\begin{table}%t1
\caption{\label{parameters}Adopted atmospheric parameters for the analysed stars.}
%\centerline
{
\begin{tabular}{cccccccc}
\hline
\hline
Star & \Teff & \logg  & \vmic  & \errvmic  & \vsini & \errvsini & \vr    \\
Name &   [K] & [cgs]  & [\kms] & [\kms]    & [\kms] & [\kms]    & [\kms] \\
\hline											
21~Peg    & 10400 & 3.55 & 0.5 & 0.4 & 3.76 & 0.35 &  0.5    \\
HD~145788 &  9750 & 3.70 & 1.3 & 0.2 & 10.0 & 0.5  & $-$13.9 \\
$\pi$~Cet & 12800 & 3.75 & 1.0 & 0.5 & 20.2 & 0.9  &  12.5   \\
\hline
\end{tabular}}
\smallskip 
\par
The uncertainties on \Teff, \logg, and \vr\ are 200~K, 0.1~dex, and 0.5~\kms, respectively.
\end{table}