\begin{table}
%\centering
\caption {\label{tab2}Bright sources in the area of SNR G65.2+5.7 fitted from the 
Effelsberg $\lambda$11~cm and  Urumqi at $\lambda$6~cm maps, including
source positions, flux densities from the NVSS at $\lambda$21~cm, as well as spectral indices. Sources
``outside'' G65.2+5.7 are listed for completeness.}
\begin{tabular}{r c c c c c c c}
\hline\hline
   &NVSS &NVSS & {$S_{\rm NVSS}$} &
   {$S_{11~\rm cm}$} &{$S_{6~\rm cm}$} & $\alpha$  &Comment \\
   
   &$\alpha_{2000}$ &$\delta_{2000}$ & {(mJy)} & {(mJy)} & {(mJy)}  &  & \\
\hline
 1 &19 23 25.26 &30 42 35.4 &574.4 $\pm$ 19.1 &300 $\pm$ 14 &159 $\pm$ 16 &--0.83 $\pm$ 0.05 & \\
 2 &19 25 13.64 &30 31 18.9 & 70.3 $\pm$ 2.1 & 43 $\pm$ 7  & 31 $\pm$ 5  &--0.81 $\pm$ 0.19 &\\
 3 &19 25 27.29 &31 29 23.9 &384.3 $\pm$ 12.6 &222 $\pm$ 12 &171 $\pm$ 9  &--0.64 $\pm$ 0.07 &\\
 4 &19 26 16.04 &32 35 51.6 &105.4 $\pm$ 3.9 & 47 $\pm$ 14 &       &--1.28 $\pm$ 0.49 &\\
 5 &19 26 40.65 &32 56 55.9 & 67.1 $\pm$ 3.0 & 48 $\pm$ 12 &       &--0.53 $\pm$ 0.42 &3 unresolved sources\\
 6 &19 26 56.04 &29 37 19.6 &193.2 $\pm$ 6.0 &111 $\pm$ 6  & 67 $\pm$ 17 &--0.84 $\pm$ 0.14 &outside\\
 7 &19 27 11.53 &29 52 54.5 & 51.6 $\pm$ 2.2 & 28 $\pm$ 9  & 24 $\pm$ 5  &--0.77 $\pm$ 0.21 &outside\\
 8 &19 27 33.05 &32 14 01.3 & 79.2 $\pm$ 2.8 & 52 $\pm$ 9  & 43 $\pm$ 8  &--0.72 $\pm$ 0.18 &\\
 9 &19 30 28.65 &30 27 42.0 &113.1 $\pm$ 3.4 & 71 $\pm$ 4  & 37 $\pm$ 4  &--1.03 $\pm$ 0.15 &\\
10 &19 30 46.84 &31 05 59.1 &126.2 $\pm$ 4.4 & 62 $\pm$ 8  & 43 $\pm$ 9  &--0.80 $\pm$ 0.15 &\\

11 &19 31 08.60 &31 22 33.5 &428.6 $\pm$ 12.9 &311 $\pm$ 11 &232 $\pm$ 14 &--0.63 $\pm$ 0.05 &11/6~cm fit\\

12 &19 31 14.43 &29 12 35.2 & 67.7 $\pm$ 2.1 & 59 $\pm$ 16 & 55 $\pm$ 5  &--0.66 $\pm$ 0.19 &outside\\
13 &19 32 45.08 &31 06 10.7 & 35.8 $\pm$ 1.1 & 38 $\pm$ 8  &    &      0.09 $\pm$ 0.35 &   \\        
14 &19 33 48.95 &30 51 45.1 & 64.7 $\pm$ 2.0 & 90 $\pm$ 15 & 98 $\pm$ 8  & 0.14 $\pm$ 0.07 &11/6~cm fit\\
15 &19 34 19.84 &29 20 07.4 & 65.5 $\pm$ 2.3 & 59 $\pm$ 9  & 37 $\pm$ 8  &--0.84 $\pm$ 0.20 &outside\\
16 &19 34 38.47 &32 24 47.8 &625.7 $\pm$ 18.8 &299 $\pm$ 13 &146 $\pm$ 13 &--0.80 $\pm$ 0.04 &\\
17 &19 34 45.20 &30 30 58.8 &235.2 $\pm$ 7.1 &469 $\pm$ 14 &579 $\pm$ 23 &0.35 $\pm$ 0.11 &\\
18 &19 35 34.24 &30 08 00.9 &688.7 $\pm$ 23.8 &359 $\pm$ 43 &183 $\pm$ 22 &--0.81 $\pm$ 0.04 &\\
19 &19 35 56.39 &33 08 22.0 & 77.0 $\pm$ 2.3 &216 $\pm$ 10 &250 $\pm$ 16 & 0.24 $\pm$ 0.18 &outside, 11/6~cm fit\\
20 &19 36 58.60 &31 17 25.8 &149.7 $\pm$ 4.5 & 93 $\pm$ 9  & 55 $\pm$ 14 &--0.89 $\pm$ 0.16 &\\
21 &19 38 38.31 &30 23 55.4 & 92.6 $\pm$ 2.8 &172 $\pm$ 15 &171 $\pm$ 18 &--0.01 $\pm$ 0.29 &11/6~cm fit\\
22 &19 40 03.36 &31 37 40.6 &538.5 $\pm$ 18.4 &353 $\pm$ 15 &220 $\pm$ 17 &--0.77 $\pm$ 0.05 &\\
23 &19 40 26.13 &31 06 23.9 &199.4 $\pm$ 6.0 &112 $\pm$ 15 & 61 $\pm$ 8  &--0.94 $\pm$ 0.14 &\\
24 &19 40 39.90 &29 44 46.8 &300.1 $\pm$ 10.6 &147 $\pm$ 9  & 73 $\pm$ 17 &--0.92 $\pm$ 0.11 &outside\\
25 &19 42 14.83 &32 15 38.7 &177.2 $\pm$ 5.3 & 98 $\pm$ 12 &     &--0.93 $\pm$ 0.23 &\\
26 &19 42 29.66 &32 24 46.9 & 83.3 $\pm$ 2.5 & 58 $\pm$ 12 &     &--0.58 $\pm$ 0.35 &outside\\ 
27 &19 43 00.76 &31 58 14.2 & 76.3 $\pm$ 2.3 & 60 $\pm$ 10 & 43 $\pm$ 16 &--0.79 $\pm$ 0.20 &\\
28 &19 44 05.01 &30 46 45.8 &156.6 $\pm$ 4.7 & 82 $\pm$ 4  & 37 $\pm$ 12 &--0.96 $\pm$ 0.16 &outside\\
\hline
\end{tabular}
\end{table}