\begin{table}%t1
\caption{\label{moments}Values of the moments of the eclipses of HD~5980 used throughout this paper.}
%\centerline
 {\small \begin{tabular}{l c c c}
\hline \hline
& Primary eclipse & \multicolumn{2}{c}{Secondary eclipse} \\
\cline{3-4}
& Ingress & Ingress & Egress \\ 
\hline 
B$_2$&$.00935 \pm .00026$&$.00832 \pm .00041$&$.00481 \pm .00024$ \\
B$_4$&$.01801 \pm .00048$&$.01542 \pm .00065$&$.00922 \pm .00043$ \\
B$_6$&$.02604 \pm .00067$&$.02164 \pm .00080$&$.01326 \pm .00059$ \\
B$_8$&$.03351 \pm .00083$&$.02721 \pm .00088$&$.01699 \pm .00071$ \\
B$_{10}$&$.04046 \pm .00097$&$.03226 \pm .00094$&$.02044 \pm .00082$ \\ 
\hline
\end{tabular}}
\medskip
These values are derived from the light curve prior to the 1994~LBV event.
\end{table}