\begin{table}%t8
%\centering
\par
 \caption{Swift GRBs with no measured redshifts; Part V.}
 \begin{tabular}{lrrr} \hline \hline
GRB & $T_{90}$   & fluence  & peak-flux  \\
    &  s   & $10^{-7}$~erg/cm$^2$   & ph/(cm$^2$ s) \\
\hline
050925 & 0.1 & 0.75 & 1.50 \\
050922B & 250.0 & 26.00 & 1.02 \\
050916   & 90.0 & 11.00 & 0.69 \\
050915B & 40.0 & 34.00 & 2.34 \\
050915A & 53.0 & 8.80 & 0.80 \\
050911 & 16.0 & 3.01 & 1.31 \\
050906 & 0.1 &  0.07 & 1.15 \\
050827   & 49.0 & 21.20 & 1.86 \\
050822   & 102.0 & 26.10 & 2.47 \\
050820B & 13.0 & 21.20 & 4.06 \\
050819   & 36.0 & 3.52 & 0.39 \\
050815   & 2.8 & 0.92 & 0.56 \\
050801   & 20.0 & 3.12 & 1.47 \\
050721   & 39.0 & 30.80 & 3.08 \\
050717   & 86.0 & 61.70 & 6.34 \\
050715   & 52.0 & 14.40 & 1.07 \\
050713A & 70.0 & 52.50 & 4.78 \\
050712 & 48.0 & 11.00 & 0.55 \\
050701   & 22.0 & 13.60 & 2.77 \\
050607   & 26.5 & 6.05 & 0.99 \\
050528   & 10.8 & 4.40 & 1.23 \\
050509A & 11.6 & 3.38 & 0.88 \\
050502B & 17.5 & 4.72 & 1.43 \\
050422   & 59.2 & 6.15 & 0.57 \\
050421   & 10.3 & 1.18 & 0.44 \\
050418 & 83.0 & 53.90 & 3.80 \\
050416B & 5.4 & 11.30 & 5.85 \\
050412 & 26.0 & 5.66 & 0.49 \\
050410 & 43.0 & 43.00 & 1.80 \\
050326   & 29.5 & 90.50  & 12.40 \\
050306   & 160.0 & 120.00 & 3.64 \\
050219B & 27.0 & 164.00 & 25.40 \\
050219A & 23.0 & 42.10 & 3.61 \\
050215B & 8.0 & 2.33 & 0.68 \\
050215A & 6.0 & 7.29 & 0.51 \\
050202 & 0.1 & 0.33 & 2.98 \\
050128   & 13.8 & 51.70 & 7.59 \\
050124   & 4.1 & 12.30 & 5.57 \\
050117  & 169.0 & 91.20 & 2.40 \\
041228 & 62.0 & 36.10 & 1.65 \\
041226 & 15.0 & 3.23 & 0.34 \\
041224  & 235.0 & 75.30 & 2.95 \\
041223  & 107.0 & 171.00 & 7.49 \\
041220 & 5.0 & 3.82 & 1.83 \\
041219C & 40.0 & 20.00 & 1.50 \\
041219B & 30.0 & n/a & 10.00 \\
041219A & 520.0 & 1000.00 & 25.00 \\
041217  & 7.5 &  65.70 & 4.40 \\
\hline
\end{tabular} 
 \end{table}