 &   40.9   &   2.723  & Gauss  & --     & --      & --   \\
22 & Ti  &  1 &   3904.783  & $ 0.284$ &   0.90 &   15.8   &   2.524  & Gauss  & --     & --      & --   \\
22 & Ti  &  1 &   3948.670  & $-0.468$ &   0.00 &   42.7   &   2.934  & Gauss  & --     & --      & --   \\
22 & Ti  &  1 &   3958.206  & $-0.177$ &   0.05 &   49.7   &   2.837  & Gauss  & --     & --      & --   \\
22 & Ti  &  1 &   3989.759  & $-0.198$ &   0.02 &   46.3   &   2.752  & Gauss  &  28.8  & 2.090   & Gauss\\
22 & Ti  &  1 &   3998.636  & $-0.056$ &   0.05 &   49.9   &   2.710  & Gauss  &  34.4  & 2.096   & Gauss\\
22 & Ti  &  1 &   4533.241  & $ 0.476$ &   0.85 &   33.5   &   2.654  & Gauss  &  19.2  & 2.053   & Gauss\\
22 & Ti  &  1 &   4534.776  & $ 0.280$ &   0.84 &   25.6   &   2.665  & Gauss  &  14.3  & 2.080   & Gauss\\
22 & Ti  &  1 &   4535.568  & $ 0.162$ &   0.83 &   20.3   &   2.638  & Gauss  &  11.0  & 2.056   & Gauss\\
22 & Ti  &  1 &   4981.731  & $ 0.504$ &   0.85 &   --     &   --     & --     &  24.0  & 2.114   & Gauss\\
22 & Ti  &  1 &   4991.065  & $ 0.380$ &   0.84 &   --     &   --     & --     &  18.7  & 2.085   & Gauss\\
\par
22 & Ti  &  2 &   3913.468  & $-0.410$ &   1.12 &   --     &   --     & --     &  77.5  & 2.016   & Gauss\\
22 & Ti  &  2 &   4012.385  & $-1.750$ &   0.57 &   72.6   &   2.939  & Gauss  & --     & --      & --   \\
22 & Ti  &  2 &   4028.343  & $-0.990$ &   1.89 &   --     &   --     & --     &  20.0  & 2.193   & Gauss\\
22 & Ti  &  2 &   4290.219  & $-0.930$ &   1.16 &   --     &   --     & --     &  62.1  & 2.142   & Gauss\\
22 & Ti  &  2 &   4394.051  & $-1.770$ &   1.22 &   --     &   --     & --     &  17.6  & 2.107   & Gauss\\
22 & Ti  &  2 &   4395.033  & $-0.510$ &   1.08 &   96.0   &   2.731  & Gauss  &  79.6  & 2.003   & Gauss\\
22 & Ti  &  2 &   4395.850  & $-1.970$ &   1.24 &   --     &   --     & --     &  10.5  & 2.071   & Gauss\\
22 & Ti  &  2 &   4399.772  & $-1.220$ &   1.24 &   --     &   --     & --     &  41.9  & 2.114   & Gauss\\
22 & Ti  &  2 &   4417.719  & $-1.230$ &   1.16 &   64.7   &   2.804  & Gauss  &  46.9  & 2.133   & Gauss\\
22 & Ti  &  2 &   4443.794  & $-0.700$ &   1.08 &   87.8   &   2.709  & Gauss  &  72.5  & 2.014   & Gauss\\
22 & Ti  &  2 &   4444.558  & $-2.210$ &   1.12 &   --     &   --     & --     &  10.8  & 2.176   & Gauss\\
22 & Ti  &  2 &   4450.482  & $-1.510$ &   1.08 &   --     &   --     & --     &  33.6  & 2.065   & Gauss\\
22 & Ti  &  2 &   4464.450  & $-1.810$ &   1.16 &   --     &   --     & --     &  23.2  & 2.224   & Gauss\\
22 & Ti  &  2 &   4468.507  & $-0.600$ &   1.13 &   93.0   &   2.783  & Gauss  &  76.6  & 2.061   & Gauss\\
22 & Ti  &  2 &   4501.273  & $-0.760$ &   1.12 &   85.1   &   2.731  & Gauss  &  73.1  & 2.118   & Gauss\\
22 & Ti  &  2 &   4533.969  & $-0.540$ &   1.24 &   86.3   &   2.663  & Gauss  &  72.1  & 2.008   & Gauss\\
22 & Ti  &  2 &   4563.761  & $-0.790$ &   1.22 &   78.7   &   2.712  & Gauss  &  60.9  & 2.003   & Gauss\\
22 & Ti  &  2 &   4571.968  & $-0.230$ &   1.57 &   77.7   &   2.505  & Gauss  &  62.3  & 1.869   & Gauss\\
22 & Ti  &  2 &   4589.958  & $-1.620$ &   1.24 &   --     &   --     & --     &  25.0  & 2.151   & Gauss\\[0.5ex]
\par
23 & V   &  1 &   3855.841  & $ 0.013$ &   0.07 &   13.9   &   1.829  & Gauss  & --     & --      & --   \\
23 & V   &  1 &   4111.774  & $ 0.408$ &   0.30 &    8.5   &   1.409  & Gauss  & --     & --      & --   \\
23 & V   &  1 &   4379.230  & $ 0.580$ &   0.30 &   13.3   &   1.431  & Gauss  & --     & --      & --   \\
23 & V   &  1 &   4384.712  & $ 0.510$ &   0.29 &   13.3   &   1.485  & Gauss  & --     & --      & --   \\
23 & V   &  1 &   4389.976  & $ 0.200$ &   0.28 &   11.8   &   1.721  & Gauss  & --     & --      & --   \\
\par
23 & V   &  2 &   3504.444  & $-0.714$ &   1.10 &   25.8   &   1.498  & Gauss  & --     & --      & --   \\
23 & V   &  2 &   3517.296  & $-0.208$ &   1.13 &   44.9   &   1.450  & Gauss  & --     & --      & --   \\
23 & V   &  2 &   3530.760  & $-0.470$ &   1.07 &   36.7   &   1.471  & Gauss  &  18.8  & 0.709   & Gauss\\
23 & V   &  2 &   3545.194  & $-0.259$ &   1.10 &   --     &   --     & --     &  28.4  & 0.773   & Gauss\\
23 & V   &  2 &   3592.021  & $-0.263$ &   1.10 &   --     &   --     & --     &  33.8  & 0.891   & Gauss\\
23 & V   &  2 &   3589.749  & $-0.295$ &   1.07 &   59.5   &   1.800  & Gauss  & --     & --      & --   \\
23 & V   &  2 &   3727.343  & $-0.231$ &   1.69 &   19.7   &   1.449  & Gauss  & --     & --      & --   \\
23 & V   &  2 &   3951.960  & $-0.784$ &   1.48 &   16.8   &   1.633  & Gauss  & --     & --      & --   \\
23 & V   &  2 &   4005.705  & $-0.522$ &   1.82 &   16.1   &   1.709  & Gauss  & --     & --      & --   \\[0.5ex]
\par
24 & Cr  &  1 &   3578.684  & $ 0.409$ &   0.00 &   98.9   &   2.903  & Gauss  & --     & --      & --   \\
24 & Cr  &  1 &   3593.481  & $ 0.307$ &   0.00 &   97.2   &   2.955  & Gauss  & --     & --      & --   \\
24 & Cr  &  1 &   4254.332  & $-0.114$ &   0.00 &   88.1   &   2.791  & Gauss  &  82.9  & 2.334   & Gauss\\
24 & Cr  &  1 &   4274.796  & $-0.231$ &   0.00 &   86.7   &   2.865  & Gauss  &  74.4  & 2.219   & Gauss\\
24 & Cr  &  1 &   4289.716  & $-0.361$ &   0.00 &   79.8   &   2.805  & Gauss  &  73.2  & 2.315   & Gauss\\
24 & Cr  &  1 &   5206.038  & $ 0.019$ &   0.94 &   --     &   --     & --     &  46.9  & 2.332   & Gauss\\
24 & Cr  &  1 &   5345.801  & $-0.980$ &   1.00 &   --     &   --     & --     &  11.8  & 2.552   & Gauss\\
24 & Cr  &  1 &   5409.772  & $-0.720$ &   1.03 &   --     &   --     & --     &  16.4  & 2.484   & Gauss\\[0.5ex]
\par
25 & Mn  &  1 &   4030.753  & $-0.470$ &   0.00 &   --     &   2.09   & synt HFS  & --     & 1.60    & synt HFS\\
25 & Mn  &  1 &   4033.062  & $-0.618$ &   0.00 &   --     &   2.11   & synt HFS  & --     & 1.58    & synt HFS\\
25 & Mn  &  1 &   4034.483  & $-0.811$ &   0.00 &   --     &   2.14   & synt HFS  & --     & 1.63    & synt HFS\\
\par
25 & Mn  &  2 &   3460.316  & $-0.540$ &   1.81 &   --     &   2.15   & synt HFS  & --     & 1.96    & synt HFS\\
25 & Mn  &  2 &   3488.677  & $-0.860$ &   1.85 &   --     &   2.28   & synt HFS  & --     & 2.05    & synt HFS\\[0.5ex]
\par
26 & Fe  &  1 &   3536.556  & $ 0.115$ &   2.88 &   60.7   &   4.731  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3554.925  & $ 0.538$ &   2.83 &   78.9   &   4.746  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3565.379  & $-0.133$ &   0.96 &  146.1   &   4.838  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3606.679  & $ 0.323$ &   2.69 &   78.1   &   4.878  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3651.467  & $ 0.021$ &   2.76 &   56.7   &   4.617  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3687.457  & $-0.833$ &   0.86 &  129.0   &   5.176  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3694.006  & $ 0.078$ &   3.04 &   76.3   &   5.288  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3709.246  & $-0.646$ &   0.92 &  120.9   &   4.904  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3758.233  & $-0.027$ &   0.96 &  170.1   &   4.795  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3763.789  & $-0.238$ &   0.99 &  152.1   &   4.887  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3815.840  & $ 0.237$ &   1.49 &  145.6   &   4.795  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3824.444  & $-1.362$ &   0.00 &  144.8   &   5.009  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3856.372  & $-1.286$ &   0.05 &  --      &   --     & --     & 133.5  & 4.553   & Gauss\\
26 & Fe  &  1 &   3859.911  & $-0.710$ &   0.00 &  191.0   &   4.754  & Gauss  & 179.6  & 4.446   & Gauss\\
26 & Fe  &  1 &   3865.523  & $-0.982$ &   1.01 &  --      &   --     & --     & 105.3  & 4.607   & Gauss\\
26 & Fe  &  1 &   3878.018  & $-0.914$ &   0.96 &  --      &   --     & --     & 109.0  & 4.562   & Gauss\\
\par
26 & Fe  &  1 &   3899.707  & $-1.531$ &   0.09 &  122.7   &   4.900  & Gauss  & 122.8  & 4.615   & Gauss\\
26 & Fe  &  1 &   3920.258  & $-1.746$ &   0.12 &  113.7   &   4.960  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3922.912  & $-1.651$ &   0.05 &  121.8   &   4.959  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   3997.392  & $-0.479$ &   2.73 &   51.1   &   4.812  & Gauss  &  49.2  & 4.541   & Gauss\\
26 & Fe  &  1 &   4005.242  & $-0.610$ &   1.56 &  100.1   &   4.919  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4021.867  & $-0.729$ &   2.76 &   42.4   &   4.906  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4032.628  & $-2.377$ &   1.49 &   26.5   &   4.842  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4045.812  & $ 0.280$ &   1.49 &  153.4   &   4.790  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4062.441  & $-0.862$ &   2.85 &   29.0   &   4.839  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4063.594  & $ 0.062$ &   1.56 &  133.3   &   4.838  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4067.978  & $-0.472$ &   3.21 &   32.1   &   4.898  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4071.738  & $-0.022$ &   1.61 &  121.0   &   4.783  & Gauss  & 118.7  & 4.520   & Gauss\\
26 & Fe  &  1 &   4076.629  & $-0.529$ &   3.21 &   32.1   &   4.955  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4107.488  & $-0.879$ &   2.83 &   39.3   &   5.056  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4114.445  & $-1.303$ &   2.83 &   14.9   &   4.875  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4132.058  & $-0.675$ &   1.61 &  101.2   &   5.022  & Gauss  &  96.3  & 4.635   & Gauss\\
26 & Fe  &  1 &   4132.899  & $-1.006$ &   2.85 &   27.8   &   4.948  & Gauss  &  22.6  & 4.603   & Gauss\\
26 & Fe  &  1 &   4134.678  & $-0.649$ &   2.83 &   42.0   &   4.879  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4136.998  & $-0.453$ &   3.41 &   18.6   &   4.759  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4143.868  & $-0.511$ &   1.56 &  104.3   &   4.874  & Gauss  & 102.0  & 4.559   & Gauss\\
26 & Fe  &  1 &   4147.669  & $-2.104$ &   1.49 &   47.4   &   4.995  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4153.900  & $-0.321$ &   3.40 &   28.0   &   4.843  & Gauss  &  23.0  & 4.532   & Gauss\\
26 & Fe  &  1 &   4154.499  & $-0.688$ &   2.83 &   37.1   &   4.810  & Gauss  &  30.3  & 4.447   & Gauss\\
26 & Fe  &  1 &   4154.806  & $-0.400$ &   3.37 &   29.1   &   4.917  & Gauss  &  20.6  & 4.517   & Gauss\\
26 & Fe  &  1 &   4156.799  & $-0.809$ &   2.83 &   36.8   &   4.929  & Gauss  &  26.9  & 4.493   & Gauss\\
26 & Fe  &  1 &   4157.780  & $-0.403$ &   3.42 &   26.2   &   4.906  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4174.913  & $-2.969$ &   0.92 &   38.0   &   5.049  & Gauss  &  35.2  & 4.677   & Gauss\\
26 & Fe  &  1 &   4175.636  & $-0.827$ &   2.85 &   35.5   &   4.933  & Gauss  &  35.5  & 4.712   & Gauss\\
26 & Fe  &  1 &   4181.755  & $-0.371$ &   2.83 &   53.0   &   4.825  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4182.383  & $-1.180$ &   3.02 &   13.5   &   4.892  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4184.892  & $-0.869$ &   2.83 &   29.8   &   4.837  & Gauss  &  26.3  & 4.537   & Gauss\\
26 & Fe  &  1 &   4187.039  & $-0.548$ &   2.45 &   67.6   &   4.882  & Gauss  &  60.0  & 4.480   & Gauss\\
26 & Fe  &  1 &   4187.795  & $-0.554$ &   2.42 &   68.8   &   4.890  & Gauss  &  66.1  & 4.594   & Gauss\\
26 & Fe  &  1 &   4191.431  & $-0.666$ &   2.47 &   57.7   &   4.806  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4195.329  & $-0.492$ &   3.33 &   29.2   &   4.972  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4199.095  & $ 0.155$ &   3.05 &   61.2   &   4.714  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4199.983  & $-4.750$ &   0.09 &   10.4   &   5.172  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4202.029  & $-0.708$ &   1.49 &   --     &   --     & --     &  97.6  & 4.550   & Gauss\\
26 & Fe  &  1 &   4222.213  & $-0.967$ &   2.45 &   47.0   &   4.866  & Gauss  &  42.1  & 4.532   & Gauss\\
26 & Fe  &  1 &   4227.427  & $ 0.266$ &   3.33 &   56.0   &   4.761  & Gauss  &  48.1  & 4.403   & Gauss\\
26 & Fe  &  1 &   4233.603  & $-0.604$ &   2.48 &   61.5   &   4.832  & Gauss  &  52.7  & 4.414   & Gauss\\
26 & Fe  &  1 &   4238.810  & $-0.233$ &   3.40 &   33.0   &   4.857  & Gauss  &  26.8  & 4.529   & Gauss\\
26 & Fe  &  1 &   4250.119  & $-0.405$ &   2.47 &   69.9   &   4.802  & Gauss  &  64.6  & 4.449   & Gauss\\
26 & Fe  &  1 &   4260.474  & $ 0.109$ &   2.40 &   91.1   &   4.691  & Gauss  &  86.9  & 4.380   & Gauss\\
26 & Fe  &  1 &   4271.154  & $-0.349$ &   2.45 &   79.8   &   4.946  & Gauss  &  69.4  & 4.476   & Gauss\\
26 & Fe  &  1 &   4271.761  & $-0.164$ &   1.49 &  125.5   &   4.833  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4282.403  & $-0.779$ &   2.18 &   68.7   &   4.890  & Gauss  &  67.3  & 4.588   & Gauss\\
26 & Fe  &  1 &   4325.762  & $ 0.006$ &   1.61 &  124.4   &   4.765  & Gauss  & 119.9  & 4.456   & Gauss\\
26 & Fe  &  1 &   4352.735  & $-1.287$ &   2.22 &   48.1   &   4.969  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4375.930  & $-3.031$ &   0.00 &   85.9   &   5.214  & Gauss  &  85.6  & 4.822   & Gauss\\
26 & Fe  &  1 &   4383.545  & $ 0.200$ &   1.49 &   --     &   --     & --     & 139.3  & 4.428   & Gauss\\
26 & Fe  &  1 &   4404.750  & $-0.142$ &   1.56 &  125.9   &   4.854  & Gauss  & 119.8  & 4.509   & Gauss\\
26 & Fe  &  1 &   4415.123  & $-0.615$ &   1.61 &  103.7   &   4.946  & Gauss  &  98.2  & 4.539   & Gauss\\
26 & Fe  &  1 &   4430.614  & $-1.659$ &   2.22 &   30.6   &   4.967  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4443.194  & $-1.043$ &   2.86 &  --      &   --     & --     &  15.5  & 4.419   & Gauss\\
26 & Fe  &  1 &   4447.717  & $-1.342$ &   2.22 &   43.8   &   4.915  & Gauss  &  37.5  & 4.539   & Gauss\\
26 & Fe  &  1 &   4459.118  & $-1.279$ &   2.18 &   55.7   &   5.036  & Gauss  &  47.3  & 4.612   & Gauss\\
26 & Fe  &  1 &   4461.653  & $-3.210$ &   0.09 &   76.8   &   5.215  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4466.552  & $-0.600$ &   2.83 &   51.8   &   5.000  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4489.739  & $-3.966$ &   0.12 &   --     &   --     & --     &  32.6  & 4.676   & Gauss\\
26 & Fe  &  1 &   4494.563  & $-1.136$ &   2.20 &   55.7   &   4.913  & Gauss  &  51.6  & 4.574   & Gauss\\
26 & Fe  &  1 &   4528.614  & $-0.822$ &   2.18 &   72.6   &   4.936  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4736.773  & $-0.752$ &   3.21 &   23.6   &   4.930  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4871.318  & $-0.363$ &   2.87 &   --     &   --     & --     &  48.9  & 4.461   & Gauss\\
26 & Fe  &  1 &   4890.755  & $-0.394$ &   2.88 &   --     &   --     & --     &  50.7  & 4.536   & Gauss\\
26 & Fe  &  1 &   4891.492  & $-0.112$ &   2.85 &   72.0   &   4.878  & Gauss  &  59.3  & 4.394   & Gauss\\
26 & Fe  &  1 &   4903.310  & $-0.926$ &   2.88 &   --     &   --     & --     &  25.5  & 4.569   & Gauss\\
26 & Fe  &  1 &   4918.994  & $-0.342$ &   2.87 &   55.2   &   4.781  & Gauss  &  47.4  & 4.408   & Gauss\\
26 & Fe  &  1 &   4920.503  & $ 0.068$ &   2.83 &   77.3   &   4.787  & Gauss  & --     & --      & --   \\
26 & Fe  &  1 &   4938.814  & $-1.077$ &   2.88 &   24.0   &   4.894  & Gauss  &  16.6  & 4.470   & Gauss\\
26 & Fe  &  1 &   4939.687  & $-3.340$ &   0.86 &   29.0   &   5.095  & Gauss  &  22.8  & 4.631   & Gauss\\
\par
26 & Fe  &  2 &   3783.347  & $-3.164$ &   2.28 &   21.3   &   5.038  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4178.862  & $-2.500$ &   2.58 &   31.6   &   4.892  & Gauss  &  26.2  & 4.523   & Gauss\\
26 & Fe  &  2 &   4233.172  & $-1.900$ &   2.58 &   58.5   &   4.822  & Gauss  &  58.5  & 4.571   & Gauss\\
26 & Fe  &  2 &   4303.176  & $-2.560$ &   2.70 &   39.2   &   5.226  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4351.769  & $-2.020$ &   2.70 &   62.3   &   5.156  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4385.387  & $-2.680$ &   2.78 &   26.2   &   5.139  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4416.830  & $-2.410$ &   2.78 &   22.8   &   4.783  & Gauss  &  18.3  & 4.421   & Gauss\\
26 & Fe  &  2 &   4489.183  & $-2.970$ &   2.83 &   10.0   &   4.957  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4491.405  & $-2.700$ &   2.86 &   13.8   &   4.878  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4508.288  & $-2.250$ &   2.86 &   30.2   &   4.871  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4515.339  & $-2.450$ &   2.84 &   22.6   &   4.882  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4520.224  & $-2.600$ &   2.81 &   20.0   &   4.922  & Gauss  &  19.3  & 4.665   & Gauss\\
26 & Fe  &  2 &   4522.634  & $-2.030$ &   2.84 &   40.5   &   4.852  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4541.524  & $-2.790$ &   2.86 &   11.9   &   4.889  & Gauss  &   6.1  & 4.335   & Gauss\\
26 & Fe  &  2 &   4549.474  & $-2.020$ &   2.83 &   49.3   &   4.997  & Gauss  & --     & --      & --   \\
26 & Fe  &  2 &   4555.893  & $-2.160$ &   2.83 &   29.4   &   4.733  & Gauss  &  24.8  & 4.389   & Gauss\\
26 & Fe  &  2 &   4923.927  & $-1.320$ &   2.89 &   --     &   --     & --     &  70.1  & 4.513   & Gauss\\[0.5ex]
\par
27 & Co  &  1 &   3569.370  & $ 0.370$ &   0.92 &   73.6   &   2.656  & Gauss  & --     & --      & --   \\
27 & Co  &  1 &   3845.461  & $ 0.010$ &   0.92 &   62.1   &   2.532  & Gauss  &  55.4  & 2.046   & Gauss\\
27 & Co  &  1 &   3894.073  & $ 0.100$ &   1.05 &   74.0   &   2.883  & Gauss  & --     & --      & --   \\
27 & Co  &  1 &   3995.302  & $-0.220$ &   0.92 &   56.8   &   2.595  & Gauss  &  53.9  & 2.207   & Gauss\\
27 & Co  &  1 &   4118.767  & $-0.490$ &   1.05 &   42.1   &   2.670  & Gauss  &  30.9  & 2.126   & Gauss\\
27 & Co  &  1 &   4121.311  & $-0.320$ &   0.92 &   60.0   &   2.750  & Gauss  &  46.2  & 2.127   & Gauss\\[0.5ex]
\par
28 & Ni  &  1 &   3500.846  & $-1.279$ &   0.17 &   91.5   &   3.936  & Gauss  & --     & --      & --   \\
28 & Ni  &  1 &   3515.049  & $-0.211$ &   0.11 &  127.7   &   3.547  & Gauss  & --     & --      & --   \\
28 & Ni  &  1 &   3524.535  & $ 0.008$ &   0.03 &  154.4   &   3.524  & Gauss  & --     & --      & --   \\
28 & Ni  &  1 &   3566.366  & $-0.236$ &   0.42 &  107.3   &   3.519  & Gauss  & --     & --      & --   \\
28 & Ni  &  1 &   3619.386  & $ 0.035$ &   0.42 &  117.8   &   3.414  & Gauss  & --     & --      & --   \\
28 & Ni  &  1 &   3775.565  & $-1.393$ &   0.42 &   83.4   &   3.881  & Gauss  & --     & --      & --   \\
28 & Ni  &  1 &   3783.524  & $-1.310$ &   0.42 &  --      &   --     & --     &  76.9  & 3.268   & Gauss\\
28 & Ni  &  1 &   3807.138  & $-1.205$ &   0.42 &   86.7   &   3.770  & Gauss  &  83.8  & 3.348   & Gauss\\
28 & Ni  &  1 &   3858.292  & $-0.936$ &   0.42 &   93.0   &   3.649  & Gauss  &  89.5  & 3.221   & Gauss\\
28 & Ni  &  1 &   5476.900  & $-0.890$ &   1.83 &  --      &   --     & --     &  35.5  & 3.225   & Gauss\\[0.5ex]
\par
30 & Zn  &  1 &   4722.153  & $-0.338$ &   4.03 &    8.1   &   2.196  & Gauss  & --     & --      & --   \\
30 & Zn  &  1 &   4810.528  & $-0.137$ &   4.08 &   12.8   &   2.266  & Gauss  &   5.9  & 1.696   & Gauss\\[0.5ex]
\par
38 & Sr  &  2 &   4077.719  & $ 0.170$ &   0.00 &  126.4   &   0.512  & Gauss  & 130.0  & 0.286   & Gauss\\
38 & Sr  &  2 &   4215.519  & $-0.170$ &   0.00 &  115.9   &   0.611  & Gauss  & 118.3  & 0.340   & Gauss\\[0.5ex]
\par
39 & Y   &  2 &   3549.005  & $-0.280$ &   0.13 &   31.5   & $-0.291$ & Gauss  &  41.9  & $-0.427$& Gauss\\
39 & Y   &  2 &   3584.518  & $-0.410$ &   0.10 &   38.4   & $-0.035$ & Gauss  & --     & --      & --   \\
39 & Y   &  2 &   3600.741  & $ 0.280$ &   0.18 &   49.4   & $-0.379$ & Gauss  &  63.3  & $-0.370$& Gauss\\
39 & Y   &  2 &   3601.919  & $-0.180$ &   0.10 &   34.7   & $-0.354$ & Gauss  & --     & --      & --   \\
39 & Y   &  2 &   3611.044  & $ 0.110$ &   0.13 &   45.0   & $-0.376$ & Gauss  &  49.2  & $-0.655$& Gauss\\
39 & Y   &  2 &   3628.705  & $-0.710$ &   0.13 &   17.6   & $-0.244$ & Gauss  & --     & --      & --   \\
39 & Y   &  2 &   3633.122  & $-0.100$ &   0.00 &   52.6   & $-0.122$ & Gauss  &  52.7  & $-0.511$& Gauss\\
39 & Y   &  2 &   3788.694  & $-0.070$ &   0.10 &   48.5   & $-0.222$ & Gauss  &  58.3  & $-0.365$& Gauss\\
39 & Y   &  2 &   3818.341  & $-0.980$ &   0.13 &   15.7   & $-0.093$ & Gauss  &  18.8  & $-0.368$& Gauss\\
39 & Y   &  2 &   3950.352  & $-0.490$ &   0.10 &   29.6   & $-0.258$ & Gauss  &  35.9  & $-0.495$& Gauss\\
39 & Y   &  2 &   3982.594  & $-0.490$ &   0.13 &   30.6   & $-0.212$ & Gauss  &  36.2  & $-0.464$& Gauss\\
39 & Y   &  2 &   4358.728  & $-1.320$ &   0.10 &   --     & --       & --     &  14.1  & $-0.283$& Gauss\\
39 & Y   &  2 &   4374.935  & $ 0.160$ &   0.41 &   47.0   & $-0.262$ & Gauss  & --     & --      & --   \\
39 & Y   &  2 &   4398.013  & $-1.000$ &   0.13 &   14.5   & $-0.191$ & Gauss  &  17.2  & $-0.473$& Gauss\\
39 & Y   &  2 &   4883.680  & $ 0.070$ &   1.08 &   12.1   & $-0.349$ & Gauss  &  15.5  & $-0.549$& Gauss\\
39 & Y   &  2 &   5087.416  & $-0.170$ &   1.08 &   --     & --       & --     &   9.6  & $-0.566$& Gauss\\
39 & Y   &  2 &   5205.724  & $-0.340$ &   1.03 &   --     & --       & --     &   6.4  & $-0.655$& Gauss\\[0.5ex]
\par
40 & Zr  &  2 &   3479.029  & $-0.690$ &   0.53 &   --     & --       & --     &  13.1  & 0.130   & Gauss\\
40 & Zr  &  2 &   3479.383  & $ 0.170$ &   0.71 &   --     & --       & --     &  42.8  & 0.284   & Gauss\\
40 & Zr  &  2 &   3505.682  & $-0.360$ &   0.16 &   37.2   & $ 0.425$ & Gauss  &  50.5  & 0.371   & Gauss\\
40 & Zr  &  2 &   3551.939  & $-0.310$ &   0.09 &   43.0   & $ 0.428$ & Gauss  & --     & --      & --   \\
40 & Zr  &  2 &   3613.102  & $-0.465$ &   0.04 &   49.6   & $ 0.672$ & Gauss  & --     & --      & --   \\
40 & Zr  &  2 &   4149.217  & $-0.030$ &   0.80 &   26.6   & $ 0.405$ & Gauss  & --     & --      & --   \\
40 & Zr  &  2 &   4156.276  & $-0.776$ &   0.71 &   12.7   & $ 0.636$ & Gauss  & --     & --      & --   \\
40 & Zr  &  2 &   4161.213  & $-0.720$ &   0.71 &   14.8   & $ 0.661$ & Gauss  &  16.6  & 0.377   & Gauss\\
40 & Zr  &  2 &   4208.977  & $-0.460$ &   0.71 &   14.1   & $ 0.371$ & Gauss  &  20.8  & 0.236   & Gauss\\
40 & Zr  &  2 &   4496.980  & $-0.860$ &   0.71 &   10.3   & $ 0.583$ & Gauss  &  11.3  & 0.282   & Gauss\\[0.5ex]
\par
46 & Pd  &  1 &   3404.579  & $ 0.320$ &   0.81 &   --     & --       & --     &  17.3  & $-0.246$& Gauss\\
\par
56 & Ba  &  2 &   4130.645  & $ 0.680$ &   2.72 &     --   & $-0.10$  & synt HFS& --    & $-0.16$ & synt HFS\\
56 & Ba  &  2 &   4554.029  & $ 0.170$ &   0.00 &     --   & $-0.05$  & synt HFS& --    & --      & --   \\
56 & Ba  &  2 &   4934.076  & $-0.150$ &   0.00 &     --   & $-0.05$  & synt HFS& --    & --      & --   \\
56 & Ba  &  2 &   5853.668  & $-1.000$ &   0.60 &     --   & --       & --      & --    & $-0.12$ & synt HFS\\
56 & Ba  &  2 &   6141.713  & $-0.076$ &   0.70 &     --   & $-0.20$  & synt HFS& --    & --      & --   \\[0.5ex]
\par
57 & La  &  2 &   3849.006  & $-0.450$ &   0.00 &   --     & --       & --      & --    & $-0.87$ & synt HFS\\
57 & La  &  2 &   3949.102  & $ 0.490$ &   0.40 &   --     & --       & --      & --    & $-0.90$ & synt HFS\\
57 & La  &  2 &   4086.709  & $-0.070$ &   0.00 &   --     & $-0.82$ & synt HFS & --    & $-0.81$ & synt HFS\\
57 & La  &  2 &   4196.546  & $-0.300$ &   0.32 &   --     & $-0.85$ & synt HFS  & --     & --      & --   \\
57 & La  &  2 &   4333.753  & $-0.060$ &   0.17 &   --     & $-0.90$ & synt HFS & --     & --      & --   \\[0.5ex]
\par
58 & Ce  &  2 &   3577.456  & $ 0.210$ &   0.47 &    --    & --       & --     &   8.1  & $-0.511$& Gauss\\
58 & Ce  &  2 &   3655.844  & $ 0.233$ &   0.32 &    --    & --       & --     &   7.3  & $-0.770$& Gauss\\
58 & Ce  &  2 &   3942.151  & $-0.180$ &   0.00 &    --    & --       & --     &  18.9  & $-0.300$& Gauss\\
58 & Ce  &  2 &   3999.237  & $ 0.232$ &   0.29 &    --    & --       & --     &  10.3  & $-0.700$& Gauss\\
58 & Ce  &  2 &   4031.332  & $ 0.080$ &   0.32 &    --    & --       & --     &   6.5  & $-0.745$& Gauss\\
58 & Ce  &  2 &   4073.474  & $ 0.230$ &   0.48 &    9.4   & $-0.172$ & Gauss  & --     & --      & --   \\
58 & Ce  &  2 &   4118.143  & $ 0.017$ &   0.70 &    --    & --       & --     &   5.3  & $-0.356$& Gauss\\
58 & Ce  &  2 &   4120.827  & $-0.130$ &   0.32 &    --    & --       & --     &   6.6  & $-0.539$& Gauss\\
58 & Ce  &  2 &   4127.364  & $ 0.106$ &   0.68 &    --    & --       & --     &   7.7  & $-0.284$& Gauss\\
58 & Ce  &  2 &   4137.645  & $ 0.246$ &   0.52 &    7.5   & $-0.264$ & Gauss  &  14.5  & $-0.303$& Gauss\\
58 & Ce  &  2 &   4222.597  & $-0.301$ &   0.12 &    4.8   & $-0.369$ & Gauss  &  10.0  & $-0.408$& Gauss\\
58 & Ce  &  2 &   4460.207  & $ 0.171$ &   0.48 &   10.2   & $-0.116$ & Gauss  & --     & --      & --   \\
58 & Ce  &  2 &   4486.909  & $-0.090$ &   0.29 &    --    & --       & --     &   7.6  & $-0.581$& Gauss\\
58 & Ce  &  2 &   4562.359  & $ 0.310$ &   0.48 &    7.5   & $-0.414$ & Gauss  &   8.4  & $-0.730$& Gauss\\ 
58 & Ce  &  2 &   4628.161  & $ 0.220$ &   0.52 &    6.6   & $-0.348$ & Gauss  &   9.0  & $-0.569$& Gauss\\[0.5ex]
\par
59 & Pr  &  2 &   4143.112  & $ 0.609$ &   0.37 &     --   & $-0.95$  & synt HFS& --    & $-1.13$ & synt HFS\\
59 & Pr  &  2 &   4222.934  & $ 0.271$ &   0.06 &     --   & --       & --     & --     & $-1.16$ & synt HFS\\
59 & Pr  &  2 &   4408.819  & $ 0.179$ &   0.00 &     --   & --       & --     & --     & $-1.22$ & synt HFS\\[0.5ex]
\par
60 & Nd  &  2 &   3990.097  & $ 0.130$ &   0.47 &     --   & --       & --     &   18.3 & $-0.363$& Gauss\\
60 & Nd  &  2 &   4021.327  & $-0.100$ &   0.32 &    8.8   & $-0.311$ & Gauss  &   13.1 & $-0.489$& Gauss\\
60 & Nd  &  2 &   4061.080  & $ 0.550$ &   0.47 &   20.3   & $-0.364$ & Gauss  &   33.8 & $-0.404$& Gauss\\
60 & Nd  &  2 &   4069.265  & $-0.570$ &   0.06 &    7.8   & $-0.189$ & Gauss  & --     & --      & --   \\
60 & Nd  &  2 &   4109.071  & $-0.160$ &   0.06 &   17.1   & $-0.205$ & Gauss  & --     & --      & --   \\
60 & Nd  &  2 &   4109.448  & $ 0.350$ &   0.32 &   23.5   & $-0.248$ & Gauss  & --     & --      & --   \\
60 & Nd  &  2 &   4232.374  & $-0.470$ &   0.06 &    8.6   & $-0.261$ & Gauss  &   14.4 & $-0.393$& Gauss\\
60 & Nd  &  2 &   4358.161  & $-0.160$ &   0.32 &     --   & --       & --     &   15.2 & $-0.392$& Gauss\\
60 & Nd  &  2 &   4446.384  & $-0.350$ &   0.20 &    6.0   & $-0.420$ & Gauss  &   12.5 & $-0.447$& Gauss\\      
60 & Nd  &  2 &   4462.979  & $ 0.040$ &   0.56 &   10.2   & $-0.167$ & Gauss  &   13.0 & $-0.411$& Gauss\\[0.5ex]
\par
62 & Sm  &  2 &   3568.271  & $ 0.284$ &   0.49 &   13.4   & $-0.423$ & Gauss  & --     & --      & --   \\
62 & Sm  &  2 &   3609.492  & $ 0.156$ &   0.28 &   19.7   & $-0.315$ & Gauss  & --     & --      & --   \\
62 & Sm  &  2 &   3661.352  & $-0.357$ &   0.04 &   --     & --       & --     & 21.9   & $-0.400$& Gauss\\
62 & Sm  &  2 &   3760.710  & $-0.403$ &   0.19 &   --     & --       & --     & 11.2   & $-0.591$& Gauss\\
62 & Sm  &  2 &   3896.972  & $-0.668$ &   0.04 &   --     & --       & --     &  9.9   & $-0.579$& Gauss\\
62 & Sm  &  2 &   4318.927  & $-0.246$ &   0.28 &    8.0   & $-0.508$ & Gauss  &  14.3  & $-0.595$& Gauss\\
62 & Sm  &  2 &   4424.337  & $ 0.140$ &   0.49 &    8.8   & $-0.630$ & Gauss  & --     & --      & --   \\
62 & Sm  &  2 &   4519.630  & $-0.352$ &   0.54 &   --     & --       & --     &  6.2   & $-0.612$& Gauss\\
62 & Sm  &  2 &   4642.230  & $-0.520$ &   0.38 &   --     & --       & --     &  5.1   & $-0.735$& Gauss\\[0.5ex]
\par
63 & Eu  &  2 &   3819.672  & $ 0.510$ &   0.00 &   --     & $-1.06$  & synt HFS& -- & $-1.07$ & synt HFS\\
63 & Eu  &  2 &   3907.107  & $ 0.170$ &   0.21 &   --     & $-1.02$  & synt HFS& -- & $-1.09$ & synt HFS\\
63 & Eu  &  2 &   4129.725  & $ 0.220$ &   0.00 &   --     & $-1.02$  & synt HFS& -- & $-1.03$ & synt HFS\\
63 & Eu  &  2 &   4205.042  & $ 0.210$ &   0.00 &   --     & $-1.01$  & synt HFS& -- & --      & --      \\[0.5ex]
\par
64 & Gd  &  2 &   3336.184  & $-0.457$ &   0.00 &   --     &  --        & --     &  15.2  & $-0.348$& Gauss\\
64 & Gd  &  2 &   3423.924  & $-0.520$ &   0.00 &   --     &  --        & --     &  12.1  & $-0.421$& Gauss\\
64 & Gd  &  2 &   3549.359  & $ 0.260$ &   0.24 &   22.0   &  $-0.228$  & Gauss  &  33.4  & $-0.313$& Gauss\\
64 & Gd  &  2 &   3557.058  & $ 0.210$ &   0.60 &   --     &  --        & --     &  13.4  & $-0.427$& Gauss\\
64 & Gd  &  2 &   3646.196  & $ 0.328$ &   0.24 &   20.5   &  $-0.332$  & Gauss  & --     & --      & --   \\
64 & Gd  &  2 &   3654.624  & $-0.030$ &   0.08 &   19.2   &  $-0.214$  & Gauss  &  22.3  & $-0.510$& Gauss\\
64 & Gd  &  2 &   3813.977  & $-0.215$ &   0.00 &   --     &  --        & --     &  32.8  & $-0.209$& Gauss\\
64 & Gd  &  2 &   3844.578  & $-0.400$ &   0.14 &   --     &  --        & --     &  11.3  & $-0.495$& Gauss\\
64 & Gd  &  2 &   3916.509  & $ 0.103$ &   0.60 &    9.1   &  $-0.238$  & Gauss  & --     & --      & --   \\
64 & Gd  &  2 &   4037.893  & $-0.230$ &   0.56 &   --     &  --        & --     &   6.3  & $-0.503$& Gauss\\
64 & Gd  &  2 &   4049.855  & $ 0.429$ &   0.99 &    8.3   &  $-0.199$  & Gauss  & --     & --      & --   \\
64 & Gd  &  2 &   4085.558  & $-0.070$ &   0.73 &    4.0   &  $-0.330$  & Gauss  & --     & --      & --   \\
64 & Gd  &  2 &   4130.366  & $-0.090$ &   0.73 &   --     &  --        & --     &   6.4  & $-0.446$& Gauss\\
64 & Gd  &  2 &   4191.075  & $-0.570$ &   0.43 &    3.4   &  $-0.249$  & Gauss  &   4.6  & $-0.475$& Gauss\\
64 & Gd  &  2 &   4251.731  & $-0.365$ &   0.38 &    6.6   &  $-0.204$  & Gauss  & --     & --      & --   \\[0.5ex]
\par
66 & Dy  &  2 &   3407.796  & $ 0.180$ &   0.00 &   --     & --         & --     &  50.6  & $-0.263$& Gauss\\
66 & Dy  &  2 &   3454.317  & $-0.140$ &   0.10 &   --     & --         & --     &  28.9  & $-0.406$& Gauss\\
66 & Dy  &  2 &   3460.969  & $-0.070$ &   0.00 &   --     & --         & --     &  38.7  & $-0.351$& Gauss\\
66 & Dy  &  2 &   3506.815  & $-0.440$ &   0.10 &   --     & --         & --     &  17.2  & $-0.445$& Gauss\\
66 & Dy  &  2 &   3531.707  & $ 0.790$ &   0.00 &   --     & --         & --     &  68.4  & $-0.332$& Gauss\\
66 & Dy  &  2 &   3536.019  & $ 0.530$ &   0.54 &   26.7   &  $-0.290$  & Gauss  &  35.1  & $-0.437$& Gauss\\
66 & Dy  &  2 &   3538.519  & $-0.020$ &   0.00 &   29.9   &  $-0.250$  & --     &  40.8  & $-0.366$& Gauss\\
66 & Dy  &  2 &   3563.148  & $-0.360$ &   0.10 &   --     & --         & --     &  26.4  & $-0.269$& Gauss\\
66 & Dy  &  2 &   3694.810  & $-0.110$ &   0.10 &   23.1   &  $-0.251$  & Gauss  &  33.9  & $-0.359$& Gauss\\
66 & Dy  &  2 &   3869.864  & $-1.050$ &   0.00 &    6.7   &  $-0.134$  & Gauss  & --     & --      & --   \\
66 & Dy  &  2 &   3944.681  & $ 0.100$ &   0.00 &   42.8   &  $-0.179$  & Gauss  & --     & --      & --   \\
66 & Dy  &  2 &   3983.651  & $-0.310$ &   0.54 &   --     & --         & --     &  12.1  & $-0.361$& Gauss\\
66 & Dy  &  2 &   3996.689  & $-0.260$ &   0.59 &   --     & --         & --     &  12.4  & $-0.340$& Gauss\\
66 & Dy  &  2 &   4000.450  & $ 0.060$ &   0.10 &   35.6   &  $-0.200$  & Gauss  & --     & --      & --   \\
66 & Dy  &  2 &   4077.966  & $-0.040$ &   0.10 &   30.6   &  $-0.227$  & Gauss  &  48.7  & $-0.197$& Gauss\\
66 & Dy  &  2 &   4111.343  & $-0.850$ &   0.00 &    9.2   &  $-0.213$  & Gauss  & --     & --      & --   \\[0.5ex]
\par
67 & Ho  &  2 &   3398.901  & $ 0.410$ &   0.00 &   --     &  --        & --     & --     & $-1.09$ & synt HFS\\
67 & Ho  &  2 &   3810.738  & $ 0.142$ &   0.00 &   --     &  $-1.02$  & synt HFS  & --     & $-1.17$ & synt HFS\\
\par
68 & Er  &  2 &   3559.894  & $-0.694$ &   0.00 &   10.9   &  $-0.315$  & Gauss  & --     & --      & --   \\
68 & Er  &  2 &   3616.566  & $-0.306$ &   0.00 &   23.6   &  $-0.275$  & Gauss  &  31.4  & $-0.457$& Gauss\\
68 & Er  &  2 &   3786.836  & $-0.520$ &   0.00 &   13.8   &  $-0.423$  & Gauss  & --     & --      & --   \\
68 & Er  &  2 &   3896.234  & $-0.118$ &   0.05 &   22.4   &  $-0.513$  & Gauss  &  31.8  & $-0.655$& Gauss\\
68 & Er  &  2 &   3906.312  & $ 0.122$ &   0.00 &   40.8   &  $-0.373$  & Gauss  & --     & --      & --   \\[0.5ex]
\par
69 & Tm &   2 &   3848.020  & $-0.130$ &   0.00 &   --     &  --        & --     & --     & $-1.51$ & synt \\[0.5ex]
\par
72 & Hf  &  2 &   3399.793  & $-0.57$ &   0.00 &   --     &  --        & --     & --     & $-0.97$ & synt \\[0.5ex]
\par
76 & Os  &  1 &   4260.849  & $-1.470$ &   0.00 &   --     & $< 0.03$   & synt upper limit  & --     & --      & --   \\[0.5ex]
\par
90 & Th  &  2 &   4019.129  & $-0.228$ &   0.00 &   --     &  $-1.43$   & synt   & --     & $-1.29$  & synt\\\hline
\end{tabular}
\end{table}