\begin{table}%t3
\caption{\label{table_soc}$\lambda$-Ori candidates detected in the SofI-Omega2000-CFHT12K-SuprimeCam (SOC) images.}
\par
 {
%\centerline
{
\begin{tabular}{lccccccccccc}
\hline\hline
Name & RA         & Dec       & $i$ & $J$ & $H$ & $K$s & [3.6] & [4.5] & [5.8] & [8.0]  & LOri-CFHT \\
     & (J2000)    & (J2000)   & [mag] & [mag]& [mag]& [mag]& [mag]& [mag]& [mag]& [mag] \\
\hline
LOri-SOC-1	 &  05:34:55.53 & +09:56:10.09 & 16.39~$\pm$~0.01 & 14.59~$\pm$~0.06 & $14.16\pm0.01$ & 13.80~$\pm$~0.05 & 13.44~$\pm$~0.01 & 13.85~$\pm$~0.02 & 13.37~$\pm$~0.03 & ...     \\
LOri-SOC-2	 &  05:34:56.67 & +09:54:54.12 & 16.21~$\pm$~0.01 & 14.27~$\pm$~0.06 & $13.67\pm0.01$ & 13.30~$\pm$~0.04 & 13.34~$\pm$~0.01 & 12.90~$\pm$~0.01 & 13.20~$\pm$~0.03 & 13.06~$\pm$~0.05 &   \\
LOri-SOC-3	 &  05:35:00.90 & +09:54:40.39 & 20.84~$\pm$~0.02 & 18.12~$\pm$~0.06 & $17.58\pm0.02$ & 16.89~$\pm$~0.10 & 17.13~$\pm$~0.05 &  ...       &  ...       & ...    \\
LOri-SOC-4	 &  05:35:00.95 & +09:58:20.33 & 18.34~$\pm$~0.01 & 16.02~$\pm$~0.06 & $15.62\pm0.01$ & 14.95~$\pm$~0.13 & 14.77~$\pm$~0.02 & 14.64~$\pm$~0.02 & 14.07~$\pm$~0.05 & 13.68~$\pm$~0.07 & 143 \\
LOri-SOC-5	 &  05:35:03.03 & +09:55:47.31 & 22.08~$\pm$~0.04 & 18.73~$\pm$~0.06 & $18.36\pm0.12$ & 17.25~$\pm$~0.10 &  ...       & 16.67~$\pm$~0.07 & 15.65~$\pm$~0.22 & ...     \\
LOri-SOC-6	 &  05:35:03.73 & +09:54:13.93 & 17.33~$\pm$~0.01 & 15.65~$\pm$~0.06 & $15.14\pm0.01$ & 14.65~$\pm$~0.09 & 14.43~$\pm$~0.02 & 14.24~$\pm$~0.02 & 14.37~$\pm$~0.07 & 13.83~$\pm$~0.08 &  \\
LOri-SOC-7	 &  05:35:04.46 & +09:57:32.08 & 20.45~$\pm$~0.01 & 17.42~$\pm$~0.06 & $16.94\pm0.01$ & 16.33~$\pm$~0.10 & 16.03~$\pm$~0.02 & 16.42~$\pm$~0.05 &  ...       & ...  & 162   \\
LOri-SOC-8	 &  05:35:06.32 & +09:58:01.38 & 17.61~$\pm$~0.01 & 15.59~$\pm$~0.06 & $15.17\pm0.01$ & 14.73~$\pm$~0.09 & 14.22~$\pm$~0.01 & 14.07~$\pm$~0.02 & 14.00~$\pm$~0.06 & ... & 128    \\
LOri-SOC-9	 &  05:35:07.08 & +09:54:01.51 & 16.94~$\pm$~0.01 & 14.75~$\pm$~0.06 & $14.24\pm0.01$ & 13.69~$\pm$~0.09 & 13.63~$\pm$~0.01 & 12.58~$\pm$~0.01 & 12.60~$\pm$~0.02 & 11.78~$\pm$~0.02 & 104 \\
LOri-SOC-10	 &  05:35:07.79 & +09:55:21.84 & 19.80~$\pm$~0.01 & 16.89~$\pm$~0.06 & $16.32\pm0.01$ & 15.63~$\pm$~0.09 & 14.80~$\pm$~0.02 & 14.30~$\pm$~0.02 &  ...       & ...     \\
LOri-SOC-11	 &  05:35:09.10 & +09:54:36.07 & 19.00~$\pm$~0.01 & 16.46~$\pm$~0.06 & $16.00\pm0.01$ & 15.36~$\pm$~0.09 & 14.91~$\pm$~0.02 & 14.99~$\pm$~0.02 & 14.84~$\pm$~0.10 & ...     \\
LOri-SOC-12	 &  05:35:10.65 & +09:57:23.31 & 21.62~$\pm$~0.03 & 18.66~$\pm$~0.06 & $17.98\pm0.04$ & 17.12~$\pm$~0.10 & 16.78~$\pm$~0.04 & 16.06~$\pm$~0.04 &  ...       & ...     \\
LOri-SOC-13	 &  05:35:10.78 & +09:56:06.48 & 18.16~$\pm$~0.01 & 15.94~$\pm$~0.06 & $15.56\pm0.01$ & 14.92~$\pm$~0.09 & 14.30~$\pm$~0.01 & 13.59~$\pm$~0.01 &  ...       & 13.77~$\pm$~0.08 &   \\
LOri-SOC-14	 &  05:35:10.97 & +09:57:43.95 & 16.46~$\pm$~0.01 & 14.16~$\pm$~0.06 & $13.70\pm0.01$ & 13.27~$\pm$~0.09 & 13.01~$\pm$~0.01 & 12.68~$\pm$~0.01 & 12.70~$\pm$~0.02 & 12.58~$\pm$~0.03 & 76 \\
LOri-SOC-15	 &  05:35:11.14 & +09:57:19.68 & 16.60~$\pm$~0.01 & 14.69~$\pm$~0.06 & $14.20\pm0.01$ & 13.63~$\pm$~0.09 & 13.14~$\pm$~0.01 & 12.71~$\pm$~0.01 & 12.63~$\pm$~0.02 & 11.99~$\pm$~0.02 & 96 \\
LOri-SOC-16	 &  05:35:14.17 & +09:54:08.05 & 20.92~$\pm$~0.02 & 18.04~$\pm$~0.06 & $17.20\pm0.01$ & 16.56~$\pm$~0.10 & 16.06~$\pm$~0.02 &  ...       &  ...       & ...    & 167  \\
\hline
\end{tabular}}}
\medskip
\par
Note -- Uncertainties correspond to the measurement uncertainties. Zeropoint uncertaintes as given in the text should be added quadratically. 
\end{table}