\begin{table}%ta.1
\caption{\label{tabpar}Measurements of the oscillations in fanlike loops found in the EIS sit-and-stare data in  the Fe~{\sc xii} (195~\AA) line$^a$.}
%\centerline
 {\small \begin{tabular}{lcccc}
\hline\hline
 Oscillation & $P_V$ & $P_I$ & $A_V$ & $A_I$ \\
  No.        & (min) & (min) & (km~s$^{-1}$) & (\%) \\
\hline
1 & $25.6 \pm 6.3$ & $26.2 \pm 4.9$ & $1.6 \pm 0.5$ & $4.9 \pm 1.5$\\
%\hline
2$^{b}$ & $25.1 \pm 7.0$ & $26.2 \pm 5.0$ & $1.3 \pm 0.3$ & $3.8 \pm 0.6$\\
  & $11.9 \pm 2.8$ & $13.5 \pm 4.7$ & -- &  -- \\
%\hline
3 & $11.2 \pm 3.8$ & $11.2 \pm 2.9$ & $1.0 \pm 0.3$ & $2.8 \pm 0.7$\\
\hline
\end{tabular}}
\medskip
$^a$ $P_V$ and $P_I$ are periods and $A_V$ and $A_I$ are amplitudes for the Doppler shift  and relative intensity oscillations, respectively;
$^b$ two harmonic components are found for oscillation~2.
\end{table}