\begin{table}%t1
\caption{\label{table}Maximal density compression ratios.}
%\centering
\small
\begin{tabular}{c|cccc|c} 
\hline\hline
$\beta$ & 4    & 6    & 8    & 10   & $\infty$ \\ 
\hline
$\nu$   & 2.36 & 2.96 & 3.44 & 3.86 & $\infty$ \\ 
\hline
\end{tabular}
\end{table}