\begin{table}%t7
\caption{\label{modelDB}Best-fit parameters for HIP~96515~B.}
\small%\centerline
 {
\begin{tabular}{ll}
\hline\hline 
$T_{\rm eff}$ (K) & 19~126 $\pm$ 195\\
log {\it g}  (cgs)  	& 8.08 $\pm$ 0.07 \\
Mass ($M_\odot$) &  0.648\\
Radius ($R_\odot$) & 0.01212\\
$M_V$  (mag) & 10.89\\
$M_J$  (mag)  &  11.33\\
distance (pc)  &  46\\
Progenitor Mass ($M_\odot$) & 3.1 $\pm$ 0.8\\ 
WD Cooling age (Myr)  & 106 $\pm$ 13\\
MS lifetime (Myr)	       & $\sim$300 $^1$\\    
Total age (Myr)	        & $\sim$400  \\  
\hline
\end{tabular}}
\medskip 
 $^1$ See text.
\end{table}