\begin{table}%t1
%\centering
\par
\caption{\label{fits} Fit parameters of the LMC data sample.} 
\begin{tabular}{lcccccccc}
\noalign{\smallskip}
\hline \hline
\noalign{\smallskip}
 Frequency&$a$&$\Delta a$&$\beta$&$\Delta \beta$&$r$&$r^2$[\%]&$Q$&${\rm \frac{WSSR}{ndof}}$\\
\noalign{\smallskip}
\hline \noalign{\smallskip}
8.64  GHz&--19.7&0.3&--2.6&0.4&--0.94&88.36&$5.02\times 10^{-2}$&2.60\\
\noalign{\smallskip}
4.80   GHz&--18.1&0.5&--0.9&0.5&--0.64&40.96&$9.96\times 10^{-2}$&2.08\\
\hline 
 \end{tabular}
 \end{table}