\begin{table}%t6
\caption{ Mean values and standard deviations of the system parameters for the observed
transiting planets and our simulated detections.}
\label{table:mean_sigma}
%\centering
\par
\begin{tabular}{cccccccccc}
\hline\hline\multicolumn{10}{c}{{\bf Real planets}} \\
& $M_{\rm p}$ & $R_{\rm p}$ & $P$ & $T_{\rm eq}$& $M_{\star}$& $R_{\star}$& $T_{\rm eff}$ &${\rm [Fe/H]}$ & $\theta$ \\
mean & 1.834 &1.235 &3.387 &1510&1.094 &1.164&5764 &0.087 &0.148 \\
$\sigma$ & 2.645& 0.178 &3.540& 300.2& 0.186& 0.304& 464& 0.187& 0.270 \\
\hline\multicolumn{10}{c}{{\bf Simulated detections}} \\
& $M_{\rm p}$ &$R_{\rm p}$ & $P$ & $T_{\rm eq}$& $M_{\star}$& $R_{\star}$& $T_{\rm eff}$&${\rm [Fe/H]}$ &$\theta$ \\
mean & 1.655& 1.248 &3.217 &1564 &1.073 &1.167&5813 &0.07805&0.129 \\
$\sigma$ & 2.401& 0.186 &2.897& 411.0&
0.195& 0.324& 599& 0.217& 0.270
\\
\hline\end{tabular}\end{table}