\begin{table}%t2
%\centering
\par
\caption{\label{Table_energies}Maximum energies achieved by acelerated particles in the bow shock. 
The values are in eV units and represent the different values of $R_{\rm c}$ and $B$ studied in this work.}
\begin{tabular}{c|cccc}
\hline \hline\noalign{\smallskip} 
$R_{\rm c}$ [cm] & $10^{10}$ & $10^{10}$ & $10^{11}$ & $10^{11}$ \\
$B_{\rm bs}$ [G] & $1$ & $150$ & $1$ & $150$ \\ 
\hline \noalign{\smallskip} 
$E_{\rm e}^{\rm max}$ [eV] & $1.5\times 10^{11}$ & $8\times 10^{11}$ & 
$1.5\times10^{12}$ & $8\times 10^{11}$  \\  
$E_{\rm p}^{\rm max}$ [eV]& $6\times 10^{11}$ & $9\times 10^{13}$ & 
$6\times10^{12}$ & $9\times 10^{14}$  \\   
\hline
\end{tabular}
\end{table}