\begin{table}%t5
      \caption{Photometry of the nearby galaxy (not corrected for Galactic extinction).}
         \label{photom-gal}
     $$ 
         \begin{tabular}{cccc}
            \hline  \hline
        Filter & Magnitude & $\Delta$mag & Exposure (s)  \cr
\noalign{\smallskip}
            \hline
            \noalign{\smallskip}
$U$  & 23.34 & 0.3 & 1500 \cr
$B$  & 22.54 & 0.06 & 810 \cr
$V$  & 21.02 & 0.03 & 360 \cr
$R$ & 20.24 & 0.02 & 360 \cr
$I_{\rm int}^{{a}}$  & 19.70 & 0.03 & 180 \cr
$J $                & 17.63 & 0.05 & 2880 \cr
            \noalign{\smallskip}
            \hline
         \end{tabular}
     $$ 
\begin{list}{}{}
\item[$^{{a}}$] Filter $I_{\rm int}$ is centered at $\lambda=7970$~\AA~($FWHM=157$~\AA) \#12 interference $I$ filter
more details in {\url{http://www.not.iac.es/instruments/filters/filterlist.html}}
\end{list}
   \end{table}